CompuServe Directory

Here is your CompuServe Directory, a concise listing and description of CompuServe's online services. CompuServe is the world's most comprehensive network of people with personal computers. Access services quickly by selecting GO from the Services pull down menu and typing in the Quick Reference Word that is part of each Directory entry. At CompuServe, we are constantly expanding our services by adding new information and updating existing services.

Use this Directory as your guide, and you'll find that CompuServe is the service you won't outgrow.

Codes Used In the Directory

CompuServe's Basic Membership

Disclaimer

Trademarks

Contents

Membership Support Services

European Services

Communications

Computer and Software Support

Electronic Mall/Shopping

Games

Investing and Finance

News, Weather, Sports

Personal Interests and Hobbies

Professional Interests

Reference Library

Special Interest Groups

Travel


Codes Used In the Directory

CompuServe basic services have no symbol next to them on menus, making them easy to identify. Extended services, which are available at an hourly rate, have a "+" next to them. Premium services, which have an hourly rate and a surcharge, have a "$" next to them on menus. Executive Option services, which have an hourly rate and sometimes a surcharge and are accessible only through an Executive Option membership, have an "E" or a "$E" next to them. GO EXECUTIVE to learn more about the Executive Option Service.

Here's a handy chart to help define CompuServe product categories:

Type of Service	Cost	Symbol	Example

Basic*	$8.95/mo.	none	Electronic Mall

Extended	hourly	+	IBMNEW +

Premium	hourly/surcharge	$	IQuest ($)

Executive w/surcharge	hourly/surcharge/membership	$E	Disclosure ($E)

Note: When selecting a CompuServe service with the "+" symbol, hourly pricing begins with the next screen. When a surcharge is incurred for a portion of a product, the $* designation is used.


CompuServe's Basic Membership

For only $8.95 per month, CompuServe's basic membership offers unlimited connect-time to access many popular services that can help you get more out of your computer, and more out of life. With this membership, new members quickly become proficient on CompuServe and veteran members have a convenient way to use popular services on a more frequent basis.

For more information about CompuServe's basic services, select GO from the services pull-down menu and type CHOICES.

Additional CompuServe services are offered on a pay-as-you-go basis. A "+" sign identifies extended services and a "$" indicates a premium service. .

Another handy service locator is the decorative CompuServe Navigational wall chart. Hang it by your computer for easy reference or add life to any office or computer room. Quick Reference Words are included. GO ORDER to request yours.

Basic services flat-rate pricing, the directory and the wall chart are just some of the ways CompuServe helps you get value for your online dollar.

CompuServe is the information service you won't outgrow.  Our complete package of basic CompuServe services includes unlimited connect-time to access:

Membership Support Services

CIM Support Forum (DOS & MAC)

Navigator Support Forum

CompuServe Practice Forum

A forum designed to teach you the fundamentals of real-time online

communication

Directory of CompuServe Members

Ask Customer Service

A helpful resource if you need online assistance

Free Access to Many Menus

Browse the system to learn more about the services we offer.

Communications

CompuServe Mail

CompuServe Classified

Electronic Mall/Shopping

The Electronic Mall(R)

Shopper's Advantage

A discount shopping club

Games

Blackdragon

CastleQuest

Classic Adventure

Enhanced Adventure

Hangman

Science Trivia Quiz

ShowBiz Quiz

The Whiz Quiz

ShowBizQuiz

Investing & Finance

Basic Quotes

Fundwatch Online by Money Magazine

Issue/Symbol Lookup

Mortgage Calculator

News, Weather, Sports

Associated Press Online

Hourly News Summaries

Sports, Entertainment and  Business News

Roger Ebert's Movie Reviews

U.K. News

U.K. Sports

U.S. National Weather Service Reports

Roger Ebert's Movie Reviews

Personal Interests and Hobbies

HealthNet

An online medical reference source

Reference Library

Consumer Reports

Grolier's Academic American Encyclopedia

A 21-volume online encyclopedia updated quarterly

Peterson's College Database

Travel

Department of State Advisories

EAASY SABRE(R) and WORLDSPAN Travelshopper(SM)

Airline, hotel, and rental car information and reservations,

plus additional travel information

Visa Advisors

Zagat Restaurant Review


Disclaimer

This publication introduces the CompuServe Information Service and briefly describes many of the available services and products. This Directory does not purport to provide a comprehensive catalogue of CompuServe offerings, nor to present detailed explanations or instructions regarding those which are discussed. Furthermore, CompuServe Incorporated reserves the right to modify or eliminate any of its online services and products at any time, with or without published notification.


Trademarks

CompuServe, Online Today, CompuServe Mail and The Electronic Mall are registered trademarks of CompuServe Incorporated, an H&R Block Company.

British Legends, Casino Blackjack, Castle Telengard, CB Simulator, CompuServe Magazine, CompuServe Mail, Electronic Convention Center, The Executive News Service, FILTRAN, The Game Publishers Forum, The Gamers' Forum, GIF, The House of Banshi, MegaWars, MegaWars I, MegaWars III, MicroQuote, The Modem-To-Modem Challenge Board, The Multi-Player Games Forum, The Play-By-Mail Games Forum, QuickQuote, The Role-Playing Games Forum, SOFTEX, VIDTEX and You Guessed It! are service marks of CompuServe Incorporated, an H&R Block Company.

All other brand and product names are trademarks or registered trademarks of their respective companies.

(C) 1993 CompuServe Incorporated


Membership Support Services

This section helps you find your way around the CompuServe Information Service. It provides information such as billing, logging on, ordering and service agreement terms.

Ask Customer Service

Billing Information

Change Equipment/Display Profile

Change Your Billing Address

Change Your Billing Method

Change Your Password

Command Summary/How to Use

CompuServe Help Forum

CompuServe Information Service Software

CompuServe Magazine Advertisers Online Iquiry

CompuServe Pricing Plans

Current Rates

DOS CIM Support Forum

Feedback to CompuServe

Find A Topic

General Billing Information

Mac CIM Support Forum

Member Recommendation Program

Membership Changes

Membership Directory

Navigator Support Forum

Order Exectuive Service Option

Order From the CompuServe Store

Reviewing Your Charges/Usage

Rules of Operation/Copyright

Specials/Contests

Telephone Access Numbers

Tours

What's New This Week

WinCIM Support Forum

Related Topics


Ask Customer Service
Ask Customer Service	Service: QUESTIONS

Customer Service makes it easy to get the help you need whenever you need it. When a question comes up while you're online, visit Customer Service. Customer Service provides a list of commonly asked questions about CompuServe and their answers. Questions are answered on such topics as CompuServe Mail, billing, forums, logon, CB and CompuServe software. Customer Service is continually updating the Questions and Answers database to keep up with the growing Information Service. The CompuServe Help Forum is available to help you learn how to use CompuServe without incurring unnecessary expenses.  When you can't find the assistance you need in users guides or online, let Customer Service answer your individual questions. Customer Service Representatives help solve any problems you may encounter and encourage your comments. Select the option for FEEDBACK to visit the Feedback area and send questions, comments or suggestions to CompuServe.

If you have a question or problem that requires immediate attention, a Customer Service Representative can help you. Representatives are available from 8 A.M. to midnight, Monday through Friday and from noon to 10 P.M. on weekends, Eastern Time. Holiday hours vary.  Phone numbers are available for the following countries:

United States

Argentina

Australia and New Zealand

Chile

Germany and Switzerland

Japan

Korea

South Africa

Taiwan

United Kingdon

Venezuela

If there is no local Customer Service listing in your country, please try contacting the Customer Service office nearest you or call CompuServe Customer Service in the United States for further assistance.

Recorded support is available around the clock through the Customer Service phone system. Using a touch tone phone you can find assistance with file transfers and CompuServe Mail, phone numbers, rates and more.


Customer Service Phone Numbers - United States

(800) 848-8990

Within the US (including Puerto Rico, St. Thomas, St. John and St. Croix)

(614) 457-8650

Outside the US


Customer Service Phone Numbers - Argentina

541-457825, 457817, or 457871


Customer Service Phone Numbers - Australia and New Zealand

008-025-240

Sales Freephone within Australia

008-023-158

Service Freephone within Australia

0800-446-113

Sales Freephone within New Zealand

0800-441-082

Service Freephone within New Zealand

61-02-410-4555

Outside Australia and New Zealand


Customer Service Phone Numbers - Chile

696-8807

Within the Santiago Metropolotian Area

(02) 696-8807

All other cities within Chile

Or dial your local ChilePac or Telex-Chile office.


Customer Service Phone Numbers - Germany and Switzerland

0130-37-32

Sales Freephone within Germany

0130-86-4643

Service Freephone within Germany

155-31-79

Freephone within Switzerland

(+49) (89) 66-550-111

Sales Outside Germany

(+49) (89) 66-550-222

Service Outside Germany


Customer Service Phone Numbers - Japan

0120-22-1200

Within Japan Toll-free

(81) 3-5471-5806

Outside Japan


Customer Service Phone Numbers - Korea

080-022-7400

Freephone within Korea

(+82) 2-569-5400, 2-569-1542, 2-569-1544

Outside Korea


Customer Service Phone Numbers - South Africa

(012) 841-2530

Within South Africa

(+27) 12-841-2530

Outside South Africa


Customer Service Phone Numbers - Taiwan

02-515-7035

Inside Taiwan

(886) 2-515-7035

Outside Taiwan


Customer Service Phone Numbers - United Kingdom

0800-289-378

Sales Freephone within UK

0800-289-458

Service Freephone within UK

(44) 272 255111

Outside UK


Customer Service Phone Numbers - Venezuela

02-793-2984

02-793-2384

02-791-8694

Inside Venezuela

(58) 2-793-2984

(58) 2-793-2384

(58) 2-793-8694

Outside Venezuela


Billing Information
Billing Information	Service: BILLING

View your charges or look up current rates in this service area.  (Charges take 24 - 48 hours to process.) You will find explanations of the available billing options and your personal billing information, including the amount owed, for the last several weeks. You can also change your billing option, change your billing address or select the Executive Service Option. A section explains the various billing options available to CompuServe members including VISA, MasterCard, American Express/Optima, Direct Debit and Business Account.


Change Equipment/Display Profile
Change Equipment/Display Profile	Service: TERMINAL

This powerful area enables you to change your terminal type, your settings (such as line length, baud rate, parity and output delays) and your first logon action. In addition, you can build your own personal menu of products that will display at logon.


Change Your Billing Address
Change Your Billing Address	Service: ADDRESS

Use this choice to change your billing address and phone number.


Change Your Billing Method
Change Your Billing Method	Service: BILOPT

You can change your billing option from Direct Debit to credit card, from credit card to Direct Debit or from one credit card to another. Direct Debit members can change their checking account information. If your card has been recently renewed and you need to enter the new expiration date, you can use this option to do so. You can also find information about converting your account to a business account.


Change Your Password
Change Your Password	Service: PASSWORD

This option enables you to change your password.


Command Summary/How To Use
Command Summary/How To Use	Service: COMMAND

Command Summary explains the commands that can be used in the CompuServe Information Service and how to use them. It explains the menus, control characters and communication standards. It also lists access telephone numbers and gives access to billing information.


CompuServe Help Forum
CompuServe Help Forum	Service: HELPFORUM

Learn how to use CompuServe and to interact with its various products without incurring unecessary expenses.  Access the CompuServe Help Forum for assistance in using CompuServe's reference, news and financial services, as well as games and CompuServe Mail.  Also, get answers to your questions about pricing plans, surcharges and online symbols.


CompuServe Information Services
CompuServe Information Service Software	Service: CISSOFT

CompuServe offers its members information and support for CompuServe's communication programs such as CompuServe Information Manager (DOS, Mac and Windows versions) and CompuServe Navigator communications programs, which simplify the user interface to CompuServe and other computer systems. Here you can download the latest versions or upgrades to CIM and NAV and learn about each product's special features, equipment requirements and upgrade information. Receive prompt answers to your questions through forums that are available for each product.


CompuServe Magazine Advertisers Online Inquiry
CompuServe Magazine Advertisers Online Inquiry	Service: OLI

You can request general information about an ad displayed in CompuServe Magazine and request product literature directly from advertisers.


CompuServe Pricing Plans
CompuServe Pricing Plans	Service: CHOICES

Have questions about your options for CompuServe pricing plans? You can probably find the answers with CHOICES. Here you can learn about both of CompuServe's plans, the Standard plan and the Alternative plan, you can join a plan or change plans. CHOICES also answers commonly asked questions about the plans, enables you to discover which one is right for you and provides access to the CompuServe Help Forum.


Current Rates
Current Rates	Service: RATES

This section lists the fees associated with CompuServe use and the billing options available to members.


CIM Support Forum
DOSCIM Support Forum	Service: CIMSUP

If you use or are considering using CIM, join the CompuServe Information Manager(TM) (CIM) for DOS, join the CIM Support Forum. Operated by CompuServe Incorporated, this forum provides information about CIM's powerful interface that allows you to use all of CompuServe's online features such as forums, CB, news and reference products, financial databases and quotes and CompuServe Mail. Find answers to your questions about installation, required hardware, terminal emulation and general use of CIM.


Feedback to CompuServe
Feedback to CompuServe	Service: FEEDBACK

Feedback enables you to send your question, comment or suggestion to CompuServe. A Customer Service Representative will respond via CompuServe Mail as quickly as possible.


Find a Topic
Find a Topic	Service: INDEX

CompuServe indexes products by topic and alphabetically. In INDEX, if you enter a topic such as food or sports, you are given a menu list of CompuServe products and their Quick Reference Words or page numbers. Enter the GO command with either the Quick Reference Word or page number to quickly go to the product. You can also get an alphabetical listing of all CompuServe products and their Quick Reference Words. The index is also available by entering the FIND command at any ! prompt.


General Billing Information
General Billing Information	Service: BILINF

This section provides detailed information about your charges and ways to inquire about them. It tells you how to submit error correction requests to CompuServe. It also tells you how to avoid unauthorized use of your account and what to do if you suspect unauthorized use.


Mac CIM Support Forum
MacCIM Support Forum	Service: MCIMSUP

If you use or are considering using CompuServe Information Manager(TM) (CIM) for your Macintosh, join the MacCIM Support Forum. Operated by CompuServe Incorporated, this forum provides information about CIM's powerful interface for the Macintosh that allows you to use all of CompuServe's online features such as forums, CB, news and reference products, financial databases and quotes and CompuServe Mail. Find answers to your questions about installation, required hardware, terminal emulation and general use of CIM. See the DOS CIM Support Forum  for information about CIM for DOS or the WinCIM Support Forum for information on CIM for Windows.


Member Recommendation Program
Member Recommendation Program	Service: FRIEND

The Member Recommendation Program enables you to earn online usage credit for introducing friends to CompuServe. Information is provided on the program and on any additional offers or contests available for winning online usage credit for member referrals.


Membership Changes
Membership Changes	Service: MEMBER

This section enables you to change your billing name and address information for mailings. Add or remove your name from various mailing lists associated with the CompuServe Information Service, including the CompuServe Magazine subscriber list, CompuServe special mailings list, and a list made available to vendors. Add your name to the online membership directory. You can also change your password or billing option and notify CompuServe of your change of address or if you must cancel your membership. More information on these areas can be found in the Users Guide.


Membership Directory
Membership Directory	Service: DIRECTORY

This directory enables you to search for other members around the world by name. All members are included in the Membership Directory, unless they specifically request exclusion. Now you can obtain the User ID number of other members and easily communicate with them via CompuServe Mail or through our other online communication services.


Navigator Support Forum
Navigator Support Forum	Service: NAVSUP

Prospective and current users of CompuServe's Navigator, a Macintosh program that helps members save online connect time, can find the latest information on the program in the Navigator Support Forum. Find answers to your questions about installation, session parameters, hardware required, Navigator interfaces and Navigator patches.


Order Executive Service Option
Order Executive Service Option	Service: EXECUTIVE

CompuServe's Executive Service Option enables you to access additional value-added services, purchase many CompuServe products at a discount, and increase your online storage capabilities, including increasing the storage period from 30 days to six months. Members with the Executive Service Option also receive volume discounts on information retrieval from selected transaction price financial databases. The option provides access to exclusive databases including Ticker Retrieval, DISCLOSURE II, Executive News Service, SuperSite, Institutional Broker's Estimate System, Securities Screening, Return Analysis and Company Screening. Those members whose accounts carry the Executive Service Option also receive direct marketing offers from many of CompuServe's affiliated merchants and manufacturers. Most executive products display best on 80-column screens. Online services provided with the Executive Service Option are marked with an (E) on menus.


Order From the CompuServe Store
Order From the CompuServe Store	Service: ORDER

Access CompuServe's online ordering service and place your order by selecting from CompuServe's many exciting products -- users guides, communication software, game maps and more. You can check on an existing order's status and change an order before it is filled.


Reviewing Your Charges/Usage
Reviewing Your Charges/Usage	Service: CHARGES

Review your billing history, or review your usage activities from the past twelve weeks. See for yourself when your payment is posted, which services you used that generated a surcharge, credits applied and your account balance. You can find explanations of each billing option's billing process. A hard copy of your usage details can be mailed to you for a fee.


Rules of Operation/Copyright
Rules of Operation/Copyright	Service: RULES

This section offers a complete description of the CompuServe service agreement terms. They are designed to protect the data and communications offered by CompuServe information providers and customers, and make online usage a positive experience for everyone. The Operating Rules cover copyright policy and service agreement terms including commonly asked questions about copyright and ownership of material, particularly as they relate to public domain information and shareware programs.


Specials/Contests
Specials/Contests	Service: SPECIALS

Something new is always happening at CompuServe. Here you can learn where you can win prizes, who is offering free connect time or discounts, and what extra-special events are being held.


Telephone Access Numbers
 Telephone Access Numbers	Service: PHONES

This section gives information related to accessing CompuServe including telephone access numbers, node abbreviations and communication surcharge information. Specific instructions are also available for logging on using the CompuServe, TYMNET, Sprintnet (Telenet), Datapac, LATA and INFONET communications networks and more.  You can also get a local access number by dialing 1-800-FIND-CIS (1-800-346-3247) via modem and typing PHONES at the HOST NAME: prompt.


Tour
Tour	Service: TOUR

The CompuServe Guided Tour takes you on a quick trip through the Service, giving you an overview of what's available in each of the General Services categories. After each section you have the option of continuing on the Tour or learning more about that section.


What's New This Week
What's New This Week	Service: NEW

What's New is a weekly column that describes new and updated services on CompuServe. It includes news from the Electronic Mall, forum conference schedules, CompuServe community news and Online Today Daily Edition.


WinCIM Support Forum
WinCIM Support Forum	Service: WCIMSUP

If you use or are considering using CompuServe Information Manager for Windows -- WinCIM -- join the WinCIM Support Forum. Operated by CompuServe Incorporated, this forum provides information about WinCIM' s powerful interface that allows you to use all of CompuServe's online features such as forums, CB, news and reference products, financial databases and quotes, and CompuServe Mail. Find answers to your questions about installation, required hardware, terminal emulation and general use of WinCIM.


Related Topics -- Membership Support Services
Related Topics

Communications

CompuServe Mail

CompuServe Mail Hub

The Convention Center

Directory of Members

Forums

Participate

Computer and Software Support

Online Today

Personal File Area


European Services

CompuServe provides its European members with the same high quality service for which CompuServe is renown in the United States. This section of the Directory contains the services which are specifically directed towards European members or which lead to such services.  The services listed in this section are fully described in other sections of this Directory.

Computer and Software Services

Borland GmbH Forum

CA-Clipper Germany Forum

CA Micro Germany Forum

Computer Shopper (UK) Forum

Deutsches Computer Forum

Dr. Neuhaus Forum

European Forum

Federation of International Distributors Forum

Hardware Forums

Lotus GmbH Forum

Markt & Technik

Microsoft Benelux

Microsoft Benelux Developers Forum

Microsoft Central Europe Forum

Microsoft Central Europe System Forum

Microsoft Italy Forum

PC Plus/PC Answers Forum

PC Plus/PC Answers Online

Prisma GmbH Forum

Software Forums

Toshiba GmbH Forum

UK Computing Forum

UK Shareware Forum

UK Shopper Forum

VNU BPA Forum

VNU NL Online

ZiffNet European Services

Ziff Windows Deutschland Forum

Investing and Finance

European Company Library

German Company Library

Global Report

MMS International Financial Reports

UK Company Library

UK Historical Stock Quotes

UK Issue Lookup

News, Weather, Sports

UK News Clips

UK Newspaper Library

UK Sports Clips

UK Weather

Professional Interests

The European Community Telework Forum

Reference Library

British Trade Marks

UK Marketing Library

Special Interest Groups (Forums)

Foreign Language Forum

Travel

Travel Britain Online

UK Forum


Communications

This section contains information on products that enable you to communicate with other CompuServe members. You can use CompuServe Mail to send messages to specific people, forums to participate in discussions on specific topics, CB to type in real-time with other CompuServe members around the world, and the CompuServe Classifieds to post ads. However you choose to communicate, there are opportunities for you to get answers to your questions, make new friends and exchange ideas.

CB General Band

CB Adult Band

CB Club

CB Forum

CB Profiles

CB Simulator

CB Society -- Cupcake's Column

CompuServe Classifieds

CompuServe Mail

CompuServe Mail Hub

CONGRESSgrams

The Convention Center

Directory of Members

Forums (SIGs)

Participate

Related Topics


CB General Band
CB General Band	Service: CB-1

The General Band hosts 36 channels for communications of general interest subjects such as a welcome to CompuServe CB, poetry reading, hospitality suite and teen talk.  If you are new to the world of CB, visit the Newcomer channel, Channel 2.  There you will find CB helpers available between 6 P.M. and 2 A. M. Eastern Time (11 P.M. and 7 A.M. GMT).  +


CB Adult Band
CB Adult Band 	Service: CB-2

Access the Adult Band and participate in any of the channels hosting adult-related discussions such as gender alternatives and alternative lifestyles.  If you are new to CB on CompuServe, access the General Band Channel 2 for help and information.  The adult band is only for members 18 years and older.  +


CB Club
CB Club	Service: CBCLUB

Special pricing is available for members who use CB frequently.  +


CB Forum
CB Forum	Service: CBFORUM

The CB Forum consists of a bulletin board and member and data libraries. There are sections for CB party information, teen talk, new CBers, tech talk, etc.  +


CB Profiles
CB Profiles	Service: CBPROFILES

Learn more about your friends on CB by checking the CB Profiles. Your CB Profile contains your handle (reserved handle if you are a CB Club member), User ID, age, city and state, the computer you are using, occupation and interests. Once your CB Profile is installed in the database, it is available for others to read whenever you are on CB.  +


CB Simulator
CB Simulator	Service: CB

CompuServe's CB Simulator is an electronic conferencing program. It's a little like CB radio, except that you use a computer or terminal and, instead of speaking into a microphone, you type at a keyboard. Your reach isn't limited to a few miles, either. You can converse with other people all around the world.  +


CB Society -- Cupcake's Column
CB Society - Cupcake's Column	Service: CUPCAKE

Cupcake is our resident CB columnist. Here's where you can get the scoop on the latest party, who's engaged, who's new and what's happening.  +


CompuServe Classifieds
CompuServe Classifieds	Service: CLASSIFIEDS

Want to sell your boat, car or old computer? Are you looking for a new job, condo or something special? Then browse through CompuServe's Classified ads to find what you are seeking. Or post an ad to sell your unwanted treasures. CompuServe's Classifieds is just like the classified section in most newspapers, only national in scope. There is a surcharge for posting an ad but not for browsing.


CompuServe Mail
CompuServe Mail	Service: MAIL

CompuServe Mail is CompuServe's electronic mail service. It gives you the opportunity to communicate not only with any CompuServe Information Service member, but also with most Internet (a group of university and government networks), MCIMail, AT&TMail 400, Western Union Mail 400, Sprint Mail, NetWare MHS Local Area Network or stand-alone users.  You can also communicate with persons around the world with a postal address, any Group 3 Fax machine (must be available via direct dial) and any telex machine.

When you send faxes or telexes, you'll get notification on whether the message could be delivered and the time of delivery. You can also send all types of files through CompuServe Mail. Besides text messages, you can upload and send binary files, such as spreadsheets, graphics, worksheets and word processor documents in their native format to any CompuServe member. You also have the ability to download any of your mail messages and file them.

If you send a "receipt requested" message, you will find a notification in your mailbox when the message has been retrieved by the recipient. CompuServe Mail has an electronic address book to store the names and mailing addresses of the people to whom you send messages. For information on CompuServe Mail prices, GO MAILRATES.  For help using CompuServe Mail, GO MAILHELP.


CompuServe Mail Hub
CompuServe Mail Hub	Service: MHS

The CompuServe Mail Hub is a global message exchange facility which gives NetWare MHS users (either on Local Area Networks or on stand-alones) the ability to communicate with each other without having to dial each individual MHS site directly. The hub links people who use LAN e-mail packages such as Beyond, DaVinci, ExpressIt!, MailMAN, Notework, Powercore and Team. The hub also allows the exchange of messages with any CompuServe member and with other connections such as Fax, Internet, AT&T Mail 400, MCI Mail, Western Union 400 and Sprint Mail.  +


CONGRESSgrams
CONGRESSgrams	Service: CONGRESS

If you want to send your opinions or views to members of the United States Congress or to the President or Vice President of the United States, use the CONGRESSgram feature of CompuServe Mail. Your letter is printed on paper, placed in an envelope and mailed to your recipient who usually receives it the next day. You can also use the Congressional database to look up information about any United States Congressman. Each listing includes committee assignments, hometown, party affiliation and phone number.  $


The Convention Center
The Convention Center	Service: CONVENTION

The Electronic Convention Center is a special meeting place to conduct live conferences of up to 300 people. You can view information on scheduled conferences and decide if you would like to attend. Information about each conference is displayed: general description, conference type, date and time, expected length and whether a reservation is required. A reservation, if needed, can be made at that time.


Forums (SIGs)
Forums (SIGs)	Service: FORUMS

Forums are places where people of similar interests can exchange information, participate in discussions in real-time conferences or share software programs. There are three types of forums:

Computer forums where you will find experts to solve problems or exchange

technical ideas about computers;

Professional forums geared to specific professions like medicine or law;

General interest forums where people with similar interests or hobbies exchange

ideas or information.

All forums have a similar structure and use the same commands. They are run by one or more Forum Administrators (SysOps - system operators) who are in charge of the forum and have some expertise in the subject matter of the forum. Most forums prefer that you use your full name, and they do not tolerate disruptive behavior. There are three main areas of a forum:

A message board containing hundreds of messages placed there by members.

A library containing text files and software programs, transcripts of conferences and

essays.

A conference mode where members get together for real-time conferences.

Conference mode is similar to the CB Simulator.

For more information on forums and how to use forum commands, see the Users Guide or stop by the Practice Forum (GO PRACTICE).


Participate
Participate	Service: PARTI

Want to start your own ad hoc group discussion about a particular topic? Then GO PARTI to access Participate, a member-controlled messaging system where you lead the discussion and choose the participants. The command structure for Participate is unique, so be sure to read the available online help files. +


Related Topics --- Communications
Related Topics

Membership Services

Ask Customer Service

CompuServe Help Forum

Feedback to CompuServe

Member Recommendation Program

Membership Directory

Specials/Contests

Telephone Access Numbers

Computer and Software Support

Hardware Forums

Software Forums

Electronic Mall/Shopping

The Electronic Mall

   --See	Computing

Merchandise/Electronics

Investing and Finance

Error-Free File Transfer

Personal Interests and Hobbies

HamNet (Ham Radio) Forum

Military and Veterans Forum

Professional Interests

Broadcast Professional Forum

Reference Library

Biz*File

Commerce Business Daily

Government Information

Phone*File

US-State-County Reports

Special Interest Groups -- Forums

Consumer Electronics

Issues Forum

Space/Astronomy


Computers and Software Support

CompuServe provides you with unparalleled electronic support for your computing needs. Nowhere else can you obtain direct support from over 425 software and hardware companies in one place. Have a question? Leave a message and receive an answer typically within 24 hours, if not sooner.

This section contains the products pertaining to computers and technology. It includes software and hardware forums, electronic magazines and newsletters. Many of the products described in this section contain software patches and enhancement programs, tips and techniques which will expand your capabilities and productivity.

Computer Magazines and Newsletters

Hardware Vendors and Forums

Miscellaneous Computer Products

Software Vendors and Forums

Related Topics


Hardware Vendors and Forums

Amiga Forums

Amiga Vendors and Amiga Vendors Forum

Apple Forums

Atari Forums

Atari Vendors and Atari Vendors Forum

Autodesk Forums

CADD/CAM/CAE Vendors and Vendors Forum

Commodore Forums

Desktop Publishing Vendors and DTP Vendors Forum

Digital Equipment Corp. (DEC)

Graphics Vendors, Graphics Vendor Forum and Graphics Forums

Hewlett-Packard Forums

IBM Forums

Macintosh Forums

Macintosh Vendors and Macintosh Vendors Forums

MIDI Vendors and MIDI Vendor Forums

Miscellaneous Hardware Vendors and Forums

Modem Vendor Forum

Multimedia Vendors and Multimedia Vendors Forums

Network Vendors

Novell Forums and Novell Vendors

Palmtop Vendors and Palmtop Vendors Forum

PC Vendors and PC Vendors Forums

Pen Technology Vendor and Forum

Plug and Play Forums

Tandy/Radio Shack Forums


Software Vendors and Forums

Aldus Forums

Amiga Vendors and Amiga Vendors Forum

Atari Vendors and Atari Vendors Forum

Autodesk Forums

Borland Forums

CADD/CAM/CAE and Vendors Forum

Central Point Software Forums

Computer Associates Forums

Desktop Publishing Vendors and DTP Vendors Forum

Digital Equipment Corp. (DEC)

LOGO Vendors and LOGO Forum

Lotus Forums

Macintosh Vendors and Macintosh Vendors Forums

Microsoft Forums

MIDI Vendors and MIDI Vendor Forum

Miscellaneous Software Vendors and Forums

Multimedia Vendors and Multimedia Vendors Forums

Network Vendors

Novell Forums and Novell Vendors

OS/2 Vendors and OS/2 Vendors Forum

PC Vendors and PC Vendors Forums

Plug and Play Forum

Symantec Forums

Windows Vendors and Windows Vendors Forums


Amiga Forums

Amiga and Commodore Users Network

Amiga Arts Forum

Amiga File Finder

Amiga Tech Forum

Amiga User Forum


Commodore Forums

Amiga and Commodore Users Network

Commodore Application Forum

Commodore Arts and Games Forum

Commodore Newsletter

Commodore Service Forum


Apple Forums

Apple Macintosh Forums

Apple II Programmers' Forums

Apple II Users Forum

Apple II Vendor Forum

Apple II/III Forums


Atari Forums

Atari 8-Bit Forum

Atari File Finder

Atari Portfolio Forum

Atari ST Arts Forum

Atari ST Productivity Forum

Atari Users Network

What's New in the Atari Forums


Atari Vendors and Atari Vendors Forum

Atari Vendors Forum

CodeHead Software

Gadgets By Small, Inc.

Gribnif Software

ICD, Inc.

INTERSECT Software Corporation

ISD Marketing

Lexicor Software (Atari)

MacDonald Associates

Maxwell CPU

Missionware Software

Oregon Research Associates

Precision Software (Atari)

Soft-LogikPublishing (Atari)

Supra Corporation


Amiga Vendors and Amiga Vendors Forum

Amiga Vendor Forum

ASDG

ATI

Avant-Garde Software Inc.

Black Belt Systems

Central Coast Software

Impulse, Inc.

Inovatronics

New Horizons

NewTek

Right Answers

Soft-Logik Publishing Corp.

Softwood

Syndesis


Autodesk Forums

Autodesk AutoCAD Forum

Autodesk Retail Products Forum

Autodesk Software Forum


Borland Forums

Borland C++/DOS Forum

Borland C++/Windows Forum

Borland GmbH Forum

Borland International

Borland Paradox Forum

Borland paradox Windows/OS2 Forum

Borland Pascal Forum


CADD/CAM/CAE Vendors and Vendors Forum

Ashlar Incorporated

Bentley Systems

CADD/CAM/CAE Vendor Forum

Evolution Computing

IBM CAD

ISICAD, Inc.

Micro Engineering Solutions

Universal Technical Systems


Digital Equipment Corp. (DEC) Forums

DEC PC Forum

DEC Users Network

Digital's PC Integration Forum

VAX Forum


Central Point Software Forums

Central Point Software DOS Forum

Central Point Software Windows and Macintosh Forum


 Computer Associates Forums

CA Application Developement Forum

CA Clipper Forum

CA Clipper Germany Forum

CA Micro Germany Forum

CA Productivity Solutions Forum

CA Vax/Unix Forum


Desktop Publishing Vendors and DTP Vendors Forum

Bitstream

CAI/ColorAge

Desktop Publishing Forum

DTP Vendor Forum

EFI Support

FontBank

Frame Technology

Hyphen

Monotype

QMS

Scitex America Corp.

Sigma Designs

Timeworks

XChange


Graphics Vendors and Graphics Vendors Forum
Graphics Vendors, Graphics Vendors Forum and Graphics Forums

Animated Software

ATI Technologies Inc.

Computer Art Forum

Diamond Computer Systems

Digital Vision

Fine Art Forum

Genus Inc.

Global Softworks LTD

The 'GO GRAPHICS' Tutorial

Graphics Corner Forum

Graphics File Finder

Graphics Software, Inc.

Graphics Support Forum

Graphics A Vendor Forum

Graphics B Vendor Forum

Hercules Computer Technology

Image-In Incorporated

Inset Systems Inc.

Jovian Inc.

Lead Technologies

Mathematica, Inc.

Metagraphics

Paul Mace Software

Presidio Software

Quick Pictures Forum

Rix Softworks

STB Systems

StereoGraphics

Sun Country Software

TEGL Systems Corp.

Tseng Labs

Virtual Reality Laboratories


Hewlett-Packard Forums

HP Handhelds Forum

HP OmniBook Forum

HP Peripherals Forum

HP Specials

HP Systems Forum


IBM Forums

APPC Info Exchange Forum

IBM Applications Forum

IBM Bulletin Board Forum

IBM CAD

IBM Communications Forum

IBM File Finder

IBM Hardware Forum

IBM LMU2 Forum

IBM New Users/Fun Forum

IBM Office Desktop Forum

IBM OS/2 Developer 1 Forum

IBM OS/2 Developer 2 Forum

IBM OS/2 Support Forum

IBM OS/2 User Forum

IBM PC Users Network

IBM Personal Software Products Beta Forum

IBM Programming Forum

IBM Systems/Utilities Forum

IBM ThinkPad Forum


LOGO Vendors and LOGO Forum

Harvard Associates

Logo Computer Systems, Inc.

Logo Forum

Paradigm Software, Inc.

Power Industries LP

Schemers, Inc.

Terrapin, Inc.


Lotus Forums

Lotus GmbH Forum

Lotus Spreadsheet Forum

Lotus Word Processing Forum

Lotus Words & Pixels Forum

The World of Lotus


Macintosh Forums

Apple Macintosh Forums

Mac Applications Forum

Mac File Finder

Macintosh Clubhouse Forum

Macintosh Communications Forum

Macintosh Developers Forum

Macintosh Entertainment Forum

Macintosh Hardware

Macintosh Hypertext Forum

Macintosh Multimedia Forum

Macintosh New Users and Help Forum

Macintosh System Software Forum


Macintosh Vendors and Macintosh Vendors Forums

Activision (Tenpointo)

Advanced Gravis Computer Technology

Aladdin Systems, Inc.

Altsys Corporation

Alysis

Applied Engineering

Articulate Systems

Atticus Corporation

Avatar Corp.

Baseline Publishing

Berkeley Systems (Macintosh)

CE Software

ChipSoft (Macintosh)

Component Software

Connectix

CoStar Corporation

Daystar Digital

DeltaPoint

Deneba Software

Digital Eclipse

Ex Machina, Inc.

Farallon (Macintosh)

GCC Technologies

Helix Technologies

Inline Software

Insignia Solutions

Iomega Corporation (Macintosh)

Jasik Designs

Mac A Vendor Forum

Mac B Vendor Forum

Mac C Vendor Forum

Mac D Vendor Forum

MacTech Magazine

Mainstay

Mercury Systems

MicroMat

Micronet Technology

Microseeds Publishing

Mirror Technologies

Nisus Software

Olduvai Corporation

Portfolio Systems

Radius Incorporated

Softsync, Inc.

Software Ventures

Super Mac Technology

Survivor Software

Tactic Software

Teknosys, Inc.

T/Maker Company

TMS Peripherals

Virtus Corporation

Working Software


Magazines and Newsletters
Computer Magazines and Newsletters

Cadence Forum

Canopus Research Forum

DBMS Forum

Dr. Dobb's Journal

EETNet

Engineering Automation Productivity Forum

LAN Magazine Forum

Lan Technology Forum

MacTech Magazine

Markt & Technik AG

Online Today

PC World Online

PC Plus/PC Answers Forum

PC Plus/PC Answers Online

Pen Magazine

UK Shopper Forum

VNU BPA Forum

VNU NL Online

Ziff-Davis Products


Microsoft Forums

Microsoft Access Forum

Microsoft Applications Forum

Microsoft Basic Languages Forum

Microsoft C and Other Languages Forum

Microsoft Benelux

Microsoft Benelux Developers Forum

Microsoft Central Europe Forum

Microsoft Central Europe System Forum

Microsoft Client Server Computing Forum

Microsoft Connection

Microsoft Developer Knowledge Base

Microosft Developer Network Forum

Microsoft Developer Relations Forum

Microsoft DOS 5.0 Forum

Microsoft End User Support Forums

Microsoft Excel Forum

Microsoft Fox Forum

Microsoft Italy Forum

Microsoft Knowledge Base

Microsoft Programming Applications Forum

Microsoft Service Request

Microsoft Software Library

Microsoft Solutions Channels Forum

Microsoft TechNet Forum

Microsoft TechNet Services Area

Microsoft Windows NT Pre-Release Forum

Microsoft Win32 SDK Forum

Microsoft Windows Extensions Forum

Microsoft Windows Fun Forum

Microsoft Windows NT Pre-Release Forum

Microsoft Windows Objects Forum

Microsoft Windows SDK Forum

Microsoft Windows Shareware Forum

Microsoft Word Forum

Microsoft Workgroups Forum


Miscellaneous Hardware Vendors and Forums

Canon Support Forum

CDROM Forum

Color Computer Forum

Computer Club Forum

Dr. Neuhaus Forum

Epson Forum

Hardware Forums

Hayes Online

Hayes Support Forum

Intel Forum

Intel Software Developers Forum

LAN Technology Forum

Logitech Forum

Model 100 Forum

Newton/PIE Forum

NeXT Forum

Northgate Computer Systems, Inc.

Packard Bell Forum

PDP-11 Forum

Practical Peripherals Forum

Prisma GmbH Forum

Texas Instruments Forum

Texas Instruments Newsletter

Thomas-Conrad

Toshiba Forum

Toshiba GmbH Forum

Userland Software Forum

Wang Support Forum

WRQ/Reflection Forum

Zenith Forum


Miscellaneous Software Vendors and Forums

ACIUS Forum

Adobe Forum

AI EXPERT Forum

ASP/Shareware Forum

BASIC Forum

BASIS International Forum

Blyth Software Forum

CASE - DCI Forum

Clarion Software Forum

Claris Corporation Forum

Crosstalk Forum

Computer Language Forum

Corel Forum

CP/M Forum

CTOS/Open Forum

Data Access Corporation Forum

Data Based Advisor Forum

DataEase International Forum

Datastorm Technologies Support Forum

Digitalk Forum

Dell Forum

Eicon Forum

Fifth Generation Systems Forum

The FocServices FocForum

The Focus Connection

FocWizards FocForum

Forth Forum/Creative Solutions

FUSE Forum

INTERSOLV Forum

Javelin/EXPRESS Forum

Logitech Forum

Macromedia Forum

McAfee Virus Help Forum

MECA Software Forum

Oracle Forum

OS-9 Forum

Portable Programming Forum

Prisma GmbH Forum

Quarterdeck Forum

Revelation Tech Forum

Salient Software

Santa Cruz Operation Forum

Software Forums

Software Publishers Association Forum

Software Publishing Corporation

Spinnaker Forum

Stac Electronics Forum

TAPCIS Forum

Ultimedia Tools Series A Forum

Ultimedia Tools Series B Forum

UNIX Forum

UnixWare Forum

Ventura Forum

Wang Support Forum

Wolfram Research Forum

WordPerfect Users Forum

WordStar Forum

WPCorp Files Forum


Modem Vendors and Modem Vendor Forum

Boca Research

The Complete PC

Computer Peripherals

Global Village Communications

Megahertz

Modem Vendor Forum

Multi-Tech

PSI Integration

Telebit

USROBOTICS

Zoom Telephonics


Multimedia Vendors and Multimedia Vendors Forum

Aimtech

Asymetrix Corporation (Multimedia)

BCD Associates

Cognetics

HSC Software

Lenel Systems

Macintosh Multimedia Forum

Media Vision

Multimedia Forum

Multimedia Vendors Forum

New Media Graphics

nTergaid

Specular International

Truevision

Turtle Beach Systems (Multimedia)

VideoLogic

The Voyager Company


MIDI Vendors and MIDI Vendors Forum
MIDI Vendors and MIDI Vendors Forums

Animotion

Barefoot/Hybrid

Big Noise Software, Inc.

Coda Music Software

Cool Shoes Software

Covox

Dr. T's

E-Mu Systems

Howling Dog

Innovative Quality Software

JLCooper Electronics

Key Electronics

Kurzweil Music Systems - Young Chang

Lexicon

Live Sound!

Mackie Designs

Magnetic Music

MIDI/Music Forum

MIDI A Vendor Forum

MIDI B Vendor Forum

MIDI C Vendor Forum

Midiman

MOTU

MusicQuest

Opcode Systems Incorporated (MIDI)

Passport Designs

Roland Corp.

Soundcraft

Steinberg/Jones

Sweetwater Sound

Temporal Acuity

Thoughtprocessors

Turtle Beach Systems

Twelve Tone Systems


Network/LAN Vendors

Banyan Forum

Cabletron Systems, Inc.

Standard Microsystems Forum

Thomas-Conrad

3Com Forum


Novell Forums
Novell Forums and Novell Vendors

AST Research

Best Power Technology

Blue Lance

Dell Computer Corporation

Folio Corporation

Infinite Technologies

Knozall Systems, Inc.

LAN Support Group

Notework Corporation

Novell Desktop Systems Group Forum

Novell Buyer's Guide

Novell Files Area

Novell Forum A

Novell Forum B

Novell Forum C

Novell Library

Novell NetWare Support Providers Directory

Novell NetWare 2.X Forum

Novell NetWare 3.X Forum

Novell NetWare 4.X Forum

Novell NetWire

Novell Vendor Forum

RoseWare

SynOptics


PC Vendors and PC Vendors Forums
PC Vendors and PC Vendor Forums

Above Software

Acer America

AddStore, Inc.

Advanced Gravis Computer Technology

Alcom

AlphaSoftwarePCVENE6

ALR

American Cybernetics

American Power Conversion

Artisoft

Beyond, Inc.

BLOC Publishing Corporation

Brightwork Development

Brown Bag Software

ButtonWare, Inc.

Cheynne Software

ChipSoft (DOS)

Clarion Technical Journal

Cogent Data Technology

Command Software Systems

Complementary Solutions Inc

Contact Software International

Ctlalt Associates

Cumulus Corporation

Custom Technologies

DacEasy

DeScriber

DSI Software Systems

Dvorak Dvelopment

Enable Software, Inc.

Faircom

Farallon (DOS)

Foresight Corporation

Funk Software

Futurus

Gammalink

Gateway 2000

Greenleaf Software

Helix Software

Hilgraeve

Hooper International

Hyperkinetix, Inc.

Hyundai

Identitech, Inc.

Inmagic, Inc.

Innovative Date Concepts

Iomega Corporation (DOS)

IQ Technologies

J.P. Software

Korenthal Associates

Lahey Computer Systems

Legato Systems, Inc.

Magee Enterprises, Inc.

Magic Software

Magma Systems

Mansfield Software Group

MIP Fund Accounting

Micropolis Corporation

M-USA Business Systems

Mustang Software

NetFRAME Systems

Network General

Object Design

Pacific Data Products, Inc.

Parsons Technology, Inc.

PCMCIA

PC Brand

PC-Kwik

PC Vendor A Forum

PC Vendor B Forum

PC Vendor C Forum

PC Vendor D Forum

PC Vendor E Forum

PC Vendor F Forum

PC Vendor G Forum

PC Vendor H Forum

PCI SIG

Peachtree Software (DOS)

Performance Technology

Personics Corporation

Pinnacle Publishing

PKWare

PowerBASIC

Powercore, Inc.

Primavera Systems

PRO-C Corporation

Procom Technology, Inc.

Prolog Development Center

Pure Data, Limited

Qualitas

Quercus Systems

Quicksoft, Inc.

Reality Technologies

ReferencePoint

RTA, Ltd.

Rupp Corporation

SemWare

SofNet

Storage Dimensions

Strategic Mapping

SunDisk

Swan

Tech III

Timeslips Corporation

TRIUS

TurboPower Software

Vericomp

Vertisoft

WATCOM

Willies' Computer Software Co.

Wordtech Systems

XTree Company

Zeos International


Palmtop Vendors and Palmtop Vendors Forum

Casio Inc.

Databook Incorporated

Palmtop Forum

Psion, Inc.

Poqet Computer

Sharp Electronics Corporation

Traveling Software, Inc.


Symantec Forums

Symatec AntiVirus Forum

Symantec Applications Forum

Symantec Developments Tools Forum

Symantec Norton Utilities


Tandy/Radio Shack Forums

LDOS/TRSDOS 6 Forum

Tandy Corporation Newsletter

Tandy Professional Forum

Tandy Users Network


Windows Vendors and Windows Vendors Forums

Abacus

ABC Systems and Development

Access Softek

Aristosoft

Asymetrix Corporation (Windows)

Baseline Publishing

Bell Atlantic

Berkeley Systems (Windows)

Campbell Services

ChipSoft (Windows)

Computer Presentations Inc.

DaVinci

Delrina Technology

DeltaPoint

Future Soft Engineering

Geographix

GFA Software

Gilbert & Associates

Gold Disk

Gold Hill

hDC Computer Corp.

ICOM SImulations

InfoAccess (Windows)

Jensen-Jones

KASEWORKS

Kidasa

Knowledge Garden

Metz Software

Micrografx

Microsoft Windows SDK Forum

NBI

Okna Corporation

Peachtree Software (Windows)

Playroom Software

Polaris Software

Powersoft

Protoview

Q+E Software

Saros

ShapeWare

Softbridge

SoftCraft

The Stirling Group

SWFTE International

3-D Visions

Wall Data

WexTech

Wilson WindowWare

Window Craft

Windows Vendor Forums

Windows 3rd Party Applications A Forum

Windows 3rd Party Applications B Forum

Windows 3rd Party Applications C Forum

Windows 3rd Party Applications D Forum

WUGNET

Zenographics


Ziff-Davis Products

Cobb Group Applications Forum

Cobb Programming Forum

Computer Shopper

Designer Template Collections

Executives Online

Help Desk Institute Online

MacUser Forum

MacWEEK Forum

PC/Contact Forum from PC/Computing Forum

PC Magazine

PC Week

PC Week Extra! Forum from PC Week

Public Brand Software Applications Forum

Public Brand Software Arcade Forum

Seybold Newsletters and Seminars

Support On Site (SOS) Online

Windows Sources Forum

Ziff Buyers' Market

ZiffNet

ZiffNet European Services

ZiffNet/Mac


Miscellaneous Computer Products

Dataquest Online

Deutsches Computer Forum

European Forum

Pacific Vendor Forum

Personal File Area

Sight and Sound Forum

Telecommunications Issues Forum

UK Computing Forum

UKSHARE Forum


Pen Technology Vendors and Forums
Pen Technology Vendors and Forum

Communication Intelligence Corp.

GO Corporation

GRiD Systems

Pen Magazine

Slate Corp.


Aldus Forums

Aldus Forum

Aldus Special Programs Forum


OS/2 Vendors and OS/2 Vendors Forums
OS/2 Vendors and OS/2 Vendors Forum

Creative Systems Programming

Development Technologies

Hockware

OS/2 Vendor Forum

Sourceline Software

Sundial Systems


Abacus
Abacus  	Service: ABACUS

Abacus Software provides technical support for its utility applications including BeckerTools and Virus in the Abacus section of the Windows Third Party Applications C Forum. In addition to software development, Abacus is also a publisher of software and computer books.  +


ABC Systems and Development
ABC Systems and Development	Service: ABCSYS

Support for ABC's network administration applications and tools such asLAN Admin can be found in its section of the Windows 3rd Party Applications D Forum. +


Above Software
Above Software	Service: ABOVE

Above Software provides support for Above Disc, AboveMEM and Golden RETRIEVER in its section of the PC Vendor D Forum.  +


Access Softek
Access Softek  	Service: WINAPA

Access Softek produces a series of text and file utility products for the Windows environment including TakeNote and Prompt!, which are supported in the Access Softek section of the Windows Third Party Applications A Forum.  +


Acer America
Acer America	Service: ACER

Acer America supports its full line of computer systems in its section of the PC Vendor F Forum.  Technical support representatives are online to answer your technical questions about the systems.  +


ACIUS Forum
ACIUS Forum  	Service: ACIUS

The ACIUS Forum supports all ACIUS products. This includes 4th Dimension, File Force and 4D Modules. Libraries contain time saving programs including externals and sample databases.  +


Activision (Tenpointo)
Activision (Tenpointo)  	Service: MACAVEN

Receive support for products such as Focal Point II and City to City in the Activision section of the Mac A Vendor Forum.  +


AddStor, Inc.
AddStor, Inc.	Service: PCVENE

AddStor supports its products such as SuperStor in its section of the PC Vendor E Forum.  +


Adobe Forum
Adobe Forum  	Service: ADOBE

Operated by the Adobe technical support staff, the Adobe Forum is for users, dealers, service bureaus, developers and other interested parties to discuss desktop publishing. This forum is especially of interest to users of Adobe typefaces, Adobe Illustrator, Transcript and Photoshop. The forum's libraries contain company press releases and new product announcements.  +


Advanced Gravis Computer Technology (IBM)
Advanced Gravis Computer Technology (IBM)	Service: PCVENB

Advanced Gravis Computer Technology Ltd. supports its full line of products in its section of the PC Vendor B Forum. The Advanced Gravis product line includes analog joysticks, switch joysticks, programmable/optical joysticks, programmable/multi-button mice, high speed game cards, security software and portable hard disk drives. +


Advanced Gravis Computer Technology (Mac)
Advanced Gravis Computer Technology (Mac)	Service: MACDVEN

Advanced Gravis' line of Macintosh products are supported in the Mac D Vendor Forum. +


AI EXPERT Forum
AI EXPERT Forum  	Service: AIEXPERT

AI EXPERT Forum has been created for the Artificial Intelligence community as an information exchange and a supplemental resource to AI Expert magazine. In this forum, you can query industry and academic leaders in the AI field as well as exchange AI information with other members. AI Expert articles and supporting program listings are available here for downloading to your machine, as are public domain expert systems and software. AI Expert editor Alan Zeichick and many of the AI Expert columnists and authors are available to chat with you.  +


Aimtech
Aimtech	Service: MULTIVENDOR

IconAuthor, a Windows-based interactive multimedia authoring system is supported by Aimtech in the Multimedia Vendor Forum.  Representatives from Aimtech are standing by to provide you with technical online assistance.  +


Aladdin Systems, Inc.
Aladdin Systems, Inc.  	Service: MACCVEN

Shortcut, StuffIt and StuffIt Deluxe are supported in the Aladdin Systems support section of the Mac C Vendor Forum.  +


Alcom
Alcom	Service: ALCOM

Access Alcom's section of the PC Vendor H Forum to obtain support for LanFax Redirector, Alcom's fax server software. +


Aldus Forum
Aldus Forum	Service: ALDUS

The Aldus Forum provides Aldus users with information about product upgrades and new releases. Technical support is provided for Aldus PageMaker, FreeHand, PhotoSyler and Persuasion. All Aldus Consumer Division (formerly Silicon Beach) products, such as IntelliDraw, Personal Press, Digital Darkroom, SuperCard, Super 3-D, SuperPaint and Gallery Effects, are also supported in this forum. +


Aldus Special Programs Forum
Aldus Special Programs Forum	Service: ALDUSSPP

The Aldus Special Programs Forum is designed for developers and others in Aldus special programs. In the Developer's Corner experts will answer questions about Aldus Additions and TIFF specifications. Other sections of this forum are restricted to groups such as Aldus Authorized Trainers, Registered Image Services and Aldus Beta Programs. Contact your program manager if you belong to one of these groups and would like access to the section. +


Alpha Software
Alpha Software	Service: PCVENE

Obtain product information and technical support from Alpha Software for Alpha Four, a networkable relational database management and application development system.  Support is available within the Alpha Software section of the PC Vendor E Forum.  +


ALR
ALR	Service: PCVENG

Advanced Logic Research (ALR) supports its upgradable desktop file server and notebook PC products in its section of the PC Vendor G Forum. +


Altsys Corporation
Altsys Corporation  	Service: MACBVEN

Access the Altsys Corp. section of the Mac B Vendor Forum to obtain technical support for Altsys' Fontographer, Metamorphosis, The Art Importer, Fontastic Plus and Family Builder products.  +


Alysis
Alysis	Service: MACCEN

Visit the Mac C Vendor Forum to receive technical support directly from Alysis.  Alysis Resource Compressor, More Disk Space, Quadra Compatibility INIT (V.3.0) and SuperDisk are all supported in the Alysis Software Section.  +


American Cybernetics
American Cybernetics	Service: CYBERNET

American Cybernetics representatives provide support and information for AC's full line of porducts including Multi-Edit, Evolve, The Workgroup Collection and The Guides within its section of the PC Vendor E Forum.  +


American Power Conversion
American Power Conversion	Service: APCSUPPORT

American Power Conversion designs, manufactures and markets Uninterruptible Power Supplies (UPS), which can help ensure a constant source of electrical power to your computer.  Access its sectin of the PC Vendor E Forum to receive the latest information and technical support from APC.  +


Amiga and Commodore Users Network
Amiga and Commodore Users Network 	Service: CBMNET

There are seven forums devoted to Commodore computers: the Amiga Arts Forum, the Amiga Tech Forum, the Amiga User Forum, the Amiga Vendor Forum, the Commodore Arts and Games Forum, the Commodore Applications Forum and the Commodore Service Forum.  +


Amiga Arts Forum
Amiga Arts Forum  	Service: AMIGAARTS

Amiga Arts Forum is for anyone with an interest in the creative aspects of the Amiga personal computer. Members can access conference rooms, libraries and message boards which are broken down by topic. Forum libraries contain hundreds of programs, text files, help info, product reviews and transcripts of previous conferences held in the forum. All are available for downloading to your computer at no additional charge to members whose terminal software supports one of the various file transfer methods, including XMODEM and CIS B and QB protocols. Membership ranges from beginners to advanced professionals who share skills, knowledge or just curiosity.  +


Amiga File Finder
Amiga File Finder  	Service: AMIGAFF

Amiga File Finder provides a quick and easy reference to some of the best programs and files available in the Amiga Arts, Tech, User and Vendor forums. In this comprehensive database, you can quickly find the file you want using search criteria such as a keyword, file submission date, forum name, file type, file extension, file name or submitter's user ID. When you enter the selection criteria, the file's description, forum and library location are listed. +


Amiga Tech Forum
Amiga Tech Forum  	Service: AMIGATECH

If you're interested in the technical aspects of the Amiga personal computer, try the Amiga Tech Forum. Members have access to various sections of the message board, the online conferencing feature and extended libraries containing hundreds of public domain programs for the Amiga, help files, product reviews and archived reference texts -- all free and available for downloading. Forum members include Amiga enthusiasts of all levels.  +


Amiga User Forum
Amiga User Forum  	Service: AMIGAUSER

The Amiga User Forum is dedicated to the everyday business and personal use of Amiga computers. Experienced and new users are encouraged to frequent the message boards where topics such as Amiga news and rumors, hardware, word processing, personal applications, business applications, amateur radio and communications are thoroughly examined. A classified section is available for members who want to sell or purchase second-hand Amiga products.  +


Amiga Vendor Forum
Amiga Vendor Forum  	Service: AMIGAVENDOR

Talk about Amiga products with other Amiga enthusiasts and find support from selected product vendors in the Amiga Vendor Forum. In addition, you'll find information on the various products available from the following vendors: ASDG, ATI, Avant-Garde Software Inc., Black Belt Systems, Central Coast Software, DKB Software, Impulse, Inc., Inovatronics, New Horizons, NewTek, Right Answers, Soft-Logik, Softwood and Syndesis. See each vendor's individual description within this section for a list of supported products.  +


Animated Software
Animated Software	Service: ANISOFT

In the Animated Software section of the Graphics B Vendor Forum, obtain support for Russel's Animation Machine (formerly P-11 Editor) as well as Engine of Life and Labeler.  +


Animotion
Animotion	Service: MIDIAVEN

Access the Animotion section of the MIDI A Vendor Forum to obtain technical support for Animotion products.  +


APPC Info Exchange Forum
APPC Info Exchange Forum  	Service: APPCFORUM

IBM offers this forum for the discussion of all topics related to the design and implementation of applications that use Advanced Program-to-Program Communications (APPC). The conference and message sections host discussions about CPI-C (Common Programming Interface Communications) and configuring networks to support APPC applications such as IBM's Advanced Peer-to-Peer Networking (APPN). Communicate directly with IBM and post suggestions for future product development.  +


Apple Macintosh Forums
Apple Macintosh Forums  	Service: MACINTOSH

Macintosh users have a variety of forums from which to choose. Some forums cover the use of the Mac for personal productivity, arts, entertainment new users and communication. Others center on HyperCard, vendors and developers.


Apple II Programmers' Forum
Apple II Programmers' Forum  	Service: APPROG

Learn how to create your own applications programs for your Apple II computers. Sections within this forum are devoted to programming using languages from BASIC, Pascal and machine to the more advanced graphic interface of the HyperStudio program. Members exchange programming tips and application ideas to help solve problems and increase productivity. +


Apple II Users Forum
Apple II Users Forum  	Service: APPUSER

The Apple II Users Forum is for those who use the Apple II personal computer and want to learn more about the available programs for business, school or home applications. Members browse through the message sections and libraries for help in choosing and using hardware and software programs such as AppleWorks and various other Apple II utility programs. Many members are experts in using the Apple II and can offer sound advice in purchasing and using the various products.  +


Apple II Vendor Forum
Apple II Vendor Forum  	Service: APIIVEN

Have a question about an Apple II product? Join the Apple II Vendor Forum for expert advice and support before and after you make your purchase. Companies such as Applied Engineering, Beagle Brothers, 1st Class Peripherals, InSync Software, On Three Inc, Seven Hills Software, Stone Edge Technology and TMS Peripherals have representatives online to answer customers questions about their Apple II products. Library files offer additional information.  +


Apple II/III Forums
Apple II/III Forums  	Service: APPLE II/III

This area contains forums devoted to the Apple II, II+, //e, //c, IIGS and III. These forums and the Macintosh Forums make up the world's largest online community of Apple users. If you are interested in any Apple computer, you will probably want to join several different forums. The individual membership information announcements in each forum detail what each forum offers its members. All forums follow the same general format and are divided into separate message, library and conference areas.


Applied Engineering
Applied Engineering	Service: MACDVEN

Applied Engineering provides support for its line of Macintosh and Apple II enhancement products such as voice, data and fax modems; cellular communications interfaces; and accelerators and high speed four-port serial expansion cards in its section of the Mac D Vendor Forum. +


Aristosoft
Aristosoft	Service: ARISTOSOFT

Aristosoft, producer of a series of sound enhancement software products for the Windows environment, such as Wired for Sound and Sound Effects, supports its products in the Aristosoft section of the Windows Third Party Applications C Forum.  +


Articulate Systems
Articulate Systems	Service: MACAVEN

Articulate Systems provides voice communication products for the Mac.  Online support for Voice Link, VoiceWaves and VoiceWaves/Plus can be found in the Mac A Vendor Forum.  +


Artisoft
Artisoft  	Service: ARTISOFT

Users of Artisoft's complete line of LANtastic products, Ethernet products and NetMedia products will want to join this forum for full technical support.  Artisoft representatives are available online to provide you with complete and accurate answers to your questions.  The message sections host discussions for each Artisoft product and include special sections for programmers and new users.  +


ASDG
ASDG  	Service: AMIGAVENDOR

ASDG provides support for its AdPro in the ASDG section of the Amiga Vendor Forum.  +


Ashlar Incorporatedd
Ashlar Incorporated	Service: ASHLAR

Ashlar Incorporated provides support for its CAD applications in Section 8 of the CADD/CAM/CAE Vendor Forum.  Products supported include:  Vellum 2-D/3-D Mac, Vellum 2-D Windows, Vellum 2-D SGI, and SCORE.  +


ASP/Shareware Forum
ASP/Shareware Forum  	Service: ASPFORUM

The Association of Shareware Professionals' Forum caters to computer users who want to try software before buying it. The General Info library contains ASP program files you can download to your computer. By joining this forum, you can communicate directly with members of the ASP or other members of the forum who are knowledgeable about shareware and its advantages.  +


AST Research
AST Research	Service: ASTRESEARCH

Access AST Research's section of the Novell Vendor Forum to obtain support for its line of computer hardware products.  +


Asymetrix Corporation (Multimedia)
Asymetrix Corporation (Multimedia)	Service: MULTIVENDOR

Asymetrix supports its full line of Multimedia products in the Multimedia Vendors Forum.  +


Asymetrix Corporation
Asymetrix Corporation (Windows)  	Service: ASYMETRIX

Asymetrix Corporation produces ToolBook, an application development package for the Windows 3.0 environment. ToolBook is supported in the Asymetrix section of the Windows Third Party Applications A Forum.  +


Atari 8-Bit Forum
Atari 8-Bit Forum  	Service: ATARI8

The forum is not affiliated with Atari Corporation but is maintained by independent Forum Administrators (SysOps) and centers on the Atari 8-bit computer. The libraries contain programs, text files, help information, product reviews and transcripts of previous conferences. The Forum Administrators and others in the forum are willing to help you and answer your questions.  +


Atari File Finder
Atari File Finder  	Service: ATARIFF

Browsing through the Atari forum files has never been easier. The Atari File Finder is a comprehensive keyword-searchable database of files found in the Atari forums. Participating forums include the Atari ST Productivity Forum, Atari ST Arts Forum and Atari Vendors Forum. You can search by a keyword, file submission date, forum name, file type, file extension, file name or submitter's user ID number.  +


Atari Portfolio Forum
Atari Portfolio Forum  	Service: APORTFOLIO

The Atari Portfolio Forum provides support for Atari's newest computer, the hand-held Portfolio. Forum libraries and message sections contain information on telecommunications, database support, text editing, entertainment and more.  +


Atari ST Arts Forum
Atari ST Arts Forum  	Service: ATARIARTS

The Atari Arts and Entertainment Forum is one of five Atari Special Interest Group Forums. This forum supports and exchanges information pertaining to art and entertainment software for the Atari 16-Bit (ST) series of computers. Talk to other Atari owners through message boards or conference rooms and learn about the top-quality public domain graphics and entertainment software available through this forum.  +


Atari ST Productivity Forum
Atari ST Productivity Forum  	Service: ATARIPRO

The Atari ST Productivity Forum is also one of five Atari Special Interest Group Forums. This forum connects you with people all over the world who share your interest in the exchange of information and programs about business, telecommunications, programming and more. Check out this forum for support and information about productivity software for the Atari 16-Bit (ST) series of computers.  +


Atari Users Network
Atari Users Network  	Service: ATARINET

Atari computer users have several forums and areas covering their interests. These include forums for the 8-bit computer, the 16-bit computer, the Atari Portfolio, a vendor's forum and an electronic magazine.  +


Atari Vendors Forum
Atari Vendors Forum  	Service: ATARIVEN

The Atari Vendor Forum provides access to well-known Atari related software and hardware vendors. This forum includes the following companies: CodeHead Software, Gadgets By Small, Gribnif Software, ICD Inc., INTERSECT Software, ISD Marketing, Lexicor Software, MacDonald Associates, Maxwell CPU, Missionware Software, Oregon Research Associates, Precision Software, Soft-Logik Publishing and Supra Corporation. See each vendor's individual description within this section for a list of supported products. Support and product information can be obtained via the message boards and libraries.  +


ATI
ATI  	Service: AMIGAVENDOR

ATI provides support in the ATI section of the Amiga Vendor Forum for its Whap! communications program.  +


ATI Technologies Inc.
ATI Technologies Inc.	Service: ATITECH

Access the ATI section of the Graphics A Vendor Forum for support on ATI's full line of VGA, SVGA, High Color and True Color video systems and adapters.  +


Atticus Corporation
Atticus Corporation	Service: MACDVEN

Atticus provides support for Super 7 Utilities and other Atticus products in its section of the Mac D Vendor Forum.  +


Autodesk AutoCAD Forum
Autodesk AutoCAD Forum  	Service: ACAD

If you use or are considering using computer-aided design, join the Autodesk AutoCAD Forum for hints and techniques in using Autodesk's various products such as AutoCAD, AME and AutoShade. Inside the forum, members discuss CAD applications software, hardware, operating systems, languages, management and productivity. For quick, accurate answers to your questions, forum messages are monitored by Autodesk training, quality assurance, customer service, software development, marketing and administration personnel.  +


Autodesk Retail Products Forum
Autodesk Retail Products Forum  	Service: ARETAIL

Autodesk created this forum to keep its users up-to-date on current news and special items of interest about Autodesk or Generic Software products. Developments in the PC CADD industry are discussed in conferences and through the message boards. Questions directed to Autodesk are answered within 24 hours.  +


Autodesk Software Forum
Autodesk Software Forum  	Service: ASOFT

Autodesk provides this forum to support users of its multimedia and Science Series products and those who are interested in generating computer graphics. Products such as Animator, 3D Studio, CA Lab and Chaos: The Software are discussed in detail to help you understand the products and to improve your techniques. Also, Autodesk maintains a wish list to encourage you to make suggestions on ways to improve the products and policies.  +


Automated Design Systems
Automated Design Systems	Service: ADSINFO

Automated Design Systems produces Windows Workstation, a network management software product for the Windows environment.  Automated Design Systems provides support for Windows Workstation in the Automated Design System section of the Windows Third Party Applications D Forum.  +


Avant-Garde Software Inc.
Avant-Garde Software Inc.  	Service: AMIGAVENDOR

Avant-Garde Software supports its current product line which consists of Benchmark Modula-2 Software Construction Set; Simplified Amiga Library for Benchmark Modula-2; "C" Language Library for Benchmark Modula-2 and IFF & Image Resource Library for Benchmark Modula-2. Avant-Garde Software supports these products in the Amiga Vendor Forum.  +


Avatar Corp.
Avatar Corp.	Service: MACCVEN

Find support from Avatar Corp. for its products such as Avatar 4/16Mb token-ring card and token-ring gateway in the Mac C Vendor Forum.  +


Avery Dennison
Avery Dennison	Service: AVERY

Avery Dennison supports its line of products including the Personal Label Printer and LabelPro in the Avery section of the PC Vendor F Forum.  +


Banyan Forum
Banyan Forum  	Service: BANFORUM

The Banyan Forum provides direct access to Banyan System Inc. support personnel. Messages cover Banyan network products and more. Libraries contain patchware and shareware for improving the efficiency of your network.  +


Barefoot/Hybrid
Barefoot/Hybrid	Service: MIDIAVENDOR

Barefoot (formerly Hybrid Arts) provides support in its section of the MIDI A Vendor Forum for Atari computer MIDI/music products such as AudioTrack, EditTrack, EZ-Score Plus, GenEdit, the MidiPlexer, Music DTP and SmpteTrack.  +


Baseline Publishing (Macintosh)
Baseline Publishing (Macintosh)  	Service: MACCVEN

Baseline Publishing provides technical support for The Talking Moose, INIT Manager, One Shot and Thunder 7. Baseline Publishing also supports all Preferred Publishers products including Database, Vantage, DoubleTalk, Screenshot and Exposure Pro.  +


Baseline Publishing (Windows)
Baseline Publishing (Windows)	Service: WINAPD

Baseline Publishing provides technical support in its section of the Windows 3rd Party Applications D Forum for its series of screen and language utilities for the Windows environment.  Among the products supported are Personality, Vantage and Virtual Monitors.  +


BASIS International Forum
BASIS International Forum  	Service: BASIS

Primarily of interest to business application engineers, the BASIS International Forum provides product support for BASIS authored and distributed software products. Join the forum and attend regularly-scheduled online conferences. Download public domain software and review the company's application catalog.  +


BCD Associates
BCD Associates	Service: MULTIVEN

Support for BCD Associates video tape and video disc computer control interfaces can be found within the Multimedia Vendor Forum.  Online representatives are available to assist you with your technical questions.  +


Bell Atlantic
Bell Atlantic  	Service: THINX

Bell Atlantic produces and supports Thinx, a visual data management application program, in the Bell Atlantic section of the Windows Third Party Applications C Forum. +


Bentley Systems
Bentley Systems	Service: MSTATION

Bentley Systems, which is partly owned by Intergraph Corp., provides support for the MicroStation product line in the MicroStation section of the CADD/CAM/CAE Vendor Forum.  +


Berkeley Systems (Macintosh)
Berkeley Systems (Macintosh)  	Service: ADMAC

Berkeley Systems provides technical support in the Mac B Vendor Forum for After Dark, ScreenKeys, Stepping Out II, outSPOKEN, inLARGE and inTOUCH.  +


Berkeley Systems (Windows)
Berkeley Systems (Windows)  	Service: ADWIN

Berkeley Systems produces After Dark for Windows, a screen saver program for the Windows 3.0 environment. After Dark for Windows is supported in the Berkeley Systems section of the Windows Third Party Applications C Forum.  +


Best Power Technology
Best Power Technology	Service: BEST

Best Power supports its line of UPS monitoring products in its section of the Novell Vendor Forum.  +


Beyond, Inc.
Beyond, Inc.  	Service: BEYOND

Beyond representatives are available within the Beyond, Inc. section of PC Vendor C to answer your questions about BeyondMail.  +


Big Noise Software, Inc.
Big Noise Software, Inc.  	Service: MIDIAVENDOR

Big Noise Software provides support for its MIDI-based products in the MIDI AVendor Forum. Its products include Cadenza (a graphic sequencer for IBM compatibles) and the Big Noise Editor/Librarian.  +


Bitstream
Bitstream	Service: BITSTREAM

Bitstream produces a complete line of fonts and typographic-related products for the desktop publishing and word processing markets.  Support for Bitstream fonts and products, including MakeUp, Type Essentials and Facelift, can be found in the Bitstream section of the Desktop Publishing Vendor Forum.  +


Black Belt Systems
Black Belt Systems  	Service: AMIGAVENDOR

Black Belt Systems provides the Amiga technical community with highly sophisticated and unusual hardware and software. These products are supported in Black Belt Systems' section in the Amiga Vendor Forum.  +


BLOC Publishing Corporation
BLOC Publishing Corporation 	Service: BLOCPUB

BLOC Publishing Corporation produces productivity software for the IBM and compatibles. It provides support for FormTool, FormFiller, Personal Law Firm, FastPak Mail and Diskvision within its section of the PC Vendor D Forum.   +


Blue Lance
Blue Lance	Service: NOVVEN

Blue Lance supports its network management and administration applications such as LT Auditor, LT HelpDesk and LT Stat in its section of the Novell Vendor Forum.  +


Blyth Software Forum
Blyth Software Forum  	Service: BLYTH

The Blyth Software Forum is for those who are interested in Blyth's database programs and products. This forum provides Blyth users with technical support, as well as the ability to contact other Blyth users to share experiences and knowledge about the database products. Members are encouraged to share files through the various libraries contained in this forum.  +


Boca Research
Boca Research 	Service: BOCA

Boca provides support for its Boca modem line in its section of the Modem Vendor Forum.  +


Borland C++/DOS Forum
Borland C++/DOS Forum	Service: BCPPDOS

In this forum, users of software by Borland International exchange tips, techniques and any other information directly related to programming with Turbo Prolog, Turbo C, Turbo C++, Turbo Assembler and Turbo Debugger.  For information about C and C++ for Windows, see Borland C++/Windows Forum.  +


Borland C++/Windows Forum
Borland C++/Windows Forum	Service: BCPPWIN

This forum, operated by Borland's Technical Support Department, provides support for users of Borland's C, C++ and related programming tools in the Windows environment.  Here you can meet with other programmers and discuss topics from Borland Windows programming tools to advanced Wndows programming.  Numerous files about Borland's programming tools for Windows are available for viewing or downloading.  For information about C, C++ and Assember for DOS environments, see Borland C++/DOS Forum.  +


Borland dBase Forum
Borland dBASE Forum	Service: DBASE

Whether you use dBase as a database program or as a development tool, join the Borland dBase Forum to obtain support for all versions of dBase II, II and IV.  Besides getting help with using dBase's features, you can learn about how to use dBase with various 3rd party utilities and how to create runtime programs.  Also find out how to join a dBase user group in your area.  +


Borland Development Tools Forum
Borland Development Tools Forum	Service: BDEVTOOLS

Operated by Borland's Technical Support Department, this forum supports Borland development tools such as Paradox Engine for C++ and Pascal, ObjectVision, Brief and Interbase.  All kinds of developers participate in this forum to learn about using these Borland products and how to improve their individual applications.  The libraries are stuffed with files aimed at helping developers solve problems and improve productivity.  +


Borland GmbH Forum
Borland GmbH Forum	Service: BORGER

The Borland GmbH Forum provides technical support for Borland's German-speaking customer base.  Members correspond in German with other members and with representatives from Borland.  Files are available in the libraries that provide additional support for Borland's German products.  For additional Borland support, see Borland International.  +


Borland International
Borland International  	Service: BORLAND

In this area users of Borland software can obtain information about Borland International. Included are a what's new section containing Borland press announcements and other news, company and product information, and employment opportunities. The section also contains an R&D suggestion box and nine forums.  +


Borland Paradox DOS Forum
Borland Paradox DOS Forum	Service: PDOXDOS

The Borland Paradox DOS Forum is for users of Borland's Paradox database program in the DOS environment. Discuss topics such as installation, networking, updates, programming tips, and troubleshooting with Borland's Technical Support Department. Libraries contain enhancement programs and product information.  +


Borland Paradox Windows/OS2 Forum
Borland Paradox Windows/OS2 Forum	Service: PDOXWIN

The Borland Paradox Windows/OS2 Forum is for users of Borland's Paradox database program in the Windows or OS/2 environments. Support can also be otained for Borland's ObjectPAL. Members can discuss topics such as installation, networking, updates, programming tips, and troubleshooting with Borland's Technical Support Department, Libraries contain enhancement programs and product information.  +


Borland Pascal Forum
Borland Pascal Forum	Service: BPASCAL

Join this forum if you use the Pascal programming language.  You will find information about using Pascal in both DOS and Windows environments as well as information about graphics, networks and debugging techniques.  The message and library sections are non-version specific to make it easier for you to find the information you need.  A special read-only From Borland library is available where representatives from Borland upload helpful information about their products.  +


Borland Quattro Pro Forum
Borland Quattro Pro Forum	Service: QUATTROPRO

If you use Borland's Quattro, Quattro Pro or Quattro Pro for Windows spreadsheet programs, join this forum for online product information, news and technical support.  Borland Technical Support Representatives are online to answer your questions about printing, writing macros, networking and using Quattro Pro in general.  Members who are experienced in using Quattro Pro can answer you questions and help you solve problems.  For information about other Borland products, see the other Borland forum descriptions.  +


Brightwork Development
Brightwork Development  	Service: BRIGHT

Brightwork Development provides support for the following products in its support section of the PC Vendor D Forum: Sitelock, PS-Print, NetRemote, LAN Support Center and LAN Automatic Inventory.  +


Brown Bag Software
Brown Bag Software	Service: BROWNBAG

Brown Bag supports MindReader, PC-Outline and PowerMenu Plus in its support section of the PC Vendor G Forum.  +


ButtonWare, Inc.
ButtonWare, Inc.  	Service: PCVENA

ButtonWare provides support for the following products in its section of the PC Vendor A Forum: PC-File+, PC-Type II, Baker's Dozen, PC-Tickle, PC-Stylist and PC-Dial.  +


CA Application Development Forum
CA Application Development Forum	Service: CAIDEV

Computer Associates sponsors this forum primarily for users of CA application development solutions.  CA products discussed in the message section include CA-dBFast, a Windows database program, and CA-Realia mainframe-compatible products.  Find out how others are using the software and how you can apply their experiences to your own developmental needs.  Representatives from CA are online to answer technical quesitons about specific applications or problems.  For information on additional CA products, see the CA Clipper Forum, CA Productivity Solutions Forum and CA Vax/Unix Forum.  +


CA Clipper Forum
CA Clipper Forum	Service: CLIPPER

If you use Clipper to develope your own database applications, be sure to join the CA-Clipper Forum to learn more about Clipper and to offer tips on Clipper usage to other users.  This forum supports many topics of discussion about Clipper, including the program itself and its use with utilities and LAN products.  Learn how other members are using Clipper and get expert advise from CA representatives to fine tune your own projects.  For information on additional CA products, see the descriptions for the CA Application Development Forum, CA Productivitiy Solutions Forum, and CA Vax/Unix Fourm.  +


CA Clipper Germany Forum
CA Clipper Germany Forum	Service: CLIPGER

The CA Clipper Germany Forum supports the German-speaking customer base in Germany, Switzerland an dAustria.  Members can directly communicate in German with CA's technical and marketing staff or browse the forum's libraries for German programs and support.  For additional CA support, see the CA Clipper Forum.  +


CA Micro Germany Forum
CA Micro Germany Forum	Service: CAMICRO

The Computer Associates GmbH Forum provides technical support for German speaking users of German language products like the C++/CommonView, CA-Cricket Family, dbFast, Realizer, Superproject, Textor and UpToDate. The libraries contain drivers, upgrades and utilities. For information on programming with CLIPPER, visit the CA-Clipper Germany Forum.  +


CA Productivity Solutions Forum
CA Productivity Solutions Forum	Service: CAIPRO

The CA Productivity Solutions Forum, sponsored by Computer Associates, provides support to users of various CA programs such as CA-SuperCalc spreadsheet, CA-SuperProject project management and CA-Cricket Family graphics package.  Get technical help from CA representatives and other members for your current applications, or learn more about other CA products that work with your current system.  For information on additional CA products, see the CA Application Development Forum, CA Clipper Forum and CA Vax/Unix Forum.  +


CA Vax/Unix Forum
CA Vax/Unix Forum	Service: CAIMINI

The CA Vax/Unix Forum features discussions about Computer Associates' Vax and Unix products such as the CA-DB series of database products for the Vax and Unix and CA-Dataquery/Vax for easier information exchange between various Vax databases.  CA representatives are online to provide technical support through the libraries and message sections, as well as to introduce CA users and potential users to various CA products.  For information on additional CA products, see the CA Application Development Forum, CA Clipper Forum and CA Productivity Solutions Forum.  +


Cabletron Systems, Inc.
Cabletron Systems, Inc.  	Service: CTRON

Cabletron Systems, Inc. offers this forum to inform and support users of LAN services and products developed and manufactured by Cabletron for Ethernet, Token Ring and FDDI networks. Learn more about Cabletron's exclusive Integrated Network Architecture (INA) that allows you to build and manage a global, distributed network of interconnected LANs that work together regardless of which media type or network standard is used.  +


CADD/CAM/CAE Vendor Forum
CADD/CAM/CAE Vendor Forum  	Service: CADDVEN

The CADD/CAM/CAE Vendor Forum, managed by the League for Engineering Automation Productivity (LEAP), is dedicated to the support of computer-aided design, manufacturing and engineering software and hardware. Company representatives from Ashlar Incorporated, Bentley Systems, CadKey, Inc., Evolution Computing, IBM CAD, ISICAD,  Micro Engineering Solutions and Universal Technical Systems are currently online to provide technical support, information on product upgrades, new product announcements, and much more. See each vendor's individual description within this section for a list of supported products.  +


CADENCE Forum
CADENCE Forum	Service: CADENCE

The CADENCE Forum, brought to you by Miller Freeman Publishing, is a supplement to CADENCE Magazine and provides support for Autodesk's AutoCAD application. Download source code from the magazine as well as updates, upgrades and helpful hints from the forum's libraries. Also, you can address questions and comments directly to CADENCE Magazine's editors.  +


Cadkey, Inc.
Cadkey, Inc.	Service: CADKEY

Cadkey provides support for its full line of computer-aided design software in the Cadkey section of the CADD/CAM/CAE Vendor Forum.  +


CAI/ColorAge
CAI/ColorAge	Service: DTPVENDOR

CAI/ColorAge produces and provides technical support for Freedom of Press, a device-independent PostScript language compatible multi-platform interpreter, in the CAI/ColorAge section fo the Desktop Publishing Vendor Forum.  +


Campbell Services
Campbell Services  	Service: ONTIME

Campbell Services produces and supports OnTime for Windows, a personal information manager, in the Campbell Services section of the Windows Third Party Applications C Forum.  +


Canon Peripherals
Canon Support Forum  	Service: CANON

Visit the Canon Support Forum to receive technical support directly from Canon's Help Desk staff. The Canon Peripheral Forum provides support for Canon products such as Laser Beam printers, Bubble Jet printers, Scanners and the Navigator. This forum is an online supplement to Canon's Printer Division support, providing a direct link between you and the staff at Canon. Visit this forum to communicate with other users of Canon peripherals to share information and ideas and exchange helpful hints.  +


Canopus Research Forum
Canopus Research Forum	Service: CANOPUS

The Canopus Research Forum provides a place for computer users to come together to discuss industry trends, technologies and products.  Find out which products are deemed hot by computer users around the world and which are not.  Read the latest issues of the Canopus Report, written by Canopus Research President Wil Zachmann, and The Cheifet Letter, a newsletter producsed by the Computer Chronicles television show.  This forum also features honored guests from all areas of the computer industry.  +


CASE - DCI Forum
CASE - DCI Forum  	Service: CASEFORUM

The CASE - DCI Forum, sponsored by Digital Consulting, Inc., is available for software developers using CASE tools. From novices to more experienced users, members share information and helpful tips on using CASE tools anywhere in the development process. Through this forum, users keep informed about educational events sponsored by Digital Consulting and about CASE-NET, an international CASE user group.  +


Casio Inc.
Casio Inc.  	Service: PALMTOP

Casio Inc. provides support for its Casio B.O.S.S. line of electronic organizers in the Casio B.O.S.S. section of the Palmtop Forum.  +


CDROM Forum
CDROM Forum  	Service: CDROM

For information about CDROM technology, reviews of seminars and conference sessions, a calendar of upcoming CDROM events, comparisons of CDROM applications and product announcements, try the CDROM Forum.  +


CE Software
CE Software  	Service: MACAVEN

Access the CE Software support section of the Mac A Vendor Forum to obtain technical support for CE Software's full line of Macintosh products. These products include QuickMail, QuicKeys, Disktop, Alarming Events, Amazing Paint and CalendarMaker.  +


Central Coast Software
Central Coast Software  	Service: AMIGAVENDOR

Central Coast Software provides support for its Amiga utility titles including Quarterback, Quarterback Tools, DOS 2 DOS and MAC 2 DOS products within the Amiga Vendor Forum.  +


Central Point Software DOS Forum
Central Point Software DOS Forum 	Service: CPSDOS

In this forum, Central Point provides you with technical support and customer service regarding any and all Central Point Software DOS products such as CP Backup file backup system, CPAV anti-virus utility, and PCTools utilities.  The message and library sections are divided by type of product making it easy to find the information you need about the Central Point software you use.  For information about Central Point's software for Window and Macintosh environments, see the Central Point Software Windows and Macintosh Forum.  +


Central Point Software Windows and Mac Forum
Central Point Software Windows and Mac Forum	Service: CPSWINMAC

If you use Central Point software for Windows and Macintosh environments, join this forum to build your knowledge about programs such as CP Backup file backup system, CPAV anti-virus utility, Scrapbook+ visual data storage and retrieval utility and MacTools and Windows utilities.  Knowledgeable Central Point technical and customer support personnel are online to answer your questions and to help you decide which programs are right for your applicaitons.  While in this forum, browse through the libraries for additional information and support.  For information about Central Point's software for the DOS environment, see the Central Point Software DOS Forum.  +


Cheyenne Software
Cheyenne Software	Service: CHEYENNE

Cheyenne Software supports ARCserve, ARCserve/Open, ARCserve/Solo, Cheyenne Utilities for NetWare, FAXserve, InocuLAN and Monitrix LAN-based products in its support section fo the PC Vendor G Forum.  +


ChipSoft (DOS)
ChipSoft (DOS) 	Service: PCVENB

TurboTax is supported by ChipSoft in its section of the PC Vendor B Forum.  +


ChipSoft (Macintosh)
ChipSoft (Macintosh) 	Service: MACAVEN

ChipSoft supports its line of tax preparation products for the Macintosh in the Mac A Vendor Forum.  +


ChipSoft (Windows)
ChipSoft (Windows) 	Service: WINAPB

ChipSoft supports its line of tax preparation products for the Windows environment in the Windows 3rd Party Applications B Forum.  +


Clarion Software Forum
Clarion Software Forum	Service: CLARION

Clarion Software provides technical support and discussion areas for its family of database development products and compilers. Find support for Clarion Database Developer, Clarion Professional Developer, Personal Manager (Personal Developer), Report Writer and the TopSpeed Compilers (C, C++, Modula 2 and Pascal) in the Clarion Forum.  +


The Clarion Technical Journal
The Clarion Tech Journal	Service: PCVEND

The Clarion Tech Journal is the first and only technical magazine devoted to supporting the users of Clarion Professional Developer.  The journal features innovative, up-to-date technical articles covering all aspects of the Clarion database development environment and programming language.  Access its section of the PC Vendor D Forum to receive information regarding the publication.  +


Claris Corporation Forum
Claris Corporation Forum	Service: CLARIS

Claris Corporation's forum provides support for its products like AppleWorks, ClarisWorks, FileMaker, HyperCard, MacProject, MacWrite and Resolve. Talk with experts about problems or discuss Claris' products.  +


Cobb Group Applications Forum
Cobb Group Applications Forum	Service: ZNT:COBBAPP

The Cobb Group Applications Forum provides problem-solving tips and downloadable software for users of Lotus 1-2-3, DOS, and MicroSoft Windows.Get advice from the experts and answers to common questoins about your favorite applications.  Library sections include downloadable text from Cobb Group journals, utilities and shareware.  Part of ZiffNet.  +


Cobb Group Programming Forum
Cobb Group Programming Forum	Service: ZNT:COBBPROG

The Cobb Group Programming Forum provides downloadable files and source codes archived from the Cobb programming journals for Pascal, C, C++, Paradox and dBase users.  The forum is built on 12 Cobb language-specific journals.  The message board and keyword-searchable library sections are organized by programming language. Part of ZiffNet.  +


Coda Music Software
Coda Music Software	Service: CODA

Support for Finale and MusicProse products can be found in the Coda Music Software section of the MIDI B Vendor Forum.  Representatives are available to provide technical assistance. +


CodeHead Software
CodeHead Software  	Service: ATARIVEN

CodeHead Software produces utility and productivity software for the Atari ST. CodeHead provides support for these products in its section of the Atari Vendor Forum.  +


Cogent Data Technologies
Cogent Data Technologies	Service: COGENT

Cogent Data Technologies supports its E/Master family of Ethernet LAN adapters for EISA, ISA and MCA bus machines in its support section of the PC Vendor G Forum.  +


Cognetics
Cognetics	Service: COGNETICS

Hyperties, an industrial-strength hypertext and multimedia product for the IBM-PC is supported in the Multimedia Vendor Forum.  Representatives from Cognetics are available online to provide technical assistance.  +


Color Computer Forum
Color Computer Forum  	Service: COCO

The TRS-80 CoCo Users Group provides independent support for owners and operators of the TRS-80 Color Computer and related peripherals. Technical information, programming examples, and a forum where CoCo owners can meet and discuss problems and desires are also included. +


Command Software Systems
Command Software Systems	Service: PCVENF

Command Software Systems, developer of security and anti-virus software, will answer your technical questions and provide product inforamtion within its section of the PC Vendor F Forum.  Its product line includes TheEMCEE, F-PROT, FREEZE!!, Security Guardian and LANGARD.  +


Commodore Application Forum
Commodore Application Forum  	Service: CBMAPP

The Commodore Application Forum disseminates information and support to users of Commodore 8-bit computers, including terminal and bulletin board software, word processing, speech synthesis and education. Programming and technical information on the C-128, C-64 and various public domain programs are also available.  +


Commodore Arts and Games Forum
Commodore Arts and Games Forum  	Service: CBMART

Commodore Arts and Games Forum is an interactive electronic forum dedicated to creative and entertainment applications for the Commodore 8-bit line of computers, including games, graphics and music. Support is also provided for all games and Geos programming.  +


Commodore Newsletter
Commodore Newsletter  	Service: CBMNEWS

The Commodore Business Machines Newsletter offers information on Commodore computers direct from the manufacturer, including new product announcements, software updates and user group information. You can also visit the Commodore Service Forum, where CBM representatives provide assistance to Commodore computer owners.  +


Commodore Service Forum
Commodore Service Forum  	Service: CBMSERVICE

Commodore Service Forum is staffed and maintained by Commodore Business Machines, Inc. and offers direct customer support for all Commodore computer models. There are no data libraries, but message and conferencing facilities are provided.  +


Communication Intelligence Corp.
Communication Intelligence Corp.	Service: COMINT

CIC offers support for its Handwriter Recognition System and PenDOS Operating Environment in the CIC section of the Pen Technology Forum.  +


Compaq Connection
Compaq Connection	Service: COMPAQ

The Compaq Connection provides access to support and information about Compaq products. The Connection contains two information sections:  a Product Support Services section where you can find information about available support services for Compaq products and an Authorized Training Information section which contains product training information for users and resellers.  From the Connection, you can access the Compaq Forum for technical support and to download files for Compaq hardware products.  The Compaq Independent Hardware and Software Vendors (ISHV) Forum is accessible from the Connection and is only available for Compaq's licensed vendors.  For more information about the Compaq Forum, see its description in the Directory.  +


Compaq Forum
Compaq Forum	Service: CPQFORUM

For technical support for your Compaq hardware components, join the Compaq Forum, an integral part of the Compaq Connection.  Compaq, which manufactures PC systems and desktop, portable, laptop and notebook personal computers, sponsors this forum enabling you to ask questions and receive answers from Compaq representatives and other expert users.  Besides message sections for each type of component Compaq manufactures, a Customer Service section is also available for your nontechnical quesitons.  For additional information and services from Compaq, see the Compaq Connection description in the Directory.  +


Complementary Solutions Inc.
Complementary Solutions Inc.  	Service: PCVEND

In its sectoin of the PC Vendor D Forum, Complementary Solutions Inc. provides technical support for TELEMATE and the following TELEMATE add-ons: Report Writer, Plus, ANI reporting, Global and Phone Book.  +


The Complete PC
The Complete PC	Service: COMPLETEPC

The Complete PC provides support for products such as CloseUp, Lap Link Pro and pcANYWHERE in its section of the Modem Vendor Forum.  +


Component Software
Component Software	Service: MACBVEN

To obtain assistance with Component Software products such as Icon Factory,  Intelligent Developer, PictureAccess, SuperPalette and StepAhead, access the Component Software section of the Mac B Vendor Forum. +


CompuAdd Forum
CompuAdd Forum	Service: COMPUADD

The CompuAdd Forum offers complete support for CompuAdd systems from CompuAdd's technical support and engineering staffs.  You will find information in the message section about all CompuAdd systems including desktops, laptops, notebooks and Sparc compatible CPUs.  Check out the library section to find support for the collection of diagnostics and setup utilities that are shipped with each CompuAdd system, as well as press releases about the products and vendor locations.  +


Computer Art Forum
Computer Art Forum	Service: COMART

The Computer Art Forum covers images generated by or created on a computer using a paint program.  The libraries contain thousands of colorful and imaginative GIF (Graphic Interchange Format) images, from 2-color images to 256-color fractal displays (like those seen in a kaleidoscope).  Information is available on downloading and displaying these images, which can be displayed on nearly any type of computer system.  Images available include anything from animals and science fiction scenes to fractals and pioneering graphic images from the early days of computer technology.  +


Computer Club Forum
Computer Club Forum  	Service: CLUB

Computer Club Forum is the home for users of computers no longer supported by the manufacturers, or which have no specific forum dedicated to their hardware on CompuServe. Computers supported in CLUB include Actrix, Adam, Amstrad, Apricot, Eagle, Kaypro, Ohio Scientific, Panasonic, Sanyo, all Timex/Sinclair hardware and the Victor 9000, although users of other computer systems are always welcome.  +


Computer Language Forum
Computer Language Forum  	Service: CLMFORUM

The Computer Language Magazine forum contains source code, programs, and articles mentioned in the magazine along with additional information on computer languages. Languages and topics covered in the forum and libraries include: 'C' language and tools; debugging techniques; Object Oriented Programming; software engineering; shareware/freeware; Modula-2; ADA, the high order language designated by the Department of Defense as the official language for all future embedded computer application programs; Computer Aided Software Engineering including Toolworks, EasyCASE and EasyCASE+; Embedded Systems Programming; and TesSeRact and other TSR applications, which can take advantage of 4-dimensional storage capabilities. You can also find information on subscriptions to the magazine.  +


Computer Peripherals
Computer Peripherals	Service: COMPUTERPERIPH

Computer Peripherals provides support for its modems in its section of the Modem Vendor Forum.  +


Computer Presentations Inc.
Computer Presentations Inc.  	Service: CPI

Computer Presentations Inc. produces a series of image processing applications for the Windows environment including Color Lab and Image Prep, which are supported in the CPI section on the Windows Third Party Applications B Forum.  +


Computer Shopper  Forum
Computer Shopper Forum  	Service: ZNT:COMPSHOP

The Computer Shopper Forum is part of ZiffNet's Buyer's Resources section that helps you make more informed decisions about buying  personal computer products. The forum includes buying advice sections for systems, peripherals and software; sections about technology trends; and areas where you can get advice from Computer Shopper editors and columnists.  Download related threads, buying guides and lists of buying tips.  Part of ZiffNet.  +


Computer Tyme
Computer Tyme	Service: COMPTYME

Computer Tyme supports products such as MarxMenu and the Network Survival Kit in its section fo the Novell Vendor Forum.  +


Connectix
Connectix  	Service: MACAVEN

Connectix supports its HAND-Off II, MAXIMA, Mode32, MC73 PMMU and Virtual in the Mac A Vendor Forum.  +


Contact Software International
Contact Software International  	Service: CONTACT

Access the Contact Software section of the PC Vendor E Forum to obtain assistance from the Contact representatives for its contact management software, ACT!  +


Cool Shoes Software
Cool Shoes Software	Service: MIDIBVEN

DOS-based interactive music software is provided and supported by Cool Shoes Software.  Visit the MIDI B Vendor Forum for technical support and guidance by Cool Shoes Software Representatives.  +


Corel Forum
Corel Forum  	Service: COREL

Join the Corel Forum for technical support for graphics products such as CorelDRAW! 2.x and 3.0, CorelDRAW! for OS/2 and CorelSCSI.  Each product has a separate message section enabling representatives from Corel and other expert users to quickly find and answer your questions.  A Customer Service section answers nontechnical questions, and a Media Relations section contains press releases and information about new products, special contests and events.  +


CoStar Corporation
CoStar Corporation  	Service: COSTAR

Find support for CoStar Corporation's printing products in the CoStar section of the Mac C Vendor Forum. CoStar develops small specialty printers and software for labels and envelopes including LabelWriter (a palm-sized label printer) and AddressWriter (a printer designed specifically to print envelopes, postcards and labels).  +


Covox
Covox	Service: COVOX

If you use any of Covox's MIDI/music products such as Speech Thing or Sound Master II, access the MIDI B Vendor Forum to obtain support from Covox.  +


CP/M Forum
CP/M Forum  	Service: CPMFORUM

The CP/M Forum is dedicated to users of the CP/M 8-bit and 16-bit computer operating systems. Members exchange information and discuss problems with other CP/M users. In addition to discussing CP/M itself, programs that run on CP/M computers such as word processors and database programs are discussed.  +


Creative Systems Programming
Creative Systems Programming	Service: GCPSUPPORT

Creative Systems Programming provides support for Golden Commpass, its CompuServe interface developed for OS/2, in its section of the OS/2 Vendor Forum. +


Crosstalk Forum
Crosstalk Forum	Service: XTALK

Software products developed and marketed by DCA/Crosstalk Communications are featured in this forum. The forum also offers libraries of data files for use with the products, a conferencing facility, bulletins and a message base for each product. +


CTOS/Open Forum
CTOS/Open Forum	Service: CTOS

Unisys provides support for its family of Workstations and its client/server technology in the CTOS/Open Forum. Discuss the latest product information, events, training, marketing news and shareware with CTOS' technical staff and other users. The libraries contain press releases, application tips, schedules of CTOS events, training schedules and documentation listings. +


Ctrlalt Associates
Ctrlalt Associates  	Service: PCVENA

Ctrlalt Associates support its full line of products including CTRLALT, CTRLALT PLUS, STACKEY and BATUTIL in its section of the PC Vendor A Forum.  +


Cumulus Corporation
Cumulus Corporation  	Service: PCVEND

Cumulus Corporation designs and manufactures a complete line of PCs, custom memory products and mass storage devices. Systems are available in 386sx, 386dx, 486 and other technologically advanced configurations. Find support for these products in the Cumulus Corporation section of the PC Vendor D Forum.  +


Custom Technologies
Custom Technologies  	Service: PCVENA

The CheckMate series and Magic Menus are supported by Custom Technologies in the PC Vendor A Forum.  +


DacEasy
DacEasy  	Service: PCVENB

Lucid 3D spreadsheet, Rolodex Live, the Lightning Disk accelerating package and the Breakthru 286 accelerator cards are supported by DacEasy in the PC Vendor B Forum.  +


Data Access Corporation Forum
Data Access Corporation Forum  	Service: DACCESS

Join the Data Access Corporation Forum and investigate software products like DataFlex and OfficeWorks. Here you will find technical support, a library of programs and informative discussions from users of Data Access products. Technical bulletins, programming techniques and training are available when you join the Data Access Corporation Forum.  +


Data Based Advisor Forum
Data Based Advisor Forum  	Service: DBADVISOR

Database troubles? Join the Data Based Advisor sponsored by Data Based Advisor magazine to hear the latest in databse topics, trends, bugs and fixes. Writers, developers and consultants offer advice, help information and valuable insights. More than 50 vendors participate in offering free and timely product support.  In the message sections, members discuss current industry news, database products and development, third party add-ons and consulting issues. Libraries contain source code, demos and product information.  +


Databook Incorporated
Databook Incorporated  	Service: DATABOOK

Databook provides support in its section of the Palmtop Forum for its products which support the credit-card size IC memory cards used in palmtop and notebook computers.  +


DataEase International Forum
DataEase International Forum	Service: DATAEASE

Relational databases are easy to build using DataEase's line of products. Even if you have no programming experience, you can learn to use DataEase for DOS or OS/2 or DataEase Express for Windows. Access the DataEase Forum to find out more about DataEase's product line.  +


Dataquest Online
Dataquest Online	Service: DATAQUEST

Dataquest Online, offered by Dataquest Incorporated, provides worldwide market coverage of the communications, computer systems, document management semiconducter, services and software sectors for the information technology industry.  This service includes: 1) Dataquest Alert, an event-driven collection of Dataquest's analyses of the most significant product, corporate and governmental activities that Dataquest serves; 2) Dataquest's Service Industry Newsletter, which provides weekly excerpts on events and trends in software support servioces and tools; and 3) Dataquests's Executive Summary, presented each Thursday, which reviews the findings of recent Dataquest research studies.  $


Datastorm Technologies Support Forum
Datastorm Technologies Support Forum 	Service: DATASTORM

The Datastorm Technologies Support Forum offers support for users of the ProComm communications products, such as ProComm, PROCOMM PLUS, Procomm Plus Network version and HotWire. Libraries offer communications utilities and help with modem configuration.  +


DaVinci
DaVinci  	Service: DAVINCI

DaVinci provides support for DaVinci E-Mail, an electronic mail handling software product for the Windows environment, in the DaVinci section of the Windows Third Party Applications A Forum.  +


Daystar Digital
Daystar Digital  	Service: MACAVEN

For technical support or product information on any Daystar Digital product, access the Daystar Digital section of the Mac A Vendor Forum.  +


DBMS Forum
DBMS Forum	Service: DBMSFORUM

Communicate directly with the authors and editors of DBMS, a magazine that provides information about database management systems programming, client-server systems, front-ends to databases and other dtabase management hardware and software issues.  Converse with other members of the forum to learn more about specific database management products such as UNIX, dBase, Paradox, SQL Server and Clipper, and about the magazine itself.  +


DEC PC Forum
DEC PC Forum  	Service: DECPC

The DEC PC Forum is intended for users of Digital Equipment Corporation (DEC) personal computers. Members exchange information, ideas, public domain programs and problems concerning DEC PCs with other members.  +


DEC Users Network
DEC Users Network  	Service: DECUNET

The DEC Users Network contains three forums: the DEC PC Forum, the PDP-11 Forum and the VAX Forum.  +


Dell Computer Corporation
Dell Computer Corporation	Service: NOVVEN

Dell provides support for servers running Novell NetWare in its section of the Novell Vendor Forum. For more information about Dell computers, see the Dell Forum. +


Dell Forum
Dell Forum  	Service: DELL

Users of Dell computers should join this forum to learn more about Dell systems such as the Performace EISA, Performance ISA, Dim/Pre Portable and Dim/Pre Tower.  A Flash Bios Upgrades section contains the latest bios upgrade for systems that support the Flash Bios function.  While in the forum, make suggestions directly to Dell about the computer systems or forum.  +


Delrina Technology
Delrina Technology  	Service: DELRINA

Delrina Technology supports its series of form development and facsimile creation products including PerForm, Perform Pro, PosFAX, WinFax and the Amaze line of calendar products in the Delrina Forum.  +


DeltaPoint
DeltaPoint  (Mac)	Service: MACAVEN

MindWrite, Trapeze, Express, DeltaGraph and Taste are supported by DeltaPoint within its support section of the Mac A Vendor Forum.  +


DeltaPoint (Windows)
DeltaPoint (Windows)	Service: WINAPD

DeltaPoint provides support for its products in its section of the Windows 3rd Party Applications D Forum. +


Deneba Software
Deneba Software  	Service: MACBVEN

Access the Deneba Software section of the Mac B Vendor Forum for assistance with Canvas, UltraPaint, Spelling Coach Professional, Big Thesaurus and Comment.  +


Describe
Describe	Service: DESCRIBE

Users of the DeScribe word processor can obtain technical support directly from DeScribe in its sectoin of the PC Vendor A Forum. +


Designer Template Collections
Designer Template Collections	Service: ZNT:FORMS

Designer Templates are professionally designed, easily downloadable templates which help users of spreadsheets and word processors produce professional-looking documents, forms and reports, regardless of skill level. Collections are available for a number of applications, including Lotus 1-2-3, Microsoft Excel, Borland Quattro Pro and WordPerfect. Part of ZiffNet. +


Desktop Publishing Forum
Desktop Publishing Forum  	Service: DTPFORUM

The Desktop Publishing forum provides information and tools for anyone who uses, plays with, or makes their living via electronic publishing, design, advertising, non-fiction writing, and/or printing. Forum message cover hardware, layout, design and printing. A classified ads section is available. The libraries contain utilities, fonts, demos, reviews and "publication quality" desktop publishing templates, photos, and line and clip art.  +


Deutches Computer Forum
Deutsches Computer Forum	Service: GERNET

The Deutsches Computer Forum provides a place for German-speaking CompuServe members to discuss German-, Swiss- and Austrian- related topics of interest such as sports, politics, games, travel and computers.  The libraries are packed with software utilities, calendars of events and hints for navigating through CompuServe -- and German-speaking countries.  +


Development Technologies
Development Technologies	Service: DEVTECH

Access Development Technologies' section of the OS/2 Vendor Forum to obtain support for DeskMan, its OS/2 workplace shell manager. +


Diamond Computer Systems
Diamond Computer Systems	Service: DMNDONLINE

Diamond Computer Systems offers graphics adapters and other multimedia products for PCs. Access the Diamond Computer Systems section of the Graphics B Vendor Forum to obtain technical support for Diamond's line of Stealth, Viper and SpeedStar cards.  +


Digital Eclipse
Digital Eclipse	Service: MACDVEN

Digital Eclipse provides support for its sound and microphone products, including OTA and Zounds, in its section of the Mac D Vendor Forum.  +


Digital Vision
Digital Vision  	Service: DIGVIS

Digital Vision offers technical support for its ComputerEyes line of digitizers in the Digital Vision section of the Graphics Vendor Forum.  +


Digitalk Forum
Digitalk Forum  	Service: DIGITALK

The Digitalk Forum provides helpful information about the SmallTalk/V programming language and development environment directly from the staff at Digitalk and from other users. Members discuss Digitalk applications in the Macintosh, DOS, OS/2 and MS Windows environments. Visit the libraries for more tips and general information, periodic digests of the SmallTalk/V Scoop newsletter and user group listings.  +


Digital's PC Integration Forum
Digital's PC Integration Forum  	Service: DECPCI

Sponsored by Digital's Personal Computing Systems Group (PCSG), this forum provides support for Digital's PC integration software and hardware such as PATHWORKS for DOS, Macintosh, VMS, Ultrix and OS/2. It also provides support for the DECpc family of personal computers and peripherals and the EtherWORKS family of network connectivity products. In this forum, find answers to your questions or just chat with others about PATHWORKS applications.  +


Dr. Dobb's Journal
Dr. Dobb's Journal  	Service: DDJ

In the electronic edition of Dr. Dobb's Journal, you can gather information about computer languages, tools, utilities, algorithms and programming techniques. In addition, reviews of commercial software development tools and libraries available to the professional microcomputer programmer are presented. You may also submit articles that will be reviewed for use in future publications.  +


Dr. Neuhaus Forum
Dr. Neuhaus Forum	Service: NEUHAUS

German-speaking members should join this forum for technical support and information about Dr. Neuhaus communications products.  Learn more about how to use Dr. Neuhaus products such as FURY modems, NICCY ISDN modems, FAXY fax boards and CONNY X.25 and POWERLan products.  Support is also available for the remote communications software program, Carbon Copy, which is distributed by Dr. Neuhaus.  Answers to many common questions are included in the libraries.  +


Dr. T's
Dr. T's	Service: MIDICVEN

Dr. T's supports its products such as Copyist, KCS and X-oR (an editor/librarian product) in its section of the MIDI C Vendor Forum. +


DSI Software Systems
DSI Software Systems	Service: PCVENE

DSI Software Systems has a complete family of contact management products to match the needs of any IBM-compatible user. Its support representatives are available in the PC Vendor E Forum to answer your questions regarding the entire product line. +


DTP Vendor Forum
DTP Vendor Forum  	Service: DTPVENDOR

The DTP Vendor Forum, supported by the same operators of the Desktop Publishing Forum, is available for those who use desktop publishing on the job or just for fun. Members ask questions about their desktop publishers to specific vendors such as Bitstream, CAI/ColorAge, EFI Support, Fontbank, Frame Technology, Hyphen, Monotype, QMS, Scitex, Sigma Designs, Timeworks and XChange or engage in lively discussions with other members who enjoy desktop publishing. While in the forum, visit the libraries to learn more about the vendors and their products. Members of the DTP Forum are encouraged to join for further desktop publishing support.  +


Dvorak Dvelopment
Dvorak Dvelopment	Service: NAVCIS

Access the PC Vendor F Forum to obtain technical support and product information for Dvorak Dvelopment's NavCIS Program.  +


EETNet
EETNet  	Service: EETNET

The Electronic Engineering Times newspaper provides forums for electronic engineers to exchange information and ideas with other engineers and companies. While in EETNet, check out the forums: the Engineering Forum to discuss technical issues and get help with design problems; or the International Forum to talk with engineers in Europe and Asia about professional, cultural and career matters. EETNet also provides headline news from the EE Times to brief you on what is happening in the world of electronics, as well as current job opportunities for electronic engineers.  +


EFI Support
EFI Support	Service: EFISUPPORT

Electronics for Imaging (EFI) provides support for its color management system products such as Cachet Color Editor and EfiColor in its section fo the DTP Vendor Forum. +


Eicon Forum
Eicon Forum	Service: EICON

The Eicon Forum discusses Eicon products such as Access for Windows and Access for DOS emulation programs, OSI Gateway, tookits and routers for many types of communication systems.  Members receive technical support for Eicon products from company representatives and other experienced users.  A PR/Announcements section in the forum publishes product-release information before it hits the newsstand.  Downloadable product reviews and help files are available in the forum libraries.  +


E-Mu Systems
E-Mu Systems  	Service: MIDIAVENDOR

Find support for E-Mu Systems in the E-Mu Systems section of the MIDI A Vendor Forum. E-Mu manufactures sampling keyboards such as Emulator II, Emulator III, Proteus/1 and Proteus/2, along with an electric piano module called Proformance.  +


Enable Software, Inc.
Enable Software, Inc.  	Service: PCVENA

Enable Software supports ENABLE/OA and ENABLE/CE in the PC Vendor A Forum. ENABLE is a five-function integrated product for the IBM PC and compatible computers.  +


Engineering Automation Productivity Forum
Engineering Automation Productivity Forum 	Service: LEAP

The Engineering Automation Productivity Forum, sponsored by the League for Engineering Automation Productivity (LEAP), hosts discussions about CADD/CAM and other programs that are used by engineers, architects and other professionals for computer-aided design. Members help one another find the right software programs for specific applications and draw from their own expertise to offer tips and techniques on using the programs. The libraries are also full of articles about engineering technology and software applications.  +


Environmental Systems Research Institure
Environmental Systems Research Institure	Service: ESRI

ESRI provides support for its geographic information systems and related CAD programs including ARC/INFO, ArcCAD and ArcView in the CADD/CAM/CAE Vendor Forum. +


Epson Forum
Epson Forum  	Service: EPSON

The Epson Forum provides Epson microcomputer printer users with product information, technical assistance, public domain software and a nationwide communications network. Also included are a message exchange area, database 'reference libraries' and forums that offer the Epson user valuable technical insight into the product's use. Representatives from Epson make frequent appearances to answer questions.  +


European Forum
European Forum	Service: EURFORUM

The European Forum provides information on PCs and compatibles specific to Europe. The forum contains information on accessing CompuServe from Europe, answers to questions regarding modem configuration and software needs, and general issues and questions of interest to European users.  +


Eventide
Eventide	Service: EVENTIDE

Eventide patented the original "harmonizer" which allows vocalists to create harmony parts in performance.  Eventide Representatives are providing technical support within the MIDI A Vendor Forum.  +


Evolution Computing
Evolution Computing  	EVOLUTION

Evolution Computing provides support for its DOS-based computer aided design products, EasyCAD and FastCAD, in the EasyCAD/FastCAD section of the CADD/CAM/CAE Vendor Forum.  +


Ex Machina, Inc.
Ex Machina, Inc.	Service: MACAVEN

Support for Notify!, a link between System 7-savvy Mac programs and pocket pages via modem and standard commercial paging services, can be found in the Mac A Vendor Forum.  Representatives are available online to provide technical assistance.  +


Executives Online
Executives Online	Service: ZNT:EXEC

The Executives Online forum gives you direct access to industry leaders who visit to discuss new products, company strategies and industry news. Past guests have included Borland's Philippe Kahn, Dell's Michael Dell, Microsoft's Mike Maples and IBM's OS/2 2.0 team led by Lee Reiswig. Part of ZiffNet.  +


Faircom
Faircom	Service: PCVENF

Faircom supports CTree and CTreePlus in its section of the PC Vendor F Forum.  +


Farallon (DOS)
Farallon (DOS) 	Service: FARAPC

Access the Farallon section of the PC Vendor E Forum to get support for PhoneNET Talk Software, PhoneNET Card PC for Local Talk and Timbuktu.


Farallon (Macintosh)
Farallon (Macintosh)	Service: FARAMAC

Farallon supports its complete line of Macintosh products within its section of Mac C Vendor forum.  +


Federation of International Distributors (FID) Forum
Federation of International Distributers (FID) Forum	Service: FEDERATION

The Federation of International Distributors, an association of international Macintosh, OS/2, Windows, NeXT, UNIX and MS-DOS distributors and republishers, provides this forum for its members to discuss industry concerns and establish international business protocol standards with members of the International Managers' Club (IMC).  Upcoming Federation events are posted in the message section.  This forum also serves as a resource for developers and manufacterers seeking qualified international distributors for marketing their products.  +


Fifth Generation Systems Forum
Fifth Generation Systems Forum	Service: FIFTH

Whether you are a new or experienced user of Fifth Generation Systems products for the Macintosh, you will find technical support in this forum.  Learn more about using programs such as Powerstation, Suitcase II, Copy Doubler Disk Doubler and Pyro! from representatives at FGS and from experienced users.  Find inforamtion about a specific program or just chat with other users of FGS products.  +


Fine Art Forum
Fine Art Forum	Service: FINEART

Do you have a favorite artist or are you a budding artist yourself? Then enter the world of fine art in the Fine Art Forum. Sponsored by the Art Cellar Exchange magazine, the members of this forum participate in discussions about renowned and obscure artists, popular galleries around the world and paintings of specific subjects.  A Classifieds section is available for artists and others to post positions and items for sale.  +


The FocServices FocForum
The FocServices FocForum	Service: FOCSERVICES

The FocServices FocForum provides educational course schedules, marketing information and publication articles about using the FOCUS programming language.  The message and library sections are divided by United States regions such as Northeast, Northwest and Western and include sections for Canada and International so you can easily find educational seminar and course schedules taking place in your area.  Another section, Systems Journals, contains dowloadable codes enabling you to read back issues of Focus Flash.  For more information about FOCUS products, see FocWizards FocForum, the FUSE, and the FOCUS Connection.  +


The FOCUS Connection
The FOCUS Connection	Service: FOCUS

The FocConnection, sponsored by Information Builders, Inc., is an online information service that links IBI and users of the FOCUS programming language.  A variety of support services are available in the FocConnection such as technical databases, monthly updates about coming features and software development, educational course schedules and two technical support forums.  For more information about the FOCUS forums, see FocWizards FocForum, the FocServices FocForum, and the FUSE Forum.  +


FocWizards FocForum
FocWizards FocForum	Service: FOCWIZARDS

If you cannot find the answer to your question about using the FOCUS programming language, ask one of the FOCUS gurus in the FocWizards forum.  The message sections include topics such as using FOCUS for report preparation, database design, file maintenance and Level5.  Ask your question in the appropriate message section and a sysop or other FocWizard will reply with the answer.  For additional FOCUS support, see the FocService FocForum, the FUSE Forum, and the Focus Connection.  +


Folio Corporation
Folio Corporation	Service: FOLIO

Access Folio's section of the Novell Vendor Forum to obtain support for Folio's line of sofware products such as MailBag and Views.  +


FontBank
FontBank	Service: FONTBANK

FontBank produces a complete line of fonts for the desktop publishing and word processing markets. Support is provided for the fonts in the FontBank section of the Desktop Publishing Vendor Forum.  +


Foresight Corporation
Foresight Corporation  	Service: PCVENA

Support for Drafix Windows CAD, Drafix CAD Ultra, Otto and Drafix CAD Overlay is provided by Foresight in the PC Vendor A Forum.  +


Forth Forum/Creative Solutions
Forth Forum/Creative Solutions  	Service: FORTH

This forum is sponsored by Creative Solutions, Inc., to support its Forth products and to answer all general Forth questions. Forth is a powerful but compact programming language well-loved by programmers.  +


Frame Technology
Frame Technology	Service: DTPVENDOR

Frame Technology provides support for FrameMaker, its desktop publishing product, in the Frame Technology section of the Desktop Publishing Vendor Forum. +


Funk Forum
Funk Software	Service: FUNK

Funk Software provides technical support for its products including Sideways, Worksheet Utilities, P.D. Queue, Formula Editor, Noteworthy, AppMeter and Proxy within Funk Software section of the PC Vendor F Forum.  +


FUSE Forum
FUSE Forum	Service: FUSE

The FOCUS Users Group (FUSE) Forum is primarily for discussions among FOCusers about FOCUS and related topics.  In the message sections, members can ask one another questions about programming techniques using the FOCUS language and share trouble-shooting and problem-solving tips.  A Fuseviews section is available for members to share opinions about FOCUS Users Group topics of interest.  For more information about FOCUS forums, see FocWizards FocForum, FocServices FocForum and the FOCUS Connection.  +


Future Soft Engineering
Future Soft Engineering  	Service: DYNACOMM

Future Soft Engineering, Inc. provides support for its multiple platform communications software including DynaComm Asynchronous Edition and DynaComm Synchronous Edition for 3270 communications in the Future Soft section of the Windows Third Party Applications A Forum.  +


Futurus Corporation
Futurus Corporation	Service: PCVENG

Futurus supports its TEAM product line it its support section of the PC Vendor G Forum.  +


Gadgets By Small, Inc.
Gadgets By Small, Inc.  	Service: ATARIVEN

In the Atari Vendor Forum, Gadgets By Small supports its Macintosh Plus emulator for the Atari ST series computer, the Spectre 128.  +


GammaLink
GammaLink  	Service: PCVEND

GammaLink provides product support for its GammaLink Network-Ready Micro-Processor Based Fax Boards and GammaLink Software in its section of the PC Vendor D forum.  +


Gateway 2000
Gateway 2000  	Service: GATEWAY

Gateway 2000 representatives support Gateway's full line of IBM compatible microcomputers including 26/86/16, 386SX-16, 386SX-20 cache, 386-25, 386-33 cache, 486-25 cache and 486-33 cache systems within Gateway's section of the PC Vendor C Forum.  +


GCC Technologies
GCC Technologies  	Service: MACBVEN

Find technical support from GCC Technologies within its support section of the Mac B Vendor Forum. Some of the products supported include GCC's complete line of hard disk drives, QuickEnvelope, QuickSpool II and Headliners.  +


Genus Inc.
Genus Inc.  	Service: GENUS

Genus Inc. provides support for its full line of graphics programming toolkits in the Genus section of the Graphics Vendor Forum.  +


Geographix
Geographix  	Service: WINAPA

Geographix produces a series of seismographic and geological analysis applications for the Windows environment including SeisMap, which are supported in the Geographix section of the Windows Third Party Applications A Forum.  +


GFA Software
GFA Software	Service: WINAPC

GFA sponsors a section in the Windows 3rd Party Applications C Forum to support its GFA-BASIC, a Basic development tool for the Windows environment.  +


Gilbert & Associates
Gilbert & Associates	VIEWZ

Gilbert & Associates produces and supports VIEWz, a professional productivity and document management software package for the Windows environment, in the Gilbert & Associates section of the Windows 3rd Party Applications C Forum.  +


Global Softworks Ltd.
Global Softworks Ltd.  	Service: GSLSUPPORT

Global Softworks provides support for its GeoClips clip art packages in the Graphics Vendor Forum. GeoClips packages provide over 250 pieces of high quality original and public domain clip art for GeoDraw, suitable for both business or personal use.  +


Global Village Communications
Global Village Communications	Service: GLOBAL

Global Village Communications provides support for PowerPort and TelePort in its section of the Modem Vendor Forum.  +


GO Corp.
GO Corp.	Service: GOCORP

Find technical support for GO Corp's PenPoint, a general purpose operating system, in the GO Corp. section Pen Technology Forum.  +


The 'GO GRAPHICS' Tutorial
The 'GO GRAPHICS' Tutorial	Service: PIC

If you are new to CompuServe or to graphics forums, access the 'GO GRAPHICS' tutorial. Through the online tutorial you can learn about graphics, GIF, the Graphics Forums and your computer. Extensive lessons geared toward the graphics novice or newcomer to the Grahics Forum help users spend their time online more efficiently. Included in the Tutorial are specific directions on downloading, viewing and converting images to and from the GIF format. In 'GO GRAPHICS' News, you can read about the latest happenings in the Graphics Forums such as new sections and upcoming conferences.


Gold Disk
Gold Disk	Service: GOLDDISK

Gold Disk produces desktop presentation and business productivity products for a series of platforms including Windows, DOS, Macintosh and Amiga.  Its products include Professional Draw, Animation Works Interactive and ScreenCraze for Windows.  Gold Disk supports its series of products in its section of the Windows 3rd Party Applications C Forum.  +


Gold Hill
Gold Hill	Service: WINAPC

Gold Hill produces a series of expert system development tools for the Windows environment including GoldWorks III, GoldWorks II and GCLISP.  Gold Hill provides support for its line of products in its section of the Windows 3rd Party Applications C Forum.  +


Graphics A Vendor Forum
Graphics A Vendor Forum  	GRAPHAVEN

The Graphics Vendors Forum provides support from manufacturers of graphics hardware and software products. Company representatives from graphics vendors are available online to answer questions on the installation and use of their products and to offer tips to help you get the most out of your investment. This forum includes the following companies:  ATI Technologies, Digital Vision, Genus Inc., Global Softworks Ltd., Graphics Software, Inc., Image-In, Inc., Inset Systems, Jovian Inc., Mathematica, Inc., Metagraphics Software Corp., Paul Mace Software, Presidio Software, Rix Softworks, STB Systems, TEGL Systems Corp., and Virtual Reality Laboratories. See each vendor's individual description within this section for a list of supported products.  Support from other graphics vendors can be found in the Graphics B Vendor Forum.  +


Graphics B Vendor Forum
Graphics B Vendor Forum	Service: GRAPHBVEN

The Graphics B Vendor Forum provides support from manufacturers of graphics hardware and software products. Company representatives from graphics vendors are available online to answer questions on the installation and use of their products and to offer tips to help you get the most out of your investment. This forum includes the following companies: Animated Software, Diamond Computer Systems, Hercules Computer Technology, Inc., LEAD Technolgies, StereoGraphics, Sun Country Software and Tseng Labs. See each vendor's individual description within this section fo ra list of the products each supports. Support from other graphics vendors can be found in the Graphics A Vendor Forum.  +


Graphics Corner Forum
Graphics Corner Forum	Service: CORNER

Find photographic-quality scanned images in the Graphics Corner Forum. These images show off the quality of GIF to its fullest. Images in the library include people and portraits; domestic and wild animals; nature scenes such as mountains, seas, flowers and trees; cars, boats, planes; landmarks; space and astronomy and much more.  The message boards are active with discussionso fo the images' backgrounds. +


Graphics Development Forum
Graphics Developers Forum	Service: GRAPHDEV

Find images created by special computer programs (and the programs themselves) in the Graphics Developers Forum. Fractals, raytracing (including POV-ray), morphing, animation and virtual reality workgroups hold active disucssions and conferences on the state of the art and the future of computer graphics.  +


Graphics File Finder
Graphics File Finder	Service: GRAPHFF

Browsing through the Graphics Forums files has never been easier.  The Graphics File Finder is a comprehensive keyword searchable database of files found in the Graphics Forums.  Participating forums include the Art Gallery Forum, Computer Art Forum, Computer Art Forum, Graphics Corner Forum, Graphics Support Forum and the Quick Pictures Forum.  The Graphics File Finder enables you to search for files by topic, file submission date, forum name, file type, file extension, file name or submitter's user ID number.  +


Graphics Forums
Graphics Forums	Service: GRAPHICS

The Graphics Forums contain 10 forums:  Computer Art Forum, Fine Art Forum, Graphics Corner Forum, Graphics Developers Forum, Graphics Gallery Forum, Graphics Plus Forum, Graphics Support Forum, Graphics A Vendor Forum, Graphics B Vendor Forum, and the Quick Pictures Forum. An introduction to graphics is also provided, along with a Graphics File Finder.  +


Graphics Gallery Forum
Graphics Gallery Forum	Service: GALLERY

The Graphics Gallery Forum features online collections of fine photographs from organizations such as the Smithsonian Institution, NASA and the USDA National Agricultural Library. Also featured is a collection of famous (and not so famous) American places.  The America! collection is an armchair vacationer's dream come true.  +


Graphics Plus Forum
Graphics Plus Forum	Service: GRAPHPLUS

If you are interested in truecolor images, stored in popular formats such as JPEG, TIFF, Targe and Windows BMP, you can find them in the Graphics Plus Forum.   With over 16 million colors per image, the photos, hand-drawn and computer-generated graphics in the forum truly are works of art.  +


Graphics Software, Inc.
Graphics Software, Inc.  	Service: BIGD

Graphics Software provides support for its graphics program BIG-D in the Graphics Vendor Forum. BIG-D provides realistic renderings for AutoCAD users and performs texture-mapping, shadow-casting and light-sourcing tasks.  +


Graphics Support Forum
Graphics Support Forum	Service: GRAPHSUPPORT

 The Graphics Support Forum is the primary source for programs that work with GIF images. Here you can find GIF viewers, format converters, paint programs and GIF analysis tools. The official GIF specification, released by CompuServe, is in this forum. This forum is where many questions on graphics can be answered, and a workgroup on copyright issues and artists' rights has recently been formed.  +


Greenleaf Software
Greenleaf Software	Service: PCVENB

Greenleaf Software provides online technical support and information for its products such as CommLib and Comm++ in the Greenleaf section of the PC Vendor B Forum.  +


Gribnif Software
Gribnif Software  	Service: ATARIVEN

Gribnif Software supports its full line of Atari products, including X-Boot, STalker 3, Crazy Dots, CardFile 3 and Arabesque Professional in the Gribnif  section of the Atari Vendor Forum.  +


GRiD Systems
GRiD Systems	Service: GRID

Find support for GRiD Systems' GRiDPad pen computer line and PenRight graphical application development platform in GRiD's section of the Pen Technology Forum.  +


Hardware Forums
Hardware Forums  	Service: HARDWARE

Hardware Forums enable users of particular hardware to exchange ideas. Many forums provide interaction with hardware manufacturers and include extensive libraries which contain software programs.


Harvard Associates, Inc.
Harvard Associates, Inc.  	Service: LOGOFORUM

Harvard Associates provides support for its Logo products such as PC Logo and Valiant Turtle in the Harvard Associates section of the Logo Forum.  +


Hayes Online
Hayes Online	Service: HAYES

You'll find the latest information on Hayes and its hardware and software products in Hayes Online. Learn first-hand about Hayes product introductions, upgrades and pricing. Full product descriptions, special support programs and the Hayes Support Forum are contained in separate sections within this area.  +


Hayes Support Forum
Hayes Support Forum	Service: HAYFORUM

In the Hayes Support Forum, members receive online technical support for Hayes products such as Smartcom, Smartmodems, ULTRA/OPTIMA, pernal modems and JT Fax. Members share their knowledge and experiences with Hayes products and trade hints on installing, configuring, programming and using both the communication hardware and software.  +


hDC Computer Corp.
hDC Computer Corp.  	Service: WINAPA

hDC Computer Corporation produces a complete line of utilities for the Windows environment including hDC File Apps, hDC First Apps, hDC Icon Designer, hDC Power Launcher and hDC Windows Express. These products are supported in the hDC section of the Windows Third Party Applications A Forum.  +


Helix Software
Helix Software	Service: HELIXSOFT

Helix supports Connection/ROOM, HEADROOM and NETROOM in its support section of the PC Vendor G Forum.  +


Helix Technologies
Helix Technologies	Service: MACDVEN

Helix Technologies provides support for its networking productings such as Helix Express in the Helix section of the Mac D Vendor Forum. +


Help Desk Institute Online
Help Desk Institute Online	Service: ZNT:HELPDESK

Where do help desk professionals go when they need help? They visist the Help Desk Institute Online where they exchange ideas with other support professionals and get information on the hottest products and issues affecting the support industry. Plus, it provides a direct link to the support experts and the Help Desk Institute, with information on conferences, semnars and local chapters in your area. Part of ZiffNet.


Hercules Computer Technology, Inc.
 Hercules Computer Technology, Inc.	Service: HERCULES

Find support for Hercules' video/graphic boards, adapters and Windows accelerator products in the Hercules section of the Graphics B Vendor Forum. +


Hilgraeve
Hilgraeve	Service: HILGRAEVE

Technical Support representatives from Hilgraeve are available to answer your questions regarding HyperACESS/5, a DOS and OS/2 communications package, within its support section of the PC Vendor F Forum.  +


HockWare
HockWare	Service: HOCKWARE

HockWare, a publisher of visual programming applications for OS/2, provides support for VisPro/REXX in its section of the OS/2 Vendor Forum. +


Hooper International
Hooper International  	Service: PCVENC

TAKIN' CARE OF BUSINESS and CHEQUE-IT-OUT are supported by Hooper International in its support section of the PC Vendor C Forum.  +


Howling Dog
Howling Dog	Service: MIDICVEN

Access Howling Dog's section of the MIDI C Vendor Forum to obtain support for its line of music creation products such as Power Chords. +


HP Forums
HP Forums	Service: HP

The HP Forums exist to help you get the most from your Hewlett-Packard equipment. The forum is a place to share information with other users, stay abreast of the latest news from HP and tap into libraries of drivers, applicatoin notes and utilities. +


HP Handhelds Forum
HP Handhelds Forum	Service: HPHAND

Get the most from your Hewlett-Packard palmtop computer or HP calculator by joining the HP Handhelds Forum. Here you will find discussions focused on popular HP handeld products such as the HP95LX and HP48SX handeld computers, HP12C business calculator and the HP28 scientific calculator. Use this forum to compare notes with other HP users, talk to the staff of the HP Palmtop Paper, chat informally with HP representatives, take advantage of the shareware and other files in the libraries and keep up with the latest news from HP and 3rd-party developers.  +


HP Omnibook Forum
HP Omnibook Forum	Service: HPOMNI

Share information with other users about the HP OmniBook "superportable" PC in the HP OmniBook Forum. Forum members can answer your hardware or software questions, as well as provide tips for getting the most from this lightweight "road warrior." +


HP Peripherals Forum
HP Peripherals Forum	Service: HPPERIPHERALS

Keep up-to-date on HP's latest printers, plotters, scanners and fax units through the HP Peripherals Forum. Get answers to your technical questions from other forum members about installation, configuration, utilities, usage and trouble-shooting techniques of your HP products. Use the forum's libraries to get peripheral device drivers, data sheets, new product announcements and software application notes directly from HP.  +


HP Specials
HP Specials	Service: HPSPECIAL

For items that do not "fit" in any other forum, HP Specials is a grab bag of files, drivers, and special offers for CompuServe members. +


HP Systems Forum
HP Systems Forum	Service: HPSYSTEMS

Get help from other HP users in systems such as personal computers, network products, minicomputers, workstationms, test and measurement, software and mass storage areas.  Download data sheets, software application notes and utilities for Vectras, Series 3000, laptops, NewWave and Dashboard from the forum's libraries.  +


HSC Software
HSC Software	Service: HSCSOFTWARE

Representatives from HSC Software support its full line of products within its section of the Multimedia Vendor Forum.  +


Hyperkinetix, Inc.
Hyperkinetix, Inc.  	Service: PCVEND

The Hyperkinetix section of the PC Vendor D Forum provides support for The BUILDER, DeltaFile, DemoIT! and Warplink.  +


Hyphen
Hyphen  	Service: HYPHEN

Hyphen provides support for its line of raster image processors for the desktop publishing market in the Hyphen section of the Desktop Publishing Vendor Forum.  +


Hyundai
Hyundai	Service: HYUNDAI

Hyundai sponsors a message and library section in the PC Vendor E Forum to provide technical support for its full product line.  Representives from Hyundai are online and can provide you with quick, up-to-date answers and information.  +


IBM Applications Forum
IBM Applications Forum  	Service: IBMAPP

The IBM Applications Forum addresses core applications for the PC including word processing, database management, business and personal accounting, business graphics, desktop publishing and educational software. You'll find thousands of downloadable programs in the libraries of this forum. Many industry experts participate in lively discussions on the forum message board.  +


IBM Bulletin Board Forum
IBM Bulletin Board Forum  	Service: IBMBBS

The IBM Bulletin Board Forum provides information about bulletin boards for IBM PCs and compatibles. Messages and libraries cover uploads, BBS programs, utilities, standards, doors, BBS management, hardware, user questions and answers and more. Libraries also contain listings of BBS's and BBS notices.  +


IBM CAD
IBM CAD  	Service: IBMCAD

Access the CADD/CAM/CAE for support for IBM CAD, a full function Computer Aided Design and Drafting system with 3D wireframe capabilities for 286 and up IBM compatible machines operating under DOS or OS/2.  +


IBM Communications Forum
IBM Communications Forum  	Service: IBMCOM

This forum is devoted to the topic of telecommunications on the IBM personal computer and compatible computers. Public domain and commercial communications programs are supported.  +


IBM File Finder
IBM File Finder  	Service: IBMFF

IBM File Finder is an online comprehensive keyword searchable database of file descriptions found in the most popular IBM-related forums. It was designed to provide quick and easy reference to some of the best programs and files available in the following forums: Adobe, APPC Information Exchange Forum, Borland Applications, Borland C++/DOS, Borland C++/Windows, Borland Database Products, Borland Developers Tools, Borland Pascal, Data Based Advisor, Fox Software, IBM Applications, IBM Bulletin Board, IBM Communications, IBM Desktop, IBM Hardware, IBM OS/2, IBM New Users, IBM OS/2 Developer 1, IBMS OX/2 Developer 2, IBM OS/2 Support, IBM OS/2 User, IBM Programming, IBM Special Needs, IBM Systems/Utilities, LDC Spreadsheets, LDC Word Processing, LDC Words & Pixels, Microsoft Applications, Microsoft Client Server Computing, Microsoft DOS 5.0, Microsoft Excel, Microsoft Windows Advanced, Microsoft Windows New Users, MIDI/Music, MIDI A Vendor, MIDI B Vendor, Modem Vendor, Novell Digital Research, Novell Library, PC Vendor A through G, TAPCIS, Windows 3rd Party A through C, and Zenith Data Systems. You can search by topic, file submission date, forum name, file type, file extension, file name or submitter's user ID.  +


IBM Hardware Forum
IBM Hardware Forum  	Service: IBMHW

The major theme in the IBM Hardware Forum is the discussion of the various products available for the PC. The PC world changes rapidly, and keeping up-to-date on new developments and sharing experiences with certain products make purchasing decisions easier. In the libraries are hardware-related programs and reviews of new and useful products.  +


IBM LMU2 Forum
IBM LMU2 Forum	Service: LMU2FORUM

Through this forum, IBM supplies you with a direct communication route to the IBM LAN Management Utilities/2(LMU/2) development team. IBM representatives provide support for LMU/2 functions such as operations, configuration, performance and fault management. Coverse with other users who are experienced in using the LMU/2 and who have written their own applications to supplement those supplied by IBM. Additionally, the LMU/2 development team welcomes suggestions on enhancing the current LMU/2 functions. Detailed information about this product can be viewed or downloaded from the forum's libraries.  +


IBM New Users/Fun Forum
IBM New Users/Fun Forum  	Service: IBMNEW

If you are just getting started with your IBM, either in the world of communications or using the CompuServe forums, this is the forum for you. You will find lots of helpful hints from expert users and SysOps, plus many entertainment programs.  +


IBM Office Desktop Forum
IBM Office Desktop Forum	Service: IBMDESK

The IBM Office Desktop Forum is for users and potential users of IBM PRGS applications. The forum includes a calendar of events as well as support for the following products: AdStar, Current-OV, DisplayWrite, Personal AS/2, and Time and Place/2 Calendar. +


IBM OS/2 Developer 1 Forum
IBM OS/2 Developer 1 Forum	Service: OS2DEV

If you are interested in developing software for your IBM using the OS/2 environment, join this forum to gain technical support. One of two developer support forums, this forum hosts discussions about topics such as development tools, debugging techniques and specific OS/2 development products. Sections are also available for you to make product suggestions directly to IBM and download IBM files. For additional OS/2 support, see the IBM OS/2 Developer 2 Forum.  +


IBM OS/2 Developer 2 Forum
IBM OS/2 Developer 2 Forum	Service: OS2DF2

The IBM OS/2 Developer 2 Forum is one of two forums for developers of IBM software for the OS/2 environment to obtain technical support.  In this forum, developers ask IBM representatives and other members questions about developing programs for specific applications such as for a LAN server, CD-ROM or database.  For additional developer support, see the IBM OS/2 Developer 1 Forum.  +


IBM OS/2 Support Forum
IBM OS/2 Support Forum	Service: OS2SUPPORT

The IBM OS/2 Support Forum enables you to obtain support directly from IBM, as well as from other members, for your OS/2 applications.  Find information about installation, hardware requirements and converting your DOS and Windows applications.  For additional user support, see the IBM OS/2 User Forum.  +


IBM OS/2 User Forum
IBM OS/2 User Forum	Service: OS2USER

The IBM OS/2 User Forum enables users of the OS/2 operating system to discuss with one another topics such as hardware requirements and applications. New users are welcome to draw on the knowledge of more experienced users.  Also a Fun & Games section is full of games that can be downloaded to your computer.  For support from IBM, see the IBM OS/2 Support Forum.  +


IBM PC Users Network
IBM PC Users Network  	Service: IBMNET

This area is devoted to the topic of the IBM Personal Computer and IBM PC compatibles. It includes a wide variety of special interest forums that address the needs of both new and expert users.


IBM Personal Software Products Beta Forum
IBM Personal Software Products Beta Forum	Service: PSPBETA

Join IBM's Personal Software Produts Beta Forum to obtain support for the latest beta version of OS/2. From the library you can download patches and fixes for various areas of OS/2 beta versions. In the message center you can consult IBM's technical staff. The sections in the message area and libraries are constantly changing as releases are made available, so review the entries frequently.  +


IBM Programming Forum
IBM Programming Forum  	Service: IBMPRO

If you are interested in programming for the IBM PC or compatible, the IBM Programming Forum is for you. IBMPRO contains assemblers, source codes in a variety of languages, and help from other programers. Experienced programmers will find valuable information, and beginners will discover hints, tips and tutorials.  +


IBM Systems/Utilities Forum
IBM Systems/Utilities Forum 	Service: IBMSYS

In this forum you'll find the latest and greatest in general utilities and information on the various operating systems and environments available for the IBM-PC including multitasking and OS/2. In the libraries, you'll find various programs including DOS additions and improved DOS utilities, as well as resident desktop utilities and all those small programs that make living with a PC easier. Download many popular shareware programs including menu programs, file managers and disk managers.  +


IBM ThinkPad Forum
IBM ThinkPad Forum	Service: THINKPAD

Thinking about programming your own software for your IBM ThinkPad pen computer?  Then think about joining this forum. The IBM ThinkPad Forum enables programmers developing their own software applications to speak directly with IBM personnel, as well as to share information with one another. The hardware section of the message board and libraries features topics about the pen, hardware availability and ThinkPad experiences. The software section features information about software already available for ThinkPad such as PenCentral programs and IBM Handwriting, a handwriting recognition program for easier translation.  +


ICD, Inc.
ICD, Inc.  	Service: ATARIVEN

ICD supports the following products for the Atari 8 bit computer: US Doubler, P:R: Connection, ACTION!, The ACTION! Toolkit, MAC/65, The MAC/65 Toolkit, BASIC XL, The BASIC XL Toolkit, ASIC XE, SpartaDOS Construction Set, The SpartaDOS Toolkit, Printer Connection, RAMBP XL, Multi I/O, FlashBack!, R-Time 8 and hard disk drives. The following products for Atari ST and MEGA ST computers are supported in this same section of the Atari Vendor Forum: Personal PASCAL version 2.0, BBS Express! ST, ICD ST Host Adapter, ICD Host/Controller Kits, Complete hard drive kits and FAST hard drives.  +


ICOM Simulations
ICOM Simulations  	Service: ICOM

ICOM Simulations provides support for its screen saver programs and utilities including Intermission and On Cue II in the ICOM section of the Windows Third Party Applications A Forum.  +


Identitech, Inc.
Identitech, Inc.	Service: PCVENG

Identitech supports AIMS, FYI, ISVS and LOFS in its support section of the PC Vendor G Forum.  +


Image-In Incorporated
Image-In Incorporated	Service: IMAGEIN

Image-In provides support for its premier color and grayscale image processing toolkits, Image-In Color and Image-In Color Professional in the Image-In section of the Graphics Vendor Forum.  +


Impulse, Inc.
Impulse, Inc.  	Service: AMIGAVENDOR

Impulse, Inc. supports its full Amiga product line including Imagine, Terrain and VD1 in the Amiga Vendor Forum.  +


Infinite Technologies
Infinite Technologies	Service: INFINITE

Infinite Technologies develops software solutions designed primarily for the networked environment.  Access the Infinite Technologies Library of the PC Vendor F FOrum to download 30-day trial versions of its products.  +


InfoAccess (Windows)
InfoAccess (Windows)	Service: WINAPB

InfoAccess produces and supports Guide, a file management application for the Windows environment, in the InfoAccess section of the Windows 3rd Party Applications B Forum. +


Inline Software
Inline Software	Service: MACCVEN

Inline Software supports its full line of Macintosh products within its section of the Mac C Vendor Forum. Inline's products include Darwin's Dilemma and Tesserae (color puzzle games), Cliff Johnson's 3 in Three and Swamp Gas Visits the United States of America.  +


Inmagic, Inc.
Inmagic, Inc.	Service: INMAGIC

Access the Inmagic section of the PC Vendor B Forum to obtain support for its text database products. Talk directly with representatives from Inmagic about any of its products, including INMAGIC Plus.  +


Inmark
Inmark	Service: INMARK

Inmark's products, such as zApp, make your GUI programming easier. Obtain support for zApp and other Inmark products in its section of the Windows 3rd Party Applications D Forum. +


Innovative Data Concepts
Innovative Data Concepts  	Service: IDCSUPPORT

Innovative Data Concepts offers full support services for its product line in the PC Vendor C Forum. IDC's SWAP Utilities programs, SWAPDOS and TesSeRact are supported within the forum.  +


Innovative Quality Software
Innovative Quality Software	Service: MIDICVEN

Obtain support for Innovative Quality Software's hard disk ediotr, Software Audio Workshop (SAW) in its sectoin of the MIDI C Vendor Forum. +


Inovatronics
Inovatronics  	Service: AMIGAVENDOR

Inovatronics' product list includes PowerWindows 23.5, C.A.P.E. 68K 2.5, InovaTools1 and CanDo. These products are supported within Inovatronics' support section of the Amiga Vendor Forum.  +


Inset Systems Inc.
Inset Systems Inc.	Service: INSET

Inset Systems supports its graphics product line in the Inset section of the Graphics Vendor Forum.  Inset products include HIJAAK, graphics format conversion software; Inset Colorsep, used to create color separations from many formats of computer graphics images; and the Inset graphics inserter software for word processers.  +


Insignia Software
Insignia Software	Service: MACDVEN

Access the Mac D Vendor Forum to obtain support for Insignia's products, such as SoftPC. Insignia produces emulation solutions products to run Microsoft Windows and MS-DOS on UNIX-based workstations and Macintosh computers. +


Intel Forum
Intel Forum  	Service: INTELFORUM

The Intel Forum offers support for Intel's products. Intel's Personal Computer Enhancement Division is online to provide assistance in using Intel's modems, fax boards, LAN products, accelerator boards and co-processors, and its Development Tools department supports Intel's compilers and emulators. Check the libraries for the latest drivers, software revisions and product information or use the message area to ask questions about compatibility, price and other product issues.  +


Intel Software Developers Forum
Intel Software Developers Forum	Service: INTELACCESS

The Intel Software Developers Forum, sponsored by the Intel Access program, provides a place for developers to obtain support from Intel for its microprocessors and multi-media technologies.  The iRMX User's Group (iRUG) hosts a message section where its members can find support and discuss iRUG issues.  +


INTERSECT Software Corporation
INTERSECT Software Corporation  	Service: ATARIVEN

INTERSECT Software supports Interlink ST and Deluxe Piano in its section of the Atari Vendor Forum.  +


INTERSOLV Forum
INTERSOLV Forum	Service: INTERSOLV

INTERSOLV provides desktop development solutions. It offers support for INSTERSOLV's products, such as APS, Excelerator and Maintenance Workbench, in the INTERSOLV Forum. +


Iomega Corporation (DOS)
Iomega Corporation (DOS)  	Service: PCVENE

Iomega support representatives support Iomega's Bernoulli Box line of reliable data storage within the Iomega section of the PC Vendor E Forum. +


Iomega Corporation (Macintosh)
Iomega Corporation (Macintosh)	Service: MACCVEN

Iomega supports its full line of Macintosh products in its section of the Macintosh C Vendor forum.  +


IQ Technologies
IQ Technologies	Service: PCVENH

IQ Technologies provides support for its interactive presentations programs such as Show Partner F and Show Partner F/X in its section of the PC Vendor H Forum. +


ISD Marketing
ISD Marketing  	Service: ATARIVEN

ISD Marketing supports its full line of products for the Atari including VIP, DynaCadd and Calamus in its section of the Atari Vendor Forum.  +


ISICAD, Inc.
ISICAD, Inc.  	Service: ISICAD

ISICAD provides support for its complete line of integrated graphics and database systems for the architectural engineering, facilities management and communications management markets, including its popular CADVANCE product, in the ISICAD/CADVANCE section of the CADD/CAM/CAE Vendor Forum.  +


Jasik Designs
Jasik Designs  	Service: MACBVEN

Jasik Designs supports its MacNosy and The Debugger products within its section of the Mac B Vendor Forum.  +


Javelin/EXPRESS Forum
Javelin/EXPRESS Forum  	Service: IRIFORUM

Information Resources Incorporated provides support for users of Javelin and EXPRESS software in the IRIFORUM. Javelin is the leading financial modelling tool available and has presentation-quality graphics. EXPRESS is a line of decision support software that can enhance your productivity by enabling you to make more informed decisions. The IRIFORUM helps you take full advantage of Javelin and EXPRESS's capabilities. Forum members can download demo programs.  +


Jensen-Jones
Jensen-Jones	Service: JJSUPPORT

Jensen-Jones produces Commence, a personal information manager developed for the Windows environment. Jenson-Jones supports Commence in the Jensen-Jones section of the Windows 3rd Party Applications A Forum.  +


JLCooper Electronics
JLCooper Electronics  	Service: MIDIAVENDOR

Find support for JLCooper's leading MIDI accessories in the JLCooper section of the MIDI A Vendor Forum. Specific products supported include switching boxes, data mergers and automated MIDI mixing equipment.  +


Jovian Inc.
Jovian Inc.  	Service: JOVIAN

Find support for Jovian Inc.'s product line in the Jovian section of the Graphics Vendor Forum. Jovian products include SuperVIA, VIN, VINPlus, Gloria digitizer and Genie sound board.  +


J.P. Software
J.P. Software  	ServiceJPSOFT

J.P. Software provides technical support for its 4DOS program in the PC Vendor B Forum.  +


KASEWORKS
KASEWORKS	Service: CASEW

KASEWORKS provides support for its applications development software for the Windows and OS/2 Presentation Manager environments including CASE:W and CASE:PM in the KASEWORKS section of the Windows 3rd Party Applications B Forum. +


Key Electronics
Key Electronics	Service: MIDIBVEN

Key Electronics supports its line of MIDIATOR serial and parallel port MIDI interfaces in the Key Electronics section of the MIDI B Vendor Forum.  +


Kidasa
Kidasa  	Service: KIDASA

Kidasa Software produces and supports Milestones, Etc., a project scheduling application program, in the Kidasa section of the Windows Third Party Applications B Forum.  +


Knowledge Garden
Knowledge Garden  	Service: KNOWLEDGE

Knowledge Garden provides support for KnowledgePro for Windows, a development environment for Windows. KnowledgePro is supported in the Knowledge Garden section of the Windows Third Party Applications B Forum.  +


Knozall Systems, Inc.
Knozall Systems, Inc.	Service: NOVVEN

Access the Knozall Systems section of the Novell Vendor Forum to obtain support fooor Knozall's NetWork Management software programs such as FILEWIZARD and NLMAUTO for use with Novell NetWare. +


Korenthal Associates, Inc.
Korenthal Associates, Inc.  	Service: PCVENB

Korenthal Associates supports the following products in its section of the PC Vendor B Forum: Webster's New World software series, 4PRINT and TAPMARK.  +


Kurzweil Music Systems - Young Chang
Kurzweil Music Systems - Young Chang 	Service: MIDIAVENDOR

Kurzweil Music Systems provides support for its sampling equipment in the YC/Kurzweil section of the MIDI A Vendor Forum. Its products include the Kurzweil 250 and the 1000 series sample playback units.  +


Lahey Computer Systems
Lahey Computer Systems	Service: LAHEY

Obtain support for Lahey's line of personal Fortran products and Fortran productivity tools in its section of the PC Vendor H Forum. +


Lan Magazine Forum
Lan Magazine Forum	Service: LANMAG

The LAN Magazine Forum, brought to you by Miller Freeman Publishing, provides support for users of a variety of networking products. Installers, managers, and users can find information on hardware and software reports and general networking issues. Also, members o fth eforum can talk directly with edtiors from LAN Magazine. The libraries contain information on wide area networks; patches, shareware and demos; and files on network operating systems, applications, databases and printing. +


LAN Support Group
LAN Support Group	Service: NOVVEN

Access the LAN Support Group section fo the Novell Vendor Forum to obtain support for BindView, its management and reporting utility for vell NetWare LANs.  +


# LAN Technology Forum
LAN Technology Forum	Service: LANTECH

The LAN Technology Forum, the electronic edition of LAN Technology magazine, provides users of Local Area Networks (LANs) with unbiased information about the right network for your applications and meet other users of network products who can help you use yours most efficiently. Specific products, servers, internetworking and e-mail are commonly discussed. +


LDOS/TRSDOS 6 Forum
LDOS/TRSDOS 6 Forum  	Service: LDOS

The LDOS/TRSDOS 6 Forum welcomes all users of the Radio Shack TRS-80 Models 1, 3, 4, 4P, 40 as well as 'work-alike' computers such as the LOBO MAX-80. Topics discussed include BASIC, C, Fortran, Ratfor, the Z-80 assembly language and the 'hardware' of the TRS-80 product line. In addition, users of TRS-80 hardware and software and the LDOS 5.1 and TRSDOS6 operating systems can gain support.  +


# K LEAD Technologies, Inc.
LEAD Technologies, Inc.	Service: GRAPHBVEN

LEAD Technologies provides support for its graphics software toolkits and JPEG compression tools in the LEAD Technologies section of the Graphics B Vendor Forum. +


Legato Systems
Legato Systems, Inc.	Service: LEGATO

Legato Systems provides support for its complete line of networking products, including NetWorker, within the Legato Systems support section of the PC Vendor D Forum.  +


Lenel Systems
Lenel Systems	Service: MULTIVENDOR

Representatives from Lenel Systems are online in the Multimedia Vendors Forum to provide support for Lenel's full line of multimedia products.  +


Lexicon
Lexicon	Service: MIDIBVEN

Lexicon has introduced a line of consumer products for high-end music and home theatre systems. Broadcasters use Lexicon products to help edit, shape and synchronize their transmission. Lecixon supports its products in the MIDI B Vendor Forum, products such as the Harmonizer, that are heard onstage and in the recording studio.  +


Lexicor Software
Lexicor Software	Service: ATARIVEN

Lexicor Software provides technical support for its full line of animation products within the Lexicor section of the Atari Vendor Forum.  +


Live Sound!
Live Sound!	Service: MIDIBVEN

Access the MIDI B Vendor Forum to gain support from Live Sound! magazineconcerning Performance-Audion theory, techniques and applications.  +


Logitech Forum
Logitech Forum  	Service: LOGITECH

The Logitech Forum is now in session for users of Logitech products. This forum provides technical support from the Logitech Support Group for products such as the CatchWord word processing program, Finesse desktop publishing program, ScanMan scanners and Logitech's mouse products. Check the libraries and News Flash sections of this forum for updates on product development and software available for downloading. For additional technical support, you can download question-and-answer help sheets which are used by Logitech technicians.  +


Logo Computer Systems, Inc.
Logo Computer Systems, Inc.  	Service: LOGOFORUM

Find support for LogoEnsemble, The Phantom Fish Tank, Logo II, LogoExpress and LogoWriter in the LCSI section of the Logo Forum.  +


Logo Forum
Logo Forum  	Service: LOGOFORUM

The Logo Forum uses a light-hearted approach to explore the use of the Logo computer language and technologies that influence our lives. Cartoon characters keep interest high. Vendors are available online and provide support for their products. This forum includes the following companies: Harvard Associates, Inc., Logo Computer Systems, Inc., Paradigm Software, Inc., Power Industries LP, Schemers Inc. and Terrapin, Inc. See each vendor's individual description for a list of supported products.  +


Lotus GmbH Forum
Lotus GmbH Forum	Service: LOTGER

The Lotus GmbH Forum provides technical support for Lotus' German-speaking customer base. German users of Lotus products for DOS, OS/2, UNIX an dWindows, such as 1-2-3, Ami Pro, ccMail and Notes can obtain support from the Lotus staff in Munich. The libraries contain downloadable software such as Notes applications, drivers, upgrades and utilities. +


Lotus Spreadsheet Forum
Lotus Spreadsheet Forum  	Service: LOTUSA

The Lotus Spreadsheet Forum provides users of Lotus 1-2-3, Lotus Symphony, HAL and Jazz with information and product support. Here you can communicate with other Lotus users and download models, command-language programs or templates for use with these Lotus products. You can also communicate with experts and consultants who have had similar experiences.  +


Lotus Word Processing Forum
Lotus Word Processing Forum  	Service: LOTUSWP

The World of Lotus brings you the Lotus Word Processing Forum to provide thorough product support for users of Ami Pro, Ami, Lotus Manuscript, Samna Word IV and SmarText word processing programs. By interacting through the message boards and conferences, members can build on one another's ideas and experiences to better understand the programs and to learn how to get better results for different applications.  +


Lotus Words & Pixels Forum
Lotus Words & Pixels Forum  	Service: LOTUSB

Users of Lotus Magellan, Freelance, Freelance Plus, Graphwriter, Lotus Metro, Lotus Express, Lotus Agenda and other non-spreadsheet Lotus products can exchange ideas in the Lotus Words & Pixels Forum. Members discuss graphics business communication such as charts, diagrams, word charts, freehand drawings, symbols and maps.  +


Mac Applications Forum
Mac Applications Forum  	Service: MACAP

Join the Mac Applications Forum to get the most from your Macintosh application programs. This forum hosts discussions about Macintosh applications for word processing, databases, graphics and spreadsheets. Learn more about the programs you use or about other Mac programs that can help you get the job done, with special areas for Mac-equipped engineers, lawyers and scientists.  +


Mac A Vendor Forum
Mac A Vendor Forum  	Service: MACAVEN

The Mac A Vendor Forum features Macintosh vendors delivering online support to their customers. The following companies and the products they support are included in this forum: Activision, Articulate Systems,  CE Software, ChipSoft, Connectix, Daystar Digital, DeltaPoint, Ex Machina, Mainstay, MicroMat, Nisus Software, Portfolio Systems, and Survivor Software. See each vendor's individual description within this section for a list of supported products. For additional vendors and support, visit the Mac B Vendor Forum, the Mac C Vendor Forum or the Mac D Vendor Forum.  +


Mac B Vendor Forum
Mac B Vendor Forum  	Service: MACBVEN

The Mac B Vendor Forum features Macintosh vendors delivering online support to their customers. This forum includes the following companies: Altsys Corp., Berkeley Systems, Deneba Software, GCC Technologies, Jasik Designs, Microseeds Publishing, Olduvai Corporation, Opcode,  Radius, Software Ventures, SuperMac Technology, Tactic Software, T/Maker and Working Software. See each vendor's individual description within this section for a list of supported products. For additional vendors and support, visit the Mac A Vendor Forum, the Mac C Vendor Forum or the Mac D Vendor Forum.  +


Mac C Vendor Forum
Mac C Vendor Forum  	Service: MACCVEN

The Mac C Vendor Forum features Macintosh vendors delivering online support to their customers. This forum includes the following companies: Aladdin Systems, Alysis, Avatar Corp., Baseline Publishing, CoStar Corporation, Farallon, Inline Design, Iomega Corporation, Mirror Tech, Softsync, Inc., TMS Peripherals and Virtus Corp. See each vendor's individual description within this section for a list of supported products. For additional vendors and support, visit the Mac A Vendor Forum, the Mac B Vendor Forum, or the Mac D Vendor Forum.  +


Mac D Vendor Forum
Mac D Vendor Forum	Service: MACDVEN

The Mac D Vendor Forum features Macintosh vendors delivering online support to their customers. This forum includes the following companies: Applied Engineering,Atticus Corporation, Digital Eclipse, Helix, Insignia Solutions, MacTech Magazine, Mercury Systems, Micronet Technology and Teknosys, Inc. See each vendor's individual description within this section for a list of supported products. For additional vendors and support, see the Mac A Vendor Forum, the Mac B Vendor Forum, or the Mac C Vendor Forum.  +


Mac File Finder
Mac File Finder  	Service: MACFF

Browsing through forum files has never been easier. Mac File Finder is an online comprehensive keyword searchable database of file descriptions of the most popular Macintosh-related forums. Use this database to locate and download interesting files from the following forums: Adobe, Ashton-Tate, Borland Applications, Borland Pascal Forum, Fifth Generation Systems, Fox Software, Lotus Spreadsheets, Mac Applications, Mac A Vendor, Mac B Vendor, Mac C Vendor, Mac D Vendor, Macintosh Communications, Macintosh Clubhouse, Macintosh Developers, Macintosh Entertainment, Macintosh Hardware, Macintosh Hypertext, Mac New Users and Help, Macintosh System Software, Microsoft Applications, Microsoft Excel,   Symantec MIDI A Vendor, MIDI B VENDOR, and MIDI/Music and Music and Performing Arts Forum.  +


MacDonald Associates
MacDonald Associates	Service: ATARIVEN

Get support for MacDonald Associates' products including Universal Item Selector, Universal Network software, and La Redactuer word processor, along with information on the ST Informer magazine in the MacDonald Associates section of the Atari Vendors Forum.  +


Macintosh Clubhouse Forum
Macintosh Clubhouse Forum	Service: MACCLUB

The Macintosh Clubhouse is the main area where Macintosh users go to get to know one another.  Meet members of the Macintosh ommunity by attending special conferences or parties where members introduce new products and where rumors concerning Macintosh are discussed.  +


Macintosh Communications Forum
Macintosh Communications Forum  	Service: MACCOMM

Information on Macs communicating with other Macs and with other personal computers is available in the Macintosh Communications Forum. It covers CompuServe Navigator, other terminal programs, facsimiles (FAX), scripts and tools, hardware, local area networks, connecting Macs to PCs and private bulletin board systems. Libraries contain upgrades, patches, press releases on modems, reviews, documentation, demos and more.  +


Macintosh Developers Forum
Macintosh Developers Forum  	Service: MACDEV

The Macintosh Developers Forum provides programming information for commercial Mac programmers, Mac developers, people who program for their own use, and new programmers. You can contact expert programmers and discuss BASIC, C and Pascal, assembly language and object oriented programming. Tools, debuggers, shareware, utilities and source code samples are also available. The system software which Apple licenses for electronic distribution is made available in the forum, including the latest versions of System and Finder through 7.0.1 and the latest versions of Macsbug and Resource Editor. Members of the MacApp Developer's Association meet to share information on the latest developments in object oriented programming tools in the APDA section.  +


Macintosh Entertainment Forum
Macintosh Entertainment Forum  	Service: MACFUN

This forum helps people discover fun and creative new ways to use the Macintosh. The forum also places each member in touch with like-minded Macintosh enthusiasts from all over the world. There are sections on games, music, sound and more.  +


Macintosh Hardware Forum
Macintosh Hardware Forum	Service: MACHW

In the Macintosh Hardware Forum, you can discuss Macintosh hardware components, from hard disks to monitors, printers, scanners and other peripherals. Members also discuss various models of Macs including Classics and Modular (Mac IIs), PowerBooks, DuoBooks, Performas and the PDAs. Check the libraries for model-specific files, screensavers and backup programs. +


Macintosh Hypertext Forum
Macintosh Hypertext Forum  	Service: MACHYPER

The Macintosh Hypertext Forum provides information on Hypertext, which are databases that use words, sounds and pictures. Discussions cover Hypercard, Hypertalk language, stack ideas and external resource programs. Support is also provided for programs of developers who work outside of Apple, including SuperCard and Plus+. The libraries contain press releases, demos, shareware, utilities, games, educational tools, music and sounds, source code and personal databases.  +


Macintosh Multimedia Forum
Macintosh Multimedia Forum	Service: MACMULT

The Macintosh Multimedia Forum features tools, ideas and applications to create multimedia presentations on the Mac. In the forum, learn new multimedia techniques including the use of sound, art files, graphics files and HyperCard. From the libraries download Quicktime multimedia movies. +


Macintosh New Users and Help Forum
Macintosh New Users and Help Forum 	Service: MACNEW

Are you a new Mac user suffering from confusion and overload? Then join the Macintosh New Users and Help Forum where experts are available to answer your questions and help you gradually work through your system. Feel free to consult the experts as often as necessary until you feel comfortable using your Macintosh computer. Users can download hundreds of programs reviewed in the book Mac Shareware Emporium.  Also in Mac New, find out what's been recently uploaded in the other Mac forums.  +


Macintosh System Software Forum
Macintosh System Software Forum  	Service: MACSYS

Visit the Macintosh System Software Forum to learn about the various features and aspects of Apple's Macintosh system software. Here you can ask questions about installing INITs or other extensions, finding the right control panel or using F keys and desk accessories. The libraries contain files with inofrmation for both Systems 6.0 and the latest System 7.10, QuickTime databases and QuickTime movies are supported here.  +


Mackie Designs
Mackie Designs	Service: MIDIBVEN

Mackie Designs supports its full line of products within its section of the MIDI B Vendor Forum.  +


Macromedia Forum
Macromedia Forum	Service: MACROMEDIA

For online technical support for your Macromedia multimedia software, join the Macromedia Forum.  Through this forum, you can communicate directly with other users and with the Macromedia Technical Support Staff for answers to your questions about media products such as Authorware, ClipMedia and MediaMaker.  For additional support, check the libraries for downloadable files and programs.  +


MacTech Magazine
MacTech Magazine	Service: MACDVEN

MacTech magazine's section of the Mac D Vendor Forum to discuss the articles and issues found in MacTech magazine.  +


MacUser Forum
MacUser Forum  	Service: ZMC:MACUSER

The MacUser Forum, part of ZiffNet/Mac, gives you an opportunity to interact with the editors, writers, columnists and other readers of the magazine. You'll have instant access to free downloadable utilities - evaluated and tested in MacUser's labs and exclusive System 7.0 utilities designed by MacUser. The complete indexes of MacUser (and MacWEEK) are available online, so you can quickly and easily find information.  +


MacWEEK Forum
MacWEEK Forum  	Service: ZMC:MACWEEK

The MacWEEK forum, part of ZiffNet/Mac, lets you exchange ideas with the editors and writers of the magazine. Also you can take a look at the headlines and summaries of the news stories the Friday before they are published. The complete indexes of MacWEEK (and MacUser) are available online, so you can quickly and easily find information.  +


Madge Networks Ltd.
Madge Networks Ltd.	Service: MADGE

Obtain support for Madge Networks' line of Madge Smart Token Ring products in its section of the PC Vendor A Forum. +


Magee Enterprises, Inc.
Magee Enterprises, Inc.  	Service: MAGEE

Magee Enterprises supports Automenu, Treeview and Screen Manager Professional in its section of the PC Vendor A Forum.  +


Magic Software
Magic Software	Service: PCVENG

Magic Software supports its development tools such as Automatic Program Generators, Automatic Screen Painters, End-User Report Writers, and Integrated Cross-Referencers in its support section of the PC Vendor G Forum.  +


Magma Systems
Magma Systems  	Service: PCVEND

Magma Systems supports its MEWEL Window Library and ME Text Editor in its section of the PC Vendor D Forum.  +


Magnetic Music
Magnetic Music	Service: MAGMUSIC

Representatives from Magnetic Music support its full line of products within its section of the MIDI A Vendor Forum.  +


Mainstay
Mainstay  	Service: MACAVEN

Mainstay provides online support in the Mac A Vendor Forum for its line of products including Think'n Time, MacFlow, MacSchedule, Telescape and Visual Interactive.  +


Mansfield Software Group
Mansfield Software Group  	Service: PCVENA

KEDIT, REXX and Personal REXX are supported in the Mansfield Software Group's section of the PC Vendor A Forum.  +


Markt & Technik AG
Markt & Technik AG 	Service: MUTFORUM

Markt & Technik AG is a leading publisher of German Computer Magazines, which include Computer Persoenlich, PC Magazin (German Issue) and Computer Live. These publications are targeted to the business and private user of personal computers. This forum enables the readers of M&T's publications to communicate among each other and with the editors of the magazines. The libraries contain programming code and samples, which are published in M&T's magazines. The messages and library files in this forum are in German.  +


Mathematica, Inc.
Mathematica, Inc.  	Service: TEMPRA

Mathematica Inc. provides support for its Tempra Pro paint program in the Tempra section of the Graphics Vendor Forum.  +


Maxwell CPU
Maxwell CPU  	Service: ATARIVEN

Access the Maxwell CPU section of the Atari Vendor Forum to obtain technical support for Megstender, GoGo-ST and Fractal Fantasy.  +


McAfee Virus Help Forum
McAfee Virus Help Forum	Service: VIRUSFORUM

Learn how to protect your computer against viruses through the McAfee Virus Help Forum.  Join discussions with virus experts from around the world on current developments.  Sponsored by McAfee Associates, this forum contains libraries with informative text files and downloadable files that detect and remove computer viruses.  Participate in conferences and the message boards for accurate diagnoses and prompt relief.  The National Computer Security Association operates a section in the forum.  Technical support is also offered for virus-fighting products from McAfee Associates.  +


MECA Software Forum
MECA Software Forum  	Service: MECA

The MECA Software Forum provides support for users of Managing Your Money Checkwrite Plus, Home Lawyer, TaxCut, Managing the Market, Financial Calculator, and The Managers Organizer. Communicate directly with MECA's technical support and with other members who use MECA's full line of products.  +


Media Vision
Media Vision	Service: MEDIAVISION

Pro-Audio Spectrum and ThunderBOARD are supported within the Media Vision section of the Multimedia Vendor Forum.  +


Megahertz
Megahertz  	Service: MEGAHERTZ

Megahertz manufactures a complete line of laptop enhancement products including Modems, LAN adapter cards for both Ethernet and Token Ring LANs, 3270/5250 Terminal Emulation, 3270/5250 remote terminal emulation cards and Memory upgrades. Support for these and other Megahertz products is provided in the Megahertz section of the Modem Vendor Forum.  +


Mercury Systems
Mercury Systems	Service: MACDVEN

Access Mercury's section of the Mac D Vendor Forum to obtain support for Mercury's products, including MacIntercom. +


Metagraphics, Inc.
Metagraphics, Inc.	Service: METAGRAPHICS

Metagraphics provides support for MetaWNDX, cross-platform development tools for PC-DOS, 286 DOX-Extenders, 386 DOS-Extenders, Windows, Macintosh Unix X-Windows/Motif and Sun Sparc in the Metagraphics section of the Graphics Vendor Forum.  +


Metz Software
Metz Software  	Service: METZ

Metz Software provides technical support for its complete series of utility applications such as Metz File Manager F/X and Metz Shareware products. These products are supported in the Metz Software section of the Windows Third Party Applications C Forum.  +


Micro Engineering Solutions
Micro Engineering Solutions	Service: MESOLUTIONS

Get support for Micro Engineering Solutions' line of computer-aided design and manufacturing software such as CheckMark, Millmaster and Solution 3000 in the Solution 3000 section of the CADD/CAM/CAE Vendor Forum.  +


Micro Focus
Micro Focus	Service: MICROFOCUS

Micro Focus provides uspport for Personal COBOL products in its sections of the PC Vendor H Forum. +


Micrografx
Micrografx  	Service: MICROGRAFX

Micrografx provides support for professional graphic construction programs such as Charisma, Designer, Draw Plus, Picture Publisher and XPort in the Micrografx section of the Windows Third Party Applications A Forum.  +


MicroMat
MicroMat	Service: MACAVEN

Access MicroMat's section of the Mac A Vendor Forum to obtain support for its line of MacEKG software.  +


Micronet Technology
Micronet Technology	Service: MACDVEN

Micronet provides support for its line of hard disk drives, disk arrays, DAT, streaming tape and removable media drives in its section of the Mac D Vendor Forum.  +


Micronetics Design
Micronetics Design	Serivce: MUMPS

Talk with editors or review past issues of Micronetics, the technical bulletin with updates and fixes, in its sections of the PC Vendor H Forum. +


Micropolis Corporation
Micropolis Corporation	Service: PCVEND

Access the PC Vendor D Forum to obtain product and technical support from Micropolis representatives for its full product line.  +


Microseeds Publishing
Microseeds Publishing  	Service: MACBVEN

Support for Rerdux, Rival, Initpicker, Screen Gems and Astrix is provided by Microseeds Publishing within its section of the Mac B Vendor Forum.  +


Microsoft Access Forum
Microsoft Access Forum	Service: MSACCESS

This forum supports Microsoft's Access database management software. You can receive technical and non-technical advice on a variety of topics including database design, macros networks and reports. Questions that arise when programming with Microsoft applications can be answered by the Microsoft Product Support Group.  +


Microsoft Applications Forum
Microsoft Applications Forum  	Service: MSAPP

Take advantage of the support available for all of your Microsoft applications on the Microsoft Applications Forum. Microsoft support personnel provide support for applications products including all versions of Flight Simulator, LAN Email, Microsoft Money,   Microsoft Mouse, Microsoft Publisher, Microsoft Works, Windows Penpoint and Windows Project applications. Both the message sections and the libraries contain information and files that can help you use Microsoft applications more effectively.  +


Microsoft Basic Languages Forum
Microsoft Basic Languages Forums	Service: MSBASIC

The Microsoft Basic Languages Forum provides members with direct access to technical support about the BASIC, QuickBASIC and Visual Basic programming languages.  Members ask questions about various aspects of using these langauges and discuss development issues with other members.  +


MicroSoft Benelux
Microsoft Benelux	Service: BENELUX

The Microsoft Benelux menu enables you to access company information about MicroSoft Benelux as well as enter the Microsoft Benelux Developers Forum. Access is also provided to the Micorosft end-user forums, other MicroSoft developer forums, the Microsoft Knowledge Base and the Microsoft software library, all of which contain files for downloading.  +


Microsoft Benelux Developers Forum
Microsoft Benelux Developers Forum	Service: MSBDF

The Microsoft Benelux Forum provides support for Microsoft products for users based in the Benelux countries.  Support is provided for program development software including BASIC, C/C++, Client Server Computing, Windows SDK and Microsoft Fox.  Benelux-based developers can share information with other users and developers and with the staff at Microsoft Benelux.  The forum libraries contain drivers, programming samples and other Microsoft local language products.  +


Microsoft C and Other Languages Forum
Microsoft C and Other Languages Forum  	Service: MSLANG

Users of Microsoft software and operating systems are invited to join the Microsoft C and Other Languages Forum, which is operated by the Microsoft Product Support Group. Members have direct access to technical support about using programming languages such as C, QuickC and QuickPascal MASM for Microsoft applications. Microsoft libraries feature more than 2000 files containing macros, utilities and shareware.  +


MicroSoft Central Europe Forum
MicroSoft Central Europe Forum	Service: MSCE

The Microsoft Central Europe Forum supports Microsoft's German programming languages and hosts discussions among Microsoft users and Microsoft Central Europe. Visit the forum's libraries for products such as drivers, programming samples and other Microsoft local language products. For additional support, see other Microsoft forums in this section.  +


Microsoft Central Europe Forum
Microsoft Central Europe System Forum  	Service: MSCESYSTEM

The Microsoft Central Europe System Forum provides uspport for European users of Microsoft products. Products uspported in this forum include: MS Basic, C and C++, Extensions, LAN Manager and SQL Server. Visit the libraries for products such as drivers, programming samples and other Microsoft products. For additional European support visit the Microsoft Central Europe Forum or visit the other Microsoft forums in this section.  +


Microsoft Client Server Computing Forum
Microsoft Client Server Computing Forum 	Service: MSNETWORKS

The Microsoft Client Server Computing Forum provides in-depth information about Client Server. Information is also available about the Microsoft LAN Manager network operating system and the SQL Server database. Support personnel at Microsoft monitor this forum to ensure that correct information is presented. Files from the Microsoft Operating Systems and Development Forum that are related to the Client Server are located in the libraries in this forum for easy access.  +


Microsoft Connection
Microsoft Connection  	Service: MICROSOFT

The Microsoft Connection provides you with company information and access into the Microsoft Forums. You can communicate directly with Microsoft and other users of Microsoft software. The Microsoft Connection includes technical product information, sales and training information, information about product support services, and the Microsoft software library with files for downloading. Access is also provided to the Microsoft KnowledgeBase, which enables you to access the Microsoft engineering support files used by Microsoft support engineers for product support.  +


Microsoft Developer Knowledge Base
Microsoft Developer Knowledge Base  	Service: MDKB

The Microsoft Developer Knowledge Base is a reference tool containing technical information and articles about the Microsoft developer-specific products.  This database is compiled and maintained by Microsoft Product Support and is full-text, keyword searchable. You will find Microsoft press releases and technical articles about product bugs, trouble-shooting and updates.  +


Microsoft Developer Network Forum
Microsoft Developer Network Forum	Service: MSDNLIB

The Microsoft Developer Network (MSDN) Technical Library Forum offers software developers a quick and efficient way of obtaining technical information.  The libraries contain a collection of technical articles in the Windows Help file format and sample code, which are available for downloading. Message sections enable you to discuss any of the files or codes with other users, as well as with Microsoft Representatives.  +


Microsoft Developer Relations Forum
Microsoft Developer Relations Forum	Service: MSDR

If you use Microsoft products to develop your own applications, join the Microsoft Developer Relations Forum for information and tips for using Microsoft systems products.  Representatives from Microsoft's Developer Relations Group and experienced developers are online and participate in the message sections to answer your non-technical questions about the products and their usage.  For technical support, see the Microsoft Developer Services Area.  +


Microsoft Developer Services Area
Microsoft Developer Services Area	Service: MSDS

The Microsoft Developer Services Area provides developers with access to technical support and information for all Microsoft development products.  Developers are encouraged to use this area to aid their development efforts and to communicate directly with Microsoft regarding all developer-related issues.  +


Microsoft Developer Support Forums
Microsoft Developer Support Forums 	Service: MSDEV

Microsoft Developer Services Area provides the following seven forums to give support for developers of Microsft products for program development:  BASIC, Client Server Computing, C and Other Languages, Developer Relations, Windows Extentions, Windows SDK and Win 32.  +


Microsoft DOS  5.0 Forum
Microsoft DOS 5.0 Forum	Service: MSDOS

The Microsoft Connection supports users of MS-DOS through the Microsoft DOS 5.0 Forum. In the message section and conference area, members share information about all aspects of MS-DOS 5.0 including setup and installation, hardware, conversions and command usage. Representatives from Microsoft Product Support Services participate in this forum to make sure that MS-DOS 5.0 users get the most current information available. +


Microsoft End-User Support Forums
Microsoft End-User Support Forums 	Service: MSUSER

Microsoft offers several forums in which users of various programs can access technical support directly from MicroSoft representatives and other members. These forums include Microsoft Applications, Microsoft Client Server Computing, Microsoft Excel, Microsoft DOS, Microsoft Word, Microsoft Windows Forum.  +


Microsoft Excel Forum
Microsoft Excel Forum  	Service: EXCEL

The Microsoft Excel Forum provides technical support for all versions of Microsoft Excel. Templates and spreadsheets are available for downloading.  +


Microsoft Fox Forum
Microsoft Fox Forum	Service: FOXFORUM

The Fox Software Forum provides support for Fox database management and graphics software. Software supported includes FoxPro, FoxBASE+ and FoxBASE+/Mac. Support is also provided for third-party software, hardware, applications and development, operating systems and consultants. The libraries contain templates, technical notes and programs for use with Fox software.  +


Microsoft Italy Forum
Microsoft Italy Forum	Service: MSITALY

The MS Italy Forum supports Microsoft's Italian application software and programming languages and hosts discussions among users of Microsoft's Italian application software. Visit the forum's libraries for products such as drivers, programming samples and other Microsoft local language products. For additional support, visit other Microsoft forums. +


Microsoft Knowledge Base
Microsoft Knowledge Base	Service: MSKB

Microsoft Knowledge Base is a database which provides access to information about Microsoft products previously available only to the Microsoft support engineers. Search the database by product name, version or category. Or for immediate responses to your questions, perform a full-text search of all documents contained within database that contain the subject of your question. Also communicate directly with Microsoft by sending an electronic message to its Help Desk.  +


Microsoft Programming Applications Forum
Microsoft Programming Applications Forum	Service: PROGMSA

If you use WordBasic to program Microsoft application software, you should join this forum.  Microsoft Support Engineers, as well as experienced users, are online to offer technical support.  Find answers to questions about WordBasic's capabilities and learn how to use it for your specific applications. A non-technical section is also available for questions about documentation and for general inforamtion about WordBasic.  +


Microsoft Service Request
Microsoft Service Request	Service: MSR

Microsoft offers the Service Request System as an optional, private (fee-based per incident) technical support service that offers to help solve complex development problems.  Other avenues, such as the Microsoft Developer Support Forums and Microsoft Developer Knowlede Base, should be consulted prior to using the Service Request System.  $


Microsoft Software Library
Microsoft Software Library	Service: MSL

The Microsoft Software Library is a collection of uploaded binary files, samples, technical notes and utilities about various Microsoft programs.  The entire library is keyword searchable and the files can easily be downloaded to your computer.  +


Microsoft Solutions Channels Forum
Microsoft Solutions Channels Forum	Service: MSSOLUTIONS

The Microsoft Solutions Channels Forum provides support for resellers who integrate Microsoft software with a variety of personal computing solutions. The Microsoft Solutions Channels program includes topics for value added resellers (VARs), system integrators, consultants and trainers. For information on Microsoft products, see the Microsoft Connection.  +


Microsoft SQL Server Forum
Microsoft SQL Server Forum	Service: MSSQL

If you use the Microsoft SQL Server SDKs and products, be sure to stop by this forum for technical support and information directly from Microsoft and other experts.  Learn more about development toolkits, front-ends (both MS and non-MS) and SQL connectivity. A nontechnical support section is available for you to ask questions concerning documentation, order information and release information.  +


Microsoft TechNet Forum
Microsoft TechNet Forum	Service: TNFORUM

The MS TechNet Forum is a worldwide forum providing news and downloadable technical information about Microsoft products. Members of this forum exchange technical information about Microsfot products with other experts and peers across the United States and around the world. +


Microsoft TechNet Services Area
Microsoft TechNet Services Area	Service: TECHNET

The MS TechNet Services Area provides a centralized area where users of Microsoft products can access technical information. This area is useful to those who work with or support end users, those who implement or integrate Microsoft software into multivendor environments, or those who use Microsoft tools to creat front-ends, macros or customized applications. The MS TechNet Services Area provides access to the MS TechNet Forum, the MS Knowledge Base, the MS Software Library and other MS forums.


Microsoft Win32 SDK Forum
Microsoft Win32 SDK Forum	Service: MSWIN32

The Microsoft Win32 SDK Forum offers you a place to find information aobut the Microsoft Win32 Application Porgramming Interface.  Representatives from the Microsoft Developer Relations Group are online to provide you with general information on 32-bit computing and to monitor the forum to ensure that you receive complete and accurate information.  You will also have access to information about future versions of Microsoft Windows that will support the Win32 API.  +


Microsoft Windows Forum
Microsoft Windows Forum	Service: MSWIN

The MS Windows Forum, operated by MS Product Support Services, provides Microsoft Windows customers with technical support and information. The message sections contain non-technical customer service information as well as information about setup, use of a mouse, video display and networking with Windows. The libraries contain video and printer drivers as well as an index and information on all MicroSoft forums.  +


Microsoft Windows Extensions Forum
Microsoft Windows Extensions Forum	Service: WINEXT

The Microsoft Windows Extensions Forum provides a platform for technical assistance for Microsoft development tools such as OLE and Pen SDK. Microsoft Support Engineers monitor all sections in this forum to ensure that you receive current and accurate information and to provide technical assistance to Windows software developers.  +


Microsoft Windows Fun Forum
Microsoft Windows Fun Forum	Service: WINFUN

The MS Windows Fun Forum contains a plethora of games, sounds, screen savers, icons and graphics. A section devoted to files for kids contains math and spelling learning tools. Technical support is available through the MS Windows Forum. For other shareware/freeware, visit the MS Windows Shareware Forum. +


Microsoft Windows NT Pre-Release Forum
Microsoft Windows NT Pre-Release Forum	Service: WINNT

The Microsoft Windows NT Pre-Release Forum was developed for users of the preliminary release version of Microsoft Windows NT.  As a member, you can ask quesitons of Microsoft, report bugs and discuss the Windows NT operating system.  A non-technical message section is also available for you to inquire about missing components such as documentation and disks.  For information about Windows 32-bit development, see the Microsoft Win32 Forum.  +


Microsoft Windows Objects Forum
Microsoft Windows Objects Forum	Service: WINOBJECTS

Obtain support for the Microsoft Windows object oriented products, such as OLE, in the MS Windows Objects Forum. Windows users can talk directly with technical support on issues such as component object models and structured storage. A message section is devoted to non-technical support. +


Microsoft Windows SDK Forum
Microsoft Windows SDK Forum  	Service: WINSDK

Developers using the Windows Software Development Kit will want to take advantage of the community of assistance and support available in the Windows SDK Forum. Help is available for subjects such as tools, accelerators, controls, dialogue boxes, memory management, fonts, palettes and color.  +


Microsoft Windows Shareware Forum
Microsoft Windows Shareware Forum	Service: WINSHARE

The MS Windows Shareware Forum is designed for the distribution and discussion of Windows shareware/freeware. The libraries contain utilities, applications, program managers and business/finance software. Technical support is available through the MS Windows Forum. For other shareware/freeware, visit the MS Windows Fun Forum. +


Microsoft Word Forum
Microsoft Word Forum	Service: MSWORD

If you use Microsoft Word for Windows, Macintosh, DOS or OS/2 environments, join this forum for technical support and informative discussions about Word's components and features.  In the forum's Support section, ask your technical questions.  In the Discussions section, participate in conversations with other forum members about Word in general.  A Project Worktable section is available in which you can discuss your Word projects with other forum members.  +


Microsoft Workgroups Forum
Microsoft Workgroups Forum	Service: MSWRKGRP

This forum provides a central location for users of the Windows for Workgroups electronic mail programs to find information and support.  Message and library sections provide information about MS Mail for the PC, MS Mail for the Macintosh, PC LAN Email and Mac LAN Email.  Other sections can help you with setup, connectivity and accessories.  A nontechnical support section is also available for your questions concerning documentation, order information and release information.  +


MIDI A Vendor Forum
MIDI A Vendor Forum  	Service: MIDIAVEN

Whether you are an experienced or novice user of MIDI music products, you can communicate directly with several vendors in the MIDI industry by joining the MIDI Vendor Forum. Vendors participating in this forum provide you with easier access and wider support for their products. Also professional musicians who are members in this forum discuss their experiences with MIDI and can further provide you with recommendations. This forum includes the following companies: Animotion, Barefoot/Hybrid, Big Noise Software, Inc., E-Mu Systems, Eventide, JLCooper Electronics, Kurzweil Music Systems - Young Chang, Magnetic Music, Music Quest, Opcode Systems Incorporated, PG Music, Turtle Beach Systems and Twelve Tone Systems. See each vendor's individual description within this section for a list of supported products. For additional MIDI support and vendors, access the MIDI B Vendor Forum, the MIDI C Vendor Forum or the MIDI/Music Forum.  +


MIDI B Vendor Forum
MIDI B Vendor Forum	Service: MIDIBVEN

The MIDI B Vendor Forum features MIDI vendors delivering online support to their customers.  The following companies and the products each supports are included in this forum:  Coda Music Software, Cool Shoes Software, Covox, Key Electronics, Lexicon, Live Sound!, Mackie Designs, Media Vision, Midiman, Passport Designs, SweetWater Sound, and Temporal Acuity Products.  See each vendor's individual description for a list of supported products.  For additional vendeors and support, access the MIDI A Vendor Forum, the MIDI C Vendor Forum, or the MIDI/Music Forum.  +


MIDI C Vendor Forum
MIDI C Vendor Forum	Service: MIDICVEN

The MIDI C Vendor Forum features MIDI vendors delivering online support to their customers. The following companies support their products in this forum: Dr. T's, Howling Dog, Innovative Quality Software, MOTU, Roland, Soundcraft, Steinberg/Jones and Thoughtprocessors. See each vendor's individual description for a list of supported products. For additional vendors and support, access the MIDI A Vendor Forum, the MIDI B Vendor Forum, or the MIDI/Music Forum.  +


Midiman
Midiman	Service: MIDIBVEN

Midiman provides technical support for its full line of hardware, software, MIDI interfaces, accessories and upgrade kits within the MIDI B Vendor Forum.  +


MIDI/Music Forum
MIDI/Music Forum  	Service: MIDIFORUM

If you enjoy making music, join the MIDI/Music Forum. The forum provides support for Musical Instrument Digital Interface, synthesizers, MIDI sound modules and sound cards. Discuss topics ranging from equipment reviews, composing and recording. The synth/sampler libraries contain files to load into your equipment. The song libraries contain hundreds of musical compositions to play at your leisure. +


MIP Fund Accounting
MIP Fund Accounting	PCVENF

Access the MIP Fund Accounting section of the PC Vendor F Forum to obtain information regarding the MIP Fund Accounting System.  Theis PC-based fund accounting system is designed for not-for-profit organizations.  +


Mirror Technologies
Mirror Technologies	Service: MACCVEN

Mirror currently offers products in three main categories:  storage devices, video display systems, and input/output devices which currently consist of 24-bit color scanners.  Access the Mirror Technologies  section of the Mac C Vendor Forum to obtain technical support.  +


Missionware Software
Missionware Software	Service: ATARIVEN

Find support for Missionware Software's Atari-based programs such as Printer Initializer, Lottodds and Flash II in the Atari Vendors Forum.  +


Model 100 Forum
Model 100 Forum  	Service: M100SIG

The Model 100 Forum is intended for the users of the TRS-80 Model 100. Members can share knowledge, experiences, programs and product information with other members. There are 17 message board topics and databases which contain 1,000+ files of interest to Model 100 users. The library and message board also support Tandy models 200 and 600 and WP-2.  +


Modem Vendor Forum
Modem Vendor Forum	Service: MODEMVENDOR

If you use a modem or are considering purchasing one, join this forum where selected vendors provide support for their customers as well as to potential customers.  This forum includes the following companies: Boca Research, The Complete PC, Computer Peripherals, Global Village Communications, Megahertz, MultiTech Systems,PSI Integration, Inc., Supra Corporation, Telebit, US Robotics and Zoom Telephonics.  Besides direct support from vendors, you will also find members who can share their experiences with using different brands of modems.  In addition to the communication with company representatives, you will find help files, programs, patches and example files in the libraries.  +


Monotype
Monotype	Service: MONOTYPE

Monotype supports its font products for printers such as PostScript, TrueType and FoneFonts in its section of the DTP Vendor Forum. +


MOTU
MOTU	Service: MIDICVEN

MOTU (Mark of the Unicorn) provides support for its line of MIDI products including the MIDI Time Piece and Unisyn, a sound editor/librarian, in the MIDI C Vendor Forum. +


Multi-Tech Systems
Multi-Tech Systems	Service: MULTITECH

Multi-Tech provides support for its modems such as MultiArray, MultiMax and MultiModem in its seciton of the Modem Vendor Forum.  +


Multimedia Forum
Multimedia Forum  	Service: MULTIMEDIA

The Multimedia Computing Corporation offers this forum for people who are interested in the emerging technology of multimedia, the use of audiovisual enhancements with computers. The use of computer enhancements such as audio, video, animation and music, along with platform-specific topics are common areas of discussion in this forum. Members can learn from one another's experiences and knowledge and find application ideas through the conference area and message boards.  +


Multimedia Vendors Forum
Multimedia Vendors Forum  	Service: MULTIVENDOR

When you are ready to add video, sound, animation or music capabilities to your computer, join this forum to find answers to your questions about many of the leading multimedia hardware and software products. Learn about other members' first-hand experiences in multimedia equipment for purchasing advice. Vendors are online to help you choose the right equipment for your application. This forum includes the following companies: Aimtech, Asymetrix, BCD Associates, Cognetics, HSC Software, Lenel Systems, Media Vision, New Media Graphics, nTergaid, Specular International, True Vision, Turtle Beach, VideoLogic and The Voyager Company. See each vendor's individual description within this section for a list of supported products.  +


M-USA Business Systems
M-USA Business Systems	Service: PCVENC

M-USA offers support for its PACIOLI 2000 ACCOUNTING, PACIOLI 2000 PAYROLL, CashBIZ (personal finance software) and M-USA Video programs.  Access its support section in the PC Vendor C Forum to obtain information and technical support for these products.  +


Music Quest
Music Quest	Service: MUSICQUEST

Music Quest supports its MIDI Programmer's Tooklit and MIDI Starter System in the MIDI A Vendor Forum.  +


Mustang Software
Mustang Software  	Service: PCVENA

Mustang Software supports WILDCAT! Bulletin Board system, QMODEM, OFFR-LINE, wcMHS and MIDNIGHT MAIL in the Mustang Software section of the PC Vendor A Forum.  +


National Computer Security Association
National Computer Security Association	Service: NCSA

The National Computer Security Association offers a discussion ground and series of informative files on all aspects of computer security, including computer viruses, encryption techniques, data center security and other issues within its section of the McAfee Virus Help Forum.  +


NBI
NBI  	Service: LEGACY

NBI, Inc. produces Legacy, a word processing program developed for the Windows  environment. Legacy is supported in the NBI section of the Windows Third Party Application B Forum.  +


NetFRAME Systems
NetFRAME Systems  	Service: PCVENC

NetFRAME supports its Network Server Systems in its support section of the PC Vendor C Forum.  +


Network General
Network General	Service: NETGENERAL

Network provides support for its networking analysis products in its sections of the PC Vendor C Forum. Access this section to get support and information on the Sniffer family of network analysis products. +


New Horizons
New Horizons  	Service: AMIGAVENDOR

New Horizons Software, Inc. produces personal productivity packages for the Amiga computer including ProWrite, ProScript and Flow. New Horizons supports these products online in the Amiga Vendor Forum.  +


New Media Graphics
New Media Graphics	Service: MULTIVENDOR

Representatives from New Media Graphics support its full line of desktop video products for IBM PCs and compatibles in its section of the Multimedia Vendor Forum.  +


NewTek
NewTek  	Service: AMIGAVENDOR

NewTek has many products exclusively for the Amiga computer. NewTek's products supported in the Amiga Vendor Forum include Digi-View, Digi-Paint3, Digi-View Gold and the Video Toaster.  +


Newton/PIE Forum
Newton/PIE Forum	Service: NEWTON

The Newton/PIE Forum provides the latest advancements and enhancements for the new line of personal information organizers from Personal Interactive Electronics (PIE), a division of Apple, Inc. PIE's Newton Group has developed the Netwon MessagePad, the first in its line of pen-based personal communicators. The forum provides end-user support for the Newton MessagePad. Topics covered include development and connectivity issues related to IBM PCs and Macintosh platforms. +


NeXT Forum
NeXT Forum  	Service: NEXTFORUM

The NeXT Forum provides technical support for users of the NeXT computers and products. Through the message sections and libraries, you can learn more about NeXT products such as Interface Builder, Edit and Webster and other NeXT application software from companies such as WordPerfect, Frame Technology and Lotus.  +


Nisus Software
Nisus Software	Service: MACAVEN

Nisus provides support for Nisus, its Macintosh word processor, in the Nisus section of the Mac A Vendor Forum. +


Northgate Computer Systems, Inc.
Northgate Computer Systems, Inc. 	Service: NORTHGATE

Northgate Computer Systems supports Microstation - high performance 286 Computer Systems; SlimLine - high performance 286, 386DX and 386SX computer systems, the SlimLine series; Elegance - high performance 386 and 486 computer systems; and Omni, including the Omnistation, OmniSystem and OmniKey keyboards in the Northgate Computer section of the PC Vendor A Forum.  +


Notework Corporation
Notework Corporation	Service: NOTEWORK

Notework provides support for its LAN-based electronic mail program and related communications software in the Notework section of the Novell Vendor Forum. +


Novell Buyer's Guide
Novell Buyer's Guide	Service: NOVBG

The Novell Buyer's Guide is a database of all of Novell's products. The products are categorized inot operating systme, network services, communications, inter-networking, Unix connectivity and network management products. The database also includes NetWare application and UnixWare developer tools. +


Novell Desktop Systems Group Forum
Novell Desktop Systems Group Forum	Service: NDSG

The Desktop Systems Group Forum is a professional forum for end users and software developers. Topics cover application notes and patches, concurrent operating system information, DR-DOS, NetWare Lite, Dataclub and graphics.  In addition, end user support and information are available.  +


Novell Files Area
Novell Files Area	Service: NOVFILES

This area contains the most popular files from the Novell Library. When the files become downloaded less frequently, they are returned to the Novell Library. Besides highly active files, the Novell Files Area contains critical files, including patches, product updates and client kits. For other Novell files, visit the Novell Library. +


Novell Forums
Novell Forums	Service: NOVFORUM

Users of Novell's local area network products receive support and technical information directly from Novell through the Novell Forums. Issues such as compatibility and ways to integrate various types of hardware and software into Novell's systems are discussed. Note that while all Novell forums include messaging and conferencing, only the Novell Library includes libraries and files.


Novell Forum A
Novell Forum A  	Service: NOVA

This forum covers the topics relating some of the NetWare operating systems and Novell's communication products. This forum also includes libraries that contain utilities and programs provided by Novell and other members of the Novell forums. For more information about Novell products, see Novell Forum B, Novell Forum C, Novell NetWare 2.X Forum, Novell NetWare 3.X Forum and Novell Netware 4.X Forum.  +


Novell Forum B
Novell Forum B  	Service: NOVB

Network topologies, file servers and workstation issues are discussed in this Novell forum. Users of Novell systems can find support and answers to technical questions about backups, printing, cabling, media, UPS monitoring devices and disk drives. For information about Novell products, see Novell Forum A, Novell Forum C, Novell NetWare 2.X Forum and Novell NetWare 3.X Forum and Novel Netware 4.X Forum.  +


Novell Forum C
Novell Forum C  	Service: NOVC

Novell Forum C covers NetWare Requester for OS/2 and development, network management, upgrades and programming in the NetWare environment. Find out more about Novell's CNE program. Members can meet with Novell staff members and prospective resellers in this forum to exchange information and experiences about reselling and about becoming a reseller. Support is also offered for users of Btrieve. For more information about Novell products, see Novell Forum A, Novell Forum B, Novell NetWare 2.X Forum, Novell NetWare 3.X Forum and NetWare 4.X Forum.  +


Novell Library
Novell Library  	Service: NOVLIB

The Novell Library is the distribution point for all files uploaded or downloaded in NetWire. A message section is available for question about files that appear in the libraries.  +


Novell NetWare Support Providers Directory
Novell NetWare Support Providers Directory	Service: NSP

Users of Novell's products such as NetWare can quickly locate support providers within a specific geographic area or those that offer special services. Search for support providers by company name, service, or geographic location. Each description provides the name, headquarter and branch locations, telephone numbers, production supported and services provided.  +


Novell NetWare 2.X Forum
Novell NetWare 2.X Forum  	Service: NETW2X

The Novell NetWare 2.X Forum provides information and answers to questions relating specifically to NetWare version 2.X. Individual sections are devoted to printing, utilities, disk drivers and controllers. For information on NetWare 3.X, see Novell NetWare 3.X Forum Information on NetWare 4.X can be found in the Novell Netware 4.X Forum.  +


Novell NetWare 3.X Forum
Novell NetWare 3.X Forum  	Service: NETW3X

The Novell NetWare 3.X Forum provides information and answers to questions relating specifically to NetWare version 3.X. Individual sections are devoted to printing, utilities, disk drivers and controllers. For information on NetWare 2.X, see Novell NetWare 2.X Forum Information on Netware 4.X can be found in the Novell Netware 4.X Forum.  +


Novell NetWare 4.X Forum
Novell NetWare 4.X Forum	Service: NETW4X

The Novel NetWare 4.X Forum provides information and answers to questions relating specifically to NetWare version 4.X. Individual sections are devoted to printing, utilities, disk drivers and controllers. For information on NetWare 2.X, see Novell NetWare 2.X Forum Information on Netware 3.X can be found in the Novell Netware 3.X Forum.  +


Novell NetWire
Novell NetWire  	Service: NOVELL

Novell's NetWire provides 24-hour information and support for those who develop, sell, maintain and use Novell products. NetWire's online resources include product support, information, press releases, compatibility information, a technical bulletin database and a calendar of events. NetWire is updated daily with current information on installing, maintaining and using Novell's local area network products.  +


Novell User Library Forum
Novell User Library Forum	Service: NOVUSER

Download third party public domain and shareware software for NetWare environments from the Novell User Library Forum. If you have developed a NetWare software program, upload it into the forum's libraries. The libraries also contain patches for disk drivers, LAN drivers and communications drivers; printer utilities; management tools; job postings and classifieds. +


Novell Vendor Forum
Novell Vendor Forum	Service: NOVVEN

The Novell Vendor Forum provides members with support for NetWare related products. This forum includes the following companies:  AST Research, Best Power Technology, Blue Lance, Computer Tyme, Dell, Folio, Infinite Technologies, Knozall Systems, Inc., LAN Support Group, Notework Corporation, RoseWare, SynOptics Communications, Inc. and Tricord Systems. You will be able to obtain information from these companies regarding pricing, product releases, technical requirements and functionality.  +


nTergaid
nTergaid  	Service: NTERGAID

Find online support for HyperWriter, nTergaid's hypermedia authoring software, in the nTergaid section of the Multimedia Vendors Forum, along with support for other hypermedia-related products.  +


Object Design
Object Design	Service: ODIFORUM

Object Design provides support for ObjectStore, an object-oriented database management system, in its section of the PC Vendor H Forum. +


Okna Corporation
Okna Corporation	Service: OKNA

Okna, producers of organizing and scheduling software, provide support for DeskTop Set in its section of the Windows 3rd Party Applications D Forum. +


Olduvai Corporation
Olduvai Corporation  	Service: MACBVEN

Olduvai provides support for its products including Read-It!, OCR for any scanner, Personal, MultiClip, ClipShare and Video Pain in the Olduvai section of the Mac B Vendor Forum.  +


Online Today
Online Today  	Service: OLT

Online Today provides daily updated computer and information industry news, CompuServe news, product announcements, reviews of new hardware, software, books and more.  +


Opcode Systems Incorporated (MIDI)
Opcode Systems Incorporated (MIDI) 	Service: MIDIAVENDOR

Find support for products developed by Opcode Systems in the Opcode section of the MIDI Vendor Forum. Opcode manufactures an array of products for the MIDI environment including Book of MIDI, CUE-The Film Music System, EZ Vision, Galaxy, Max MIDI Translator, MIDIplay, OMS, Studio Vision, Track Chart and Vision.  +


Oracle Forum
Oracle Forum  	Service: ORACLE

The Oracle Forum provides support for Oracle users and links them directly to the International Oracle Users Group, Oracle developers and other professionals who respond to technical questions. Scan the forum's technical libraries for tips and solutions to common questions about Oracle products, including SQL*Forms, SQL*Plus and Pro*C. Also become acquainted with the IOUG. +


Oregon Research Associates
Oregon Research Associates	Service: ATARIVEN

Oregon Research Associates provides support for its Atari compatible programming, database and graphics programs in the Atari Vendors Forum. +


OS-9 Forum
OS-9 Forum  	Service: OS9

The OS-9 Operating System Forum is dedicated to users of the OS-9 operating system. The forum contains programs, utilities, data files, hints, tips and discussions that pertain to OS-9.  +


OS/2 Vendor Forum
OS/2 Vendor Forum	Service: OS2AVEN

Users of OS/2 can obtain support from a number of OS/2 applications developers and products for the OS/2 environment in the OS/2 Vendor Forum. Obtain support from vendors such as Creative Systems Programming, Development Technologies, HockWare, Sourceline Software and Sundial Systems. In the forum, you can also discuss OS/2-related issues with the editors of OS/2 Monthly. +


Pacific Data Products, Inc.
Pacific Data Products, Inc.  	Service: PACDATA

Pacific Data Products manufactures a full line of printer utilities, drivers and spoolers including printer boards and cartridges. Find support for its products in the PC Vendor D Forum.  +


Pacific Vendor Forum
Pacific Vendor Forum	Service: PACVEN

In the Pacific Vendor Forum, you can obtain support from Australian and New Zealand manufacturers and distributors of computer products. The companies represented include: Banksia Information Technologies, Fujitsu Peripherals, Maestro, NetComm, Reckon Software, SoundBlaster and WizardWorks with new vendors continually being added.  +


Packard Bell Forum
Packard Bell Forum	Service: PACKARDBELL

Packard Bell computer users should join this forum to communicate directly with representatives from Packard Bell and obtain technical support.  Meet others who can offer advice and trouble-shooting tips for the products you use.  The libraries contain files about many products designed for PB computers such as mouse drivers, video card drivers, anti-virus software, shareware utilities and multimedia enhancers.  +


Palmtop Forum
Palmtop Forum  	Service: PALMTOP

The Palmtop Forum provides information about the smallest type of computers. Members discuss topics such as how to interface a palmtop with a desktop system and using a palmtop for telecommunications. Besides general discussions about palmtop computing, this forum also offers its members individual message sections and library files devoted to specific models and brands of palmtop computers. Several vendors of palmtop products are online offering technical support for their products. This forum includes the following vendors: Casio Inc., Databook Incorporated, Poqet Computer, Psion Inc., Sharp Electronics Corporation and Traveling Software, Inc. See each vendor's individual description within this section for a list of supported products.  +


Paradigm Software, Inc.
Paradigm Software, Inc.  	Service: LOGOFORUM

Find support for Object Logo, developed by Paradigm Software for the Macintosh, in the Object Logo section of the Logo Forum.  +


Parsons Technology, Inc.
Parsons Technology, Inc.  	Service: PCVENC

MoneyCounts, Quickverse, Personal Tax Edge and other Parsons Technology products are supported within the PC Vendor C Forum.  +


Passport Designs
Passport Designs	Service: MIDIBVEN

Passport Designs supports its line of Encore and Music Time MIDI/Notation, MasterTracks and Trax Midi Sequencers, and Producer products in its section of the MIDI B Vendor Forum.  +


Paul Mace Software
Paul Mace Software  	Service: GRASP

Paul Mace Graphics Software provides support for its GRASP presentation/animation program in the Grasp section of the Graphics Vendor Forum.  +


PC Brand
PC Brand	Service: PCVENG

PC Brand supports its line of motherboards in its section of the PC Vendor G Forum.  +


PC/Contact Forum from PC/Computing Forum
PC/Contact Forum from PC/Computing 	Service: ZNT:PCCONTACT

PC/Contact, part of ZiffNet, is a forum for discussions among PC/Computing's editors and readers. In addition to exchanging ideas or getting questions answered from your favorite writer or colleague online, you can contact the PC/Advocate about problems with vendors or talk to the Phantom Shopper to share your experiences with computer dealers around the country. Plus you can browse through the library for tips and download productivity tips and tricks.  +


PC-Kwik Corporation
PC-Kwik Corporation	Service: PCVENA

PC-Kwik provides support for Super PC-Kwik, PC-Kwik Power Disk and PC-Kwik Power Pack in its secton of the PC Vendor A Forum. +


PC MagNet from PC Magazine
PC MagNet Forums from PC Magazine  	Service: ZNT:PCMAGNET

PC MagNet, part of ZiffNet, is the source for some of the finest collections of utilities that meet the standards of PC Magazine. Download utilities from the latest issues. Contact the staff at PC Magazine and ask for advice, tell the editors what you thought about their latest product review, debate the issues with the columnists and get answers to your specific questions.  +


PC Plus/PC Answers Forum
PC Plus/PC Answers Forum	Service: PCPFORUM

Access PC Plus/PC Answers Forum to chat with the editorial staff and other readers of the UK PC Plus and PC Answers magazines published by Future Publishing.  Discuss information published in the magazine and pose your PC-related questions to the magazine experts.  Download programs included on the magazines' cover disks.  These contain shareware programs such as word processors, games and packages from popular publishers such as Lotus.  Commonly discussed topics include new uploads, programming, shareware, and software hints and tips.  +


PC Plus/PC Answers Online
PC Plus/PC Answers Online	Service: PCPLUS

PC Plus/PC Answers Online is the place for readers of the UK-published PC Plus and PC Answers magazines to communicate directly with the editors, download and upload shareware programs, submit articles to the magazine and receive information about the programs on each SuperDisk.  This area also contains the PC Plus/PC Answers Forum, which enables you to chat with other readers and editorial staff of PC Plus and PC Answers.  +


PC Sources Forum
PC Sources Forum	Service: ZNT:SOURCES

If you read PC Sources, you should join the PC Sources Forum where you can talk to editors, columnists, writers, industry experts, company representatives, and other buyers like yourself.  Part of ZiffNet, the PC Sources Forum provides you with information to help you make the best computer-buying decisions for your needs.  +


PC Vendor A Forum
PC Vendor A Forum  	Service: PCVENA

The PC Vendor A Forum provides members with support from vendors of PC products. This forum includes the following companies: ButtonWare, Ctrlalt Associates, Custom Technologies, DeScribe, Enable Software, Foresight, Magee Enterprises, Mansfield Software, Mustang Software, Northgate Computer Systems Inc., PC-Kwik Corp.,Qualitas,  and Quercus Systems. See each vendor's individual description within this section for a list of supported products. Libraries contain help files, programs and patches for the products. For support from additional PC vendors, see the PC Vendor B Forum, the PC Vendor C Forum, the PC Vendor D Forum, the PC Vendor E Forum, the PC Vendor F Forum, the PC Vendor G Forum, the PC Vendor H Forum, or specific software publisher's forums.  +


PC Vendor B Forum
PC Vendor B Forum  	Service: PCVENB

The PC Vendor B Forum provides members with support from vendors of PC products. This forum includes the following vendors: Advanced Gravis Computer Technology, ChipSoft, DacEasy, Greenleaf Software, Inmagic, J.P. Software, Korenthal Associates, Personics Corporation, PowerBASIC, Powercore, Inc., Primavera Systems, PRO-C Corporation, Prolog Development Center, Quicksoft, and TurboPower Software. See each vendor's individual description within this section for a list of supported products. Libraries contain help files, programs and patches for the products. For support from additional PC vendors, see the PC Vendor A Forum, the PC Vendor C Forum, the PC Vendor D Forum, the PC Vendor E Forum, the PC Vendor F Forum, the PC Vendor G Forum,  the PC Vendor H Forum, or specific software publisher's forums.  +


PC Vendor C Forum
PC Vendor C Forum  	Service: PCVENC

The PC Vendor C Forum provides members with support from vendors of personal computer products. This forum includes the following companies: Beyond, Inc., Gateway 2000, Hooper International, Innovative Data Concepts, M-USA, NetFRAME Systems, Network General, Parsons Technology, PKWare, Rupp Corporation, Vericomp Corporation and Wordtech Systems. See each vendor's individual description within this section for a list of supported products. Libraries contain help files, programs and patches for the products. For support from additional PC vendors, see the PC Vendor A Forum, the PC Vendor B Forum, the PC Vendor D Forum, the PC Vendor E Forum, the PC Vendor F Forum, the PC Vendor G Forum, the PC Vendor H Forum, or specific software publisher's forums.  +


PC Vendor D Forum
PC Vendor D Forum  	Service: PCVEND

The PC Vendor D Forum provides members with support from vendors of personal computer products. This forum includes the following companies:  Above Software, BLOC Publishing, Brightwork Development, Clarion Tech Journal, Complementary Solutions Inc., Cumulus Corporation, , GammaLink, Hyperkinetix, Legato Systems, Magma Systems, Micropolis Corporation, Pacific Data Products, Procom Technology Inc., Tech III and Timeslips Corporation. See each vendor's individual description within this section for a list of supported products. Libraries contain help files, programs and patches for the products. For support from additional PC vendors, see the PC Vendor A Forum, the PC Vendor B Forum, the PC Vendor C Forum, the PC Vendor E Forum, the PC Vendor F Forum, the PC Vendor G Forum, the PC Vendor H Forum, or specific software publisher's forums.  +


PC Vendor E Forum
PC Vendor E Forum  	Service: PCVENE

The PC Vendor E Forum provides members with support from vendors of PC products. This forum includes the following companies: AddStor, Inc., Alpha Software, American Cybernetics, American Power Conversion, Contact Software International, DSI Software Systems, Farallon, Hyundai, Iomega, SemWare, XTree Company and Zeos. See each vendor's individual description within this section for a list of supported products. Libraries contain help files, programs and patches for the products. For support from additional PC vendors, see the PC Vendor A Forum, the PC Vendor B Forum, the PC Vendor C Forum, the PC Vendor D Forum, the PC Vendor F Forum, the PC Vendor G Forum, the PC Vendor H Forum, or specific software publisher's forums.  +


PC Vendor F Forum
PC Vendor F Forum	Service: PCVENF

The PC Vendor F Forum provides members with support from vendors of PC products.  This forum includes the following companies:  Acer America, Avery Dennison, Command Software Systems, Dvorak Dvelopment, Faircom Corp., Funk Software, Hilgraeve,  MIP Fund Accounting, PCMCIA, Peachtree Software, Pure Data, Ltd., Storage Dimensions, TRIUS  and Willies' Computer Software Co.  See each vendor's individual description for a list of supported products.  Libraries contain help files, programs and patches for the products.  For support from additional PC vendors, see the PC Vendor A Forum, the PC Vendor B Forum, the PC Vendor C Forum, the PC Vendor D Forum, the PC Vendor E Forum, the PC Vendor G Forum, the PC Vendor H Forum, or specific software publishers' forums.  +


PC Vendor G Forum
PC Vendor G Forum	Service: PCVENG

The PC Vendor G Forum provides members with support from vendors of PC products. This forum includes the following companies: ALR, Brown Bag Software, Cheyenne Software, Cogent Data Technologies, Futurus Corporation, Helix Software, Identitech, Inc., Madge Networks, Magic Software, PC Brand, Pinnacle Publishing, Reach Software Corporation, SofNet, SunDisk, Swan Technologies and Vertisoft. See each vendor's indivual description within this section for a list of support products. Libraries contain help files, programs and patches for the products. For support from additional PC Vendors, see the PC Vendor A Forum, the PC Vendor B Forum, the PC Vendor C Forum, the PC Vendor D Forum, the PC Vendor E Forum, the PC Vendor F Forum, the PC Vendor H Forum, or specific software publishers' forums.  +


PC Vendor H Forum
PC Vendor H Forum	Service: PCVENH

The PC Vendor H Forum provides members with support from vendors of personal computer products. This forum includes the following companies: Alcom, IQ Technologies, Lahey Computer Systems, Micro Focus, Micronetics Design, Object Design, Performance Technology, PC SIG, Reality Technologies, ReferencePoint, RTA, Ltd., Strategic Mapping, WATCOM, and Zircom. See each vendor's individual description for a list of supported products.  Libraries contain help files, programs and patches for the products.  For support from additional PC vendors, see the PC Vendor A Forum, the PC Vendor B Forum, the PC Vendor C Forum, the PC Vendor D Forum, the PC Vendor E Forum, the PC Vendor F Forum, the PC Vendor G Forum, or specific software publishers' forums.  +


PC Week
PC Week  	Service: ZNT:NEWS

PC Week is online as part of ZiffNet enabling you to keep up with all the industry news -- you can even see the headlines and summaries of news stories the Friday before they are published. See what the notorious Spencer F. Katt has discovered this week or discuss the news and issues of the industry with the writers, editors and other readers of the magazine.  +


PC Week Extra! Forum from PC Week
PC Week Extra! Forum from PC Week 	Service: ZNT:PCWEEK

The PC Week Forum on ZiffNet provides a platform for corporate buyers and the writers and editors of PC Week to exchange information and ideas on what products and services to buy, plus an opportunity to debate industry issues. Typical discussions focus on managerial issues, networking strategies and news and current events in the computer industry. In addition, staff analysts and writers discuss product reviews and solicit your input as they develop future editorial plans.  +


PC World Online
PC World Online	Service: PCWORLD

PC World Online provides an online version of each month's magazine online. In addition, there is a searchable databse of issues from 1990 to the present. The PC World libraries contain over 300 megabytes of specially selected shareware and freeware. The message boards provide the ability to communicate directly with editors, system operators, and PC World subscribers concerning features and areas of special interest. PC World and the "Online Exclusie Area" where you can obtain news, reviews and commentaries prepared exclusively for online subscribers.  +


PCI SIG
PCI SIG	Service: PCVENH

Members of Peripheral Component Interconnect (PCI), an organization to set standards in the microcomputer industry, offer the Special Interest Group (SIG) in the PC Vendor H Forum. This SIG enables people to learn about PCI and its effects on the microcomputer world. +


PCMCIA
PCMCIA	Service: PCVENF

Access the PCMCIA section of the PC Vendor F Forum to learn how to join the Personal Computer Memory Card International Association (PCMCIA), a non-profit trade association that develops standars for PC cards.  An address, telephone number and fax number are available for finding more information.  +


PDP-11 Forum
PDP-11 Forum  	Service: PDP11

This forum encourages the exchange of software designed to run on Digital Equipment Corporation's PDP/LSI computer systems and covers many languages used on PDPs including Macro, Fortran, Basic, Basic-Plus, C, DIBOL & DBL and Pascal. PDP-11 Users Group is designed to facilitate communication between users of the PDP-11, LSI-11 and PDP-10 series of computers.  +


Peachtree Software (DOS)
Peachtree Software (DOS)	Service: PEACHTREE

Peachtree Software supports its full line of accounting products within its support section and library of the PC Vendor F Forum.  Representatives from Peachtree provide assistance for products including Peachtree Basic Accounting, PeachPay and Peachtree Complete Accounting.  +


Peachtree Software (Windows)
Peachtree Software (Windows)	Service: WINPEACH

Peachtree Software supports its full line of accounting products within its support section and library of the Windows 3rd Party Applications D Forum.  Representatives from Peachtree provide assistance for products including Peachtree Basic Accounting, PeachPay and Peachtree Complete Accounting.  +


Pen Magazine
Pen Magazine	Service: PENFORUM

Access the PenWorld section within the Pen Technology Forum for discussions on the articles published in Pen Magazine.  Also learn about new pen computer products and communicate directly with the staff at Pen Magazine.  +


Pen Technology Forum
Pen Technology Forum	Service: PENFORUM

The Pen Technology Forum provides support for all aspects of pen computers.  Pen systems range from small hand-held units to full-featured desktop systems with keyboards and writing tablets.  This forum covers topics related to pen-based hardware and software, new communications systems including satellite and cellular lilnks and the latest news and trade show reports.  Company representatives from Communication Intelligence Report (CIC), GO Corp., GRiD Systems, Pen Magazine and Slate Corp., offer support for their pen computer products.  See each vendor's individual description for a list of supported products.  +


Performance Technology
Performance Technology	Service: PERFTECH

Access Performance Technology's section of the PC Vendor H Forum to obtain support for POWERlan or POWERsave. +


Personal File Area
Personal File Area  	Service: PER

As a CompuServe member you are able to store files on CompuServe. This menu choice enables you to catalog those files, edit them, rename them, change their protection level or delete them. A hard-copy printout of your files can be mailed to you for the printing and mailing charges. You can upload and download files from this area and enter the command mode. However, please read your Users Guide before using the command mode.  +


Personics Corporation
Personics Corporation  	Service: PCVENB

Personics provides technical support for UltraVision, Look&Link, @Base, @Base Option Pac, SeeMore for 1-2-3, SeeMore for Symphony, SmartNotes and Headmaster in the PC Vendor B Forum.  +


PG Music
PG Music	Service: PGMUSIC

PG Music, publishers of Band-in-a-Box, provides online technical support via a section in the MIDI A Vendor Forum.  +


Pinnacle Publishing
Pinnacle Publishing	Service: PINNACLE

Pinnacle supports its software tools, special reports and technology reference journals for DOS and Windows users in its support section of the PC Vendor G Forum.  +


PKWare
PKWare  	Service: PKWARE

PKWare supports its data compression products in the PC Vendor C Forum. Its product line includes PKZIP, PKUNZIP, PKSX (Shareware), PKLITE (Shareware), PKLITE Professional (Commercial), PKZMENU (Shareware), PKWARE Data Compression Libraries (Commercial) and PKZFIND.  +


Playroom Software
Playroom Software  	Service: PLAYROOM

Playroom Software supports its series of environment enhancement products such as Button Maker, Makeover and OSFrame in the Playroom section of the Windows Third Party Applications A Forum.  +


Plug and Play Forum
Plug and Play Forum	Service: PLUGPLAY

Members of the Plug and Play Forum can discuss the hardware and software issues involved with implementing Plug and Play on PCs. Plug and Play is a protocol through which cards in an ISA computer are configured by the computer. Therefore, the user does not need to deal with configuration programs. The forum is operated by several hardware and software manufactureres. +


Polaris Software
Polaris Software  	Service: POLARIS

Polaris Software produces PackRat, an information manager for the Windows environment. PackRat is supported in the Polaris section of the Windows Third Party Applications A Forum.  +


Poqet Computer
Poqet Computer  	Service: POQET

Access the Poqet Computer Section of the Palmtop Forum to find support for Poqet Computer's palmtop computer line.  +


Portable Programming Forum
Portable Programming Forum  	Service: CODEPORT

The Portable Programming Forum supports programmers who use various computer languages, such as Modula-2, C-language, UCSD Pascal and P-System, that are highly portable between different hardware platforms. Learn more about portable languages not supported by other CompuServe forums within this forum. Members work with one another on joint, online projects.  +


Portfolio Systems
Portfolio Systems  	Service: MACAVEN

Portfolio Systems provides technical support for its Dynodex product in the Portfolio Systems section of the Mac A Vendor Forum.  +


Power Industries LP
Power Industries LP  	Service: LOGOFORUM

Access the LOGO Forum to find support for Power Industries' Delta Drawing Today product.  +


PowerBASIC
PowerBASIC	Service: PCVENB

Find support for PowerBASIC 2.0 in PowerBASIC's section of the PC Vendor B Forum. +


Powercore, Inc.
Powercore, Inc.	Service: POWERCORE

Access the Powercore section of the PC Vendor B Forum to obtain technical support and product information on Powercore's complete line of scheduling and calendar products, including Network and TimeVision.  +


Powersoft
Powersoft	Service: POWERSOFT

Access Powersoft's section of the Windows 3rd Party Applications D Forum to obtain support for its client/server application development tools such as PowerBuilder and PowerPoint. +


Practical Peripherals Forum
Practical Peripherals Forum  	Service: PPIFORUM

The Practical Peripherals Forum provides help, advice, and technical support for owners of products manufactured and sold by Practical Peripherals and anyone else with an interest in computers and telecommunications. P/Net, which can tie a group of computers and peripherals together, is discussed along with modems, communication programs and printer buffers. Libraries contain utilities, shareware, information files and P/Net files.  +


Precision Software (Atari)
Precision Software (Atari)  	Service: ATARIVEN

Access the Precision Software section of the Atari Vendor Forum to receive technical support for Precision's full line of Atari products. +


Presidio Software
Presidio Software	Service: PRES

PC ANIMATE PLUS is a professional quality computer art, video, music and painting package which can be used to produce professional animated business presentations, movies, cartoons, advertisements, TV station breaks and music videos.  Find support for PC ANIMATE PLUS in the Presidio Software section of the Graphics Vendor Forum.  +


Primavera Systems, Inc.
Primavera Systems, Inc.  	Service: PCVENB

Primavera Systems, Inc. offers technical support for its products including Primavera Project Planner (P3), Primavision, Finest Hour, Parade and Expedition within PC Vendor B.  +


Prisma GmbH Forum
Prisma GmbH Forum	PRISMA

The Prisma GmbH Forum provides technical support in German for users of Macintosh software and hardware, which is provided by the German distributor, Prisma.  The forum's members can beet to swap ideas and get expert advice from the Prisma SysOps.  Help files, utility programs and drivers are available in the forum's libraries for all hardware and software products.  +


PRO-C Corporation
PRO-C Corporation  	Service: PCVENB

PRO-C Corporation provides technical support for PRO-C products in its section of the PC Vendor B Forum.  +


Procom Technology, Inc.
Procom Technology, Inc.  	Service: PTINC

Procom Technology manufactures storage devices for the PC industry. Its products range from fixed drives with either SCSI, IDE, ESDI or Micro Channel interfaces to a full range of external SCSI devices such as CD-ROMs, removable drives, erasable optical drives, tape back-up devices and the latest floptical drive. Procom also develops SCSI host adapters. Find support for all of these products in the Procom Technology section of the PC Vendor D Forum.  +


Prolog Development Center
Prolog Development Center  	Service: PCVENB

Support for PDC Prolog Compiler 3.2, PDC Prolog Toolbox, PDC Prolog Advanced Developer's Guide and Turbo Prolog is provided in the PDC Prolog section of the PC Vendor B Forum.  +


Protoview
Protoview	PROTOVIEW

Protoview provides support for its development tools including ProtoView C, Pascal and C++ for the Windows environment in the Windows Third Party Applications C Forum.  +


PSI Integration
PSI Integration	Service: PSIINTEGRATION

PSI provides support for its modems such as PowerModem and accompanying software such as FaxThis and SoftArc in its section of the Modem Vendor Forum.  +


Psion, Inc.
Psion, Inc.	Service: PALMTOP

Find support for Psion's full line of handheld computers, including the Organiser II and the Series 3 Palmtop in the Psion Inc. section of the Palmtop Forum.  +


Public Brand Software Applications Forum
Public Brand Software Applications Forum	Service: ZNT:PBS

The PBS Applications Forum is a shareware library with a large selection of dowloadable shareware, including business applications, utilities and programming tools for DOS and Windows.  For games and hobbies shareware see the PBS Arcade Forum.  Part of ZiffNet. +


Public Brand Software Arcade Forum
Public Brand Software Arcade Forum	Service: ZNT:PBSARCADE

The PBS Arcade Forum is a shareware library with a large selection of games and hobbies.  Download programs pertaining to home, education, engineering and math applications for both DOS and Windows.  You can also ask questions of PBS staff regarding the shareware.  For more information on PBS shareware, see the Public Brand Software Applications Forum.  Part of ZiffNet.  +


Pure Data, Limited
Pure Data, Limited	Service: PUREDATA

Pure Data, designer and manufacturer of LAN connectivity and fax/modem products, provides support for its products with the PC Vendor F Forum.  +


Q+E Software
Q+E Software	Service: QESOFT

Q+E Software's database products are supported in Q+E's section of the Windows 3rd Party Applications D Forum. Obtain support for products such as MultiLink, QELIB, QEVB and Q+E Database Library. +


QMS
QMS  	Service: QMSPRINT

QMS provides support for its complete line of non-impact print systems including the QMS-PS 410, QMS-PS 815, QMS-PS 825, QMS-PS 810 and the ColorScript 100 Model 10. Support for these products is available in the QMS section of the Desktop Publishing Vendor Forum.  +


Qualitas
Qualitas  	Service: QUALITAS

Support for 386MAX, BLUEMAX and MOVE'EM is provided by Qualitas within its section of the PC Vendor A Forum.  +


Quarterdeck Forum
Quarterdeck Forum  	Service: QUARTERDECK

For technical support for products such as DESQview 386, QEMM 386, QRAM, Manifest, DESQview, QEMM-50/60 join the Quarterdeck Forum.  Quarterdeck representatives are available to supply complete and accurate information about these products and others.  Learn helpful usage and trouble-shooting tips from experienced users and by browsing through library files. +


Quercus Systems
Quercus Systems	Service: QUERCUS

Quercus provides technical support for its Personal REXX and REXXTERM in its section of the PC Vendor A Forum.  +


Quick Pictures Forum
Quick Pictures Forum	Service: QPICS

The Quick Pictures Forum stores low and medium resolution graphic images, provides discussion for specific files and supports the reading of GIF files used elsewhere on CompuServe.  If you have a low-end machine or read a lot of files online, the Quick Picture Forum offers a large library of graphic images that are small in file size and amount of color.  All files in this forum are less than 20K in size and have 16 colors or less.  +


Quicksoft, Inc.
Quicksoft, Inc.  	Service: PCVENB

Quicksoft supports PC-Write and Font Selector in the Quicksoft section of the PC Vendor B Forum.  +


Radius Incorporated
Radius Incorporated  	Service: MACBVEN

Find support and information about Radius products in its section of the Mac B Vendor Forum.  +


Reach Software Corporation
Reach Software Corporation	Service: REACH

Reach Software supports Personal MailMAN and WorkMAN 2.0 for Novell NetWare and Banyan VINES platforms in its support section of the PC Vendor G Forum.  +


Reality Technologies
Reality Technologies	Service: REALITY

Access Reality's section of the PC Vendor H Forum to obtain support for Wealthbuilder, Reality's financial manager program. +


ReferencePoint
ReferencePoint	Service: RPOINT

ReferencePoint provides support for its document manager program in its section of the PC Vendor H Forum. +


Revelation Tech Forum
Revelation Tech Forum  	Service: REVELATION

To build on innovative ideas in database programming, visit with the members of the Revelation Tech Forum. Sponsored by Revelation Technologies, this forum is designed to support users of the relational database, Advanced Revelation. Members share their experiences in developing application programs using this relational database and help others learn how to develop database programs.  +


Right Answers
Right Answers  	Service: AMIGAVENDOR

Right Answers provides technical support for its products such as LOADFAST in the Amiga Vendor Forum.  +


Rix Softworks
Rix Softworks  	Service: RIXSOFT

Rix Softworks provides support for its paint programs including ColoRix for DOS and WinRix for Windows in the Rix Softworks section of the Graphics Vendor Forum.  +


Roland Corp.
Roland Corp.	Service: MIDICVEN

Roland provides support for its line of musical synthesizers, Sound Canvas modules, GR MIDI guitars, SC sound card, drum machines, controllers, mixers and effects units in the MIDI C Vendor Forum. +


RoseWare
RoseWare	Service: ROSEWARE

RoseWare provides support for its book, Programmer's Guide to NetWare, and its technical journal, Network Developer's Resource, in the RoseWare section of the Novell Vendor Forum. +


RTA, Ltd.
RTA, Ltd.	Service: PCVENH

Real Time Associates (RTA) provides support for its products relating to modular programming languages like Modula-2 and Oberon-2 in its section of the PC Vendor H Forum. +


Rupp Corporation
Rupp Corporation  	Service: RUPP

FastLynx, FastLock and Plus FastLynx LapPack are supported by Rupp Corporation in the PC Vendor C Forum.  +


Salient Software
Salient Software	Service: FIFTHGEN

Representatives from Salient Software support its fullline of products within the Fifth Generation Systems Forum.  Receive technical support directly from Salient Software.  +


Santa Cruz Operation Forum
Santa Cruz Operation Forum	Service: SCOFORUM

The SCO Forum supports all SCO end-users, resellers, developers and partners. Sponsored by Santa Cruz Operation, Inc., the forum provides a place for over five million SCO system users worldwide to meet, share information and exchange tips on using SCO's line of Open Desktop, UNIX and XENIX operating systems. Through the forum, SCO also provides product information, bug fixes and advice.  +


Saros
Saros  	Service: SAROS

Saros Corporation produces and supports its series of network file management facilities including Mezzanine and Viewz in the Saros section of the Windows Third Party Applications C Forum.  +


Schemers, Inc.
Schemers, Inc.  	Service: LOGOFORUM

Schemers provides support for its Logo-based products such as Scheme and EdScheme in the Schemers section of the LOGO Forum.  +


Scitex America Corp.
Scitex America Corp.  	Service: SCITEX

Scitex America Corp. produces and supports its series of prepress products for the publishing industry. These products are supported in the Scitex section of the Desktop Publishing Vendor Forum.  +


SemWare
SemWare  	Service: SEMWARE

SemWare is providing support for QEdit, its full-featured text editor, within its section of the PC Vendor E Forum.  +


Seybold Newsletters and Seminars
Seybold Newsletters and Seminars	Service: ZNT:SEYBOLD

In this section of ZiffNet, you can order computer industry newsletters, including Digital Media - A Seybold Report on Publishing Systems from the Seybold research organization.  Get the inside scoop on Seybold confernces, including conferenc syllabi and event schedules.  Part of ZiffNet.  +


ShapeWare
ShapeWare	Service: VISIO

Obtaion support for ShapeWare's drawing and stenciling package, Visio, it its seciton of the Windows 3rd Party Applications D Forum. +


Sharp Electronics Corporation
Sharp Electronics Corporation  	Service: SHARP

Sharp Electronics Corporation provides support for its Wizard line of handheld organizers in the Sharp Wizard section of the Palmtop Forum.  It also provides support for its PC-3000 product line in the PC-3000 section.  +


Sight and Sound Forum
Sight and Sound Forum	Service: SSFORUM

Join the Sight and Sound Forum to discuss and learn about all aspects of computerized visual and audio equipment from techniques for enhancing images with sound to combining graphics and sound files. Obtain sequences from the MIDI song library or participate in the fun of determining the future of GIF enahncements to include sound and music. +


Sigma Designs
Sigma Designs  	Service: SIGMA

Sigma Designs produces and supports its complete line of color, grayscale and monochrome displays and controller boards for IBM compatible and Macintosh computers. These products are supported in the Sigma Designs section of the Desktop Publishing Vendor Forum.  +


Slate Corp.
Slate Corp.	Service: SLATE

Slate Corp. supports its pen-based software applications in  the Slate Corp. section of the Pen Technology Forum.  Slate's product line includes PenApps, At-Hand, Day-Timer Pen Scheduler, PenBook Reader, PenBook Author, Laplink Pro communications software and SafetyPen Utilities.  +


SofNet
SofNet	Service: PCVENG

Access SofNet's section of the PC Vendor G Forum to obtain support for SofNet's FAXWORKS products, including FAXWORKS LAN, Plus and OS/2, which enable documents to be faxed from a PC in a DOS OS/2 or Windows environment.  +


Softbridge
Softbridge  	Service: SOFTBRIDGE

Softbridge supports its series of products for its Bridge 2.0 batch-command language including Auto Test Facility, Bridge Batch and Bridge Tool Kit in the Softbridge section of Windows Third Party Applications B Forum.  +


SoftCraft
SoftCraft  	Service: WINAPB

SoftCraft produces a series of font applications for the Windows 3.0 environment including WYSIfonts!, Sponfont, Font Effects and SoftCraft Font Editor, which are supported in the SoftCraft section of the Windows Third Party Applications B Forum.  +


Soft-Logik Publishing (Amiga)
Soft-Logik Publishing (Amiga)  	Service: AMIGAVENDOR

Find support for Soft-Logik's PageStream, a desktop publishing software program for Amiga computers, in the Amiga Vendor Forum.  +


Soft-Logik Publishing (Atari)
Soft-Logik Publishing (Atari)  	Service: ATARIVEN

Find support for Soft-Logik's PageStream desktop publishing software program for the Atari in the Soft-Logik section of the Atari Vendor Forum.  +


Softsync, Inc.
Softsync, Inc.  	Service: SOFTSYNC

Softsync provides support for its Accountant, Inc. integrated accounting packages and Expert Color Paint within its section of the Macintosh C Vendor Forum.  +


Software Forums
Software Forums  	Service: SOFTWARE

Software Forums provide you with information and support on the most popular software packages on the market. The majority are sponsored by software publishers so you have easy and timely access to their most current technical support information. You can communicate with the software publisher or other users who may have worked through the same problems you are currently experiencing. Libraries contain useful programs that you can download to your computer. Some forums also offer real-time electronic conferences that shed light on current topics. Look for additional related software forums in the Hardware Forums section. By utilizing the software forums, you have support for your computer software 365 days a year, 24 hours a day.


Software Publishers Association Forum
Software Publishers Association Forum 	Service: SPAFORUM

The Software Publishers Association (SPA) sponsors this forum to keep members of SPA, developers and users of computer software aware of SPA activities and developments. Members of the SPA are available online to answer questions about publishing software such as how to obtain a copyright for a newly developed program and to audit multiple computers for pirated programs.  +


Software Publishing Corporation
Software Publishing Corporation  	Service: SPC

Software Publishing Corporation offers technical support through its forum for the full range of SPC software products including Harvard Graphics, Superbase, OfficeWriter, Professional File, Professional Write, Harvard Draw and Harvard GeoGraphics. Support covers international versions of the products.  +


Software Ventures
Software Ventures  	Service: MACBVEN

Access the Software Ventures section of the Mac B Vendor Forum to obtain support for Microphone, Microphone II and Microphone 4.0.  +


Softwood
Softwood  	Service: AMIGAVENDOR

Softwood supports its entire Amiga product line in its support section of the Amiga Vendor Forum. Access this section to receive technical support on Pen Pal, Electric Thesaurus, Classic Clip-Art, People Clip-Art, Proper Grammar and Animal Clip-Art.  +


Soundcraft
Soundcraft	Service: MIDICVEN

Soundcraft provides support for its line of sound mixer products and consoles such as Padless Microphone Technology in its section of the MIDI C Vendor Forum. +


Sourceline Software
Sourceline Software	Service: OS2AVEN

Obtain support for SourceLink, Sourceline Software's OS/2 32-bit programming development environment, in Sourceline's section of the OS/2 Vendor Forum. +


Specular International
Specular International	Service: MULTIVENDOR

Support for Infini-D (V.1.1) can be found in the Specular International section of the Multimedia Vendors Forum.  Infini-D offers modeling, rendering and animation in 32-bit color.  +


Spinnaker Forum
Spinnaker Forum  	Service: SPINNAKER

The Spinnaker Forum provides users of Spinnaker products such as Spinnaker PLUS, Word Publisher, PFS:First Choice, PFS:First Publisher, Eight-in-One, Resume Kit, PFS:WindowWorks, PFS:Write and the EasyWorking product line with current product information and technical support by product specialists. Each section of the message board contains comments and questions about individual products and has a correlating library section full of text files with more information. Special Spinnaker-sponsored conferences are scheduled when the need arises to thoroughly discuss individual products or issues.  +


STAC Electronics
STAC Electronics	Service: STACKER

STACKER is a data compression utility that works in real-time on DOS computers.  STAC support representatives are available in the STAC Electronics Forum to answer questions about STACKER.  +


Standard Microsystems Forum  .
Standard Microsystems Forum  	Service: SMC7

Find information on the latest products and developments from Standard Microsystems Corporation. SMC's products used with ARCnet, Ethernet, SMC EISA, NetWare and other network drivers are discussed and supported in this forum. Download programs such as pictorial network maps that can be used to trouble-shoot networking problems and text files that relay important developments and/or technical tips concerning SMC's products.  +


STB Systems
STB Systems  	Service: STBSYS

STB Systems offers technical support for its PC compatible hardware boards including PowerGraph, PowerView, PowerMeg, 4-on-the-floor, VGA 800/16 and other graphics display boards. STB Systems supports these products in the STB section of the Graphics Vendor Forum.  +


Steinberg/Jones
Steinberg/Jones	Service: MIDICVEN

Steinberg/Jones supports Subase and its editor/librarian, Synthworks PROTEUS, in its section of the MIDI C Vendor Forum. +


StereoGraphics
StereoGraphics	Service: INDEPTH

StereoGraphics, a developer of 3D simulation hardware and software, produces the CrystalEyes system. Obtain help for CrystalEyes, as well as other StereoGraphics products, in its section of the Graphics B Vendor Forum.  +


The Stirling Group
The Stirling Group  	Service: STIRLING

The Stirling Group supports the SHIELD series of software development tools for the Windows and OS/2 environments including DbxSHIELD, DemoSHIELD, InstallSHIELD, LogSHIELD, MemSHIELD and TbxSHIELD in the Stirling Group section of the Windows Third Party Applications C Forum.  +


Storage Dimensions
Storage Dimensions	Service: PCVENF

Access the Storage Dimensions section of the PC Vendor F Forum to obtain technical assistance from its support teams.  The Storage Dimensions product line consists of many hard disk, optional and tape products.  +


Strategic Mapping
Strategic Mapping	Service: ATLAS

Strategic supports its line of printer drivers in the Strategic Mapping section of the PC Vendor H Forum. +


Sun Country Software
Sun Country Software	Service: SUNSHOW

Access Sun Country's section in the Graphics B Vendor Forum to obtain support for its line of SUNSCAN, SUNSHOW and SUNSHELL graphics software and professional imaging tools for PCs.  +


Sundial Systems
Sundial Systems	Service: RELISH

Sundial supports Relish, its line of calendaring and time management products, in its section o fthe OS/2 Vendor Forum. +


SunDisk
SunDisk	Service: SUNDISK

SunDisk Corporation provides support for its mass storage products for portable computing in the SunDisk section of the PC Vendor G Forum. +


# SunSelect Forum
SunSelect Forum	Service: SUNSELECT

SunSelect, a Sun Microsystems, Inc. business unit, offers support for its networking and interoperability product line in the SunSelect Forum. Supported products include NetPrint Sun, NetWare SunLink, PCNFS, SelectMail and SunPC. In the forum, find patches, tech notes, product data sheets, tips and answers from SunSelect's customer support. +


SuperMac Technology
SuperMac Technology  	Service: MACBVEN

SuperMac Technology provides technical support for Pixel Paint and Pixel Paint Professional within its section of the Mac B Vendor Forum.  +


Support On Site (SOS) Online
Support On Site (SOS) Online	Service: ONSITE

Support On Site is a comprehensive database of technical support information on more than two dozen leading PC software applications from companies like Aldus, Borland, Lotus, Microsoft, Quarterdeck, Symantec and WordPerfect.  SOS includes tech notes, proprietary information from the vendors' support staffs, newsletters and supplementary software.  Part of ZiffNet.  $


Supra Corporation
Supra Corporation  	Service: ATARIVEN

Supra Corporation supports the SupraModem 2400 and many other Supra products in its section of the Atari Vendor Forum.  +


Survivor Software
Survivor Software  	Service: MACAVEN

Find product support for MacMoney, InvoicIt and Sticky Notes+ within the Survivor Software technical support section of the Mac A Vendor Forum.  +


Swan Technologies
Swan Technologies	Service: SWAN

Obtain support for Swan Technologies' line of computer hardware products such as the Direct Bus, EISA and V Line in its support wectionof the PC Vendor G Forum.  +


Sweetwater Sound
Sweetwater Sound	MIDIBVEN

Sweetwater Sound MIDI/music products are supported in its section of the MIDI B Vendor Forum.  Representatives from Sweetwater Sound are online to give you up-to-date technical support and information.  +


SWFTE International
SWFTE International	Service: SWFTE

SWFTE International produces the Typecase II font management utility and a series of consumer-oriented software products for the Windows environment including the New York Times Crossword, PixelPuzzle and Bicycle playing-card games.  The company provides support for its line of products in the SWFTE section of the Windows 3rd Pary Applications D Forum.  +


Symantec AntiVirus Forum
Symantec AntiVirus Forum	Service: SYMVIRUS

To ward against a virus infecting your system, join the Symantec AntiVirus Forum. Here you can learn about and discuss Symantec and Norton AntiVirus programs. In the libraries you can download upgrades and find out the latest developments in Symantec's NavScan and NOVI programs. For support with other aspects of Symantec's software programs, access the Norton/Symantec Forum Area (GO SYMANTEC). +


Symantec Applications Forum
Symantec Applications Forum	Service: SYMAPP

The Symantec Applications Forum is for users of many of Symantec's products including  GrandView, GreatWorks, JustWrite, MORE II, OnTarget, Q & A and TimeLine. Members can talk with other members or have their technical questions answered by Symantec's product support staff. In addition, these forum members love to discuss all types of computers -- Macintosh, IBM, portables, networks -- and the future of idea processing, desktop presentation, Macintosh development and electronic mail software. There's never a dull moment.  +


Symantec Development Tools Forum
Symantec Development Tools Forum	Service: SYMDEVTOOL

Access Symantec's Development Tools Forum, to find support for all of Symantec's development tools and languages. Supported products include: Multiscope Debuggers, TCL, Think C, Think Pascal and Zortech C++. For support with other aspects of Symantec's software programs, access the Norton/Symantec Forum Area (GO SYMANTEC).  +


Symantec Norton Utilities Forum
Symantec Norton Utilities Forum	Service: SYMUTIL

In the Symantec Norton Utilities Forum, obtain support for Symantec's Backup, Commander and Editor, and Norton Utilities. Pose questions to or discuss issues with Symantec's technical staff and other users in the message area. Download the latest demo programs for LAN Complete Pak, LAN Host Pak, and pcANYWHERE in the libraries. For support with other aspects of Symantec's software programs, access the Norton/Symantec Forum Area (GO SYMANTEC).  +


Syndesis
Syndesis  	Service: AMIGAVENDOR

Syndesis produces products that enhance modeling and animation programs. Among those products supported in the Amiga Vendor Forum are InterChange and InterFont.  +


SynOptics Communications, Inc.
SynOptics Communications, Inc.	Service: SYNOPTICS

SynOptics provides support for its intelligent LAN hubs and LAN management software in its section of the Novell Vendor Forum. SynOptics' products operate with a wide variety of networking solutions ranging from small workgroups to enterprise-wide networks. +


Tactic Software
Tactic Software  	Service: MACBVEN

Tactic Software offers technical support for its entire line of Macintosh products such as ArtClips, ArtFonts, Sound Clips, Icon-It, Magic Typist and MasterFinder in its section of the Mac B Vendor Forum. +


Tandy Corporation Newsletter
Tandy Corporation Newsletter  	Service: TRS

Tandy Newsletter is designed to keep Tandy computer users informed of current activities within the Tandy corporation. You have access to Tandy product and technical information and a monthly newsletter from Tandy. Or send your questions directly to Tandy for their response.  +


Tandy Professional Forum
Tandy Professional Forum  	Service: TRS80PRO

The Tandy Professional Forum offers Tandy computer users an avenue for exchanging information with other members regarding the full line of Tandy computers. The libraries are full of software such as applications and utilities.  +


Tandy Users Network
Tandy Users Network  	Service: TANDYNET

The Tandy Users Network comprises five Tandy product forums: the Color Computer Forum, the LDOS/TRSDOS6 Forum, the Model 100/Portables Forum, the OS-9 Forum, the Tandy Professional Forum and the Tandy Corporation Newsletter.  +


TAPCIS Forum
TAPCIS Forum  	Service: TAPCIS

The TAPCIS Forum discusses the effective use of TAPCIS, the completely automated program for accessing CompuServe Forums, Forum Libraries and CompuServe Mail with IBM compatible PCs. International users and expatriates will want to check out the international section featuring details for using TAPCIS via an international network. Whether you already use TAP, or are just looking for information about it, all are welcome in this forum.  +


Tech III
Tech III  	Service: PCVEND

Tech III supports its products in the PC Vendor D Forum. Access this section to obtain support for Wing-it!, Who You Know, Code Rider, Foxy Faxer, Scan-A-Lyzer! and The Compressor.  +


TEGL Systems Corp.
TEGL Systems Corp.	Service: TEGL

TEGL provides support for its full line of graphical interface programming toolkits for Turbo Pascal, Quick Pascal and "C" languages in the TEGL section of the Graphics Vendor Forum.  +


Teknosys, Inc.
Teknosys, Inc.	Service: MACDVEN

Obtain support for Teknosys' products like Help! in its section of the Mac D Vendor Forum.  +


Telebit
Telebit	Service: TELEBIT

Telebit provides support for Personal NetBlazer and WordBlazer in its section of the Modem Vendor Forum. +


Telecommunication Issues Forum
Telecommunication Issues Forum  	Service: TELECO

Stop by the Telecommunication Issues Forum to learn the latest developments and share your ideas on telecommunication services and products. Members of this forum discuss topics such as long distance services, protecting First Amendment rights for electronic communication and other telecommunication-related issues.  +


Temporal Activity
Temporal Activity	Service: MIDIBVEN

Access Temporal's section in the MIDI B Vendor Forum to obtain support for its line of MIDI/music products such as Music Printer, PianoWorks, Rythmaticity for DOS.  +


Terrapin, Inc.
Terrapin, Inc.  	Service: LOGOFORUM

Terrapin, Inc., developers of Logo PLUS and Terrapin Logo, provides support for its products in the Terrapin Section of the Logo Forum.  +


Texas Instruments Forum
Texas Instruments Forum  	Service: TIFORUM

The Texas Instruments Forum is for anyone interested in any model of Texas Instruments brand computers, especially the TI-99/4A and TI Professional. The TI Forum has an active message base and rapidly expanding data libraries. Weekly conferences are also scheduled. Members and Forum Administrators (SysOps) will be happy to assist new members. The TI Forum is a major source of TI information across the country, supplementing a local users group network and bulletin board systems.  +


Texas Instruments Newsletter
Texas Instruments Newsletter  	Service: TINEWS

Texas Instruments Newsletter is a menu-driven text area that is updated constantly to provide the latest news, help and information about the TI Forum and TI world in general. Check the "New in TINEWS" area regularly for information about the latest features.  +


Thomas-Conrad
Thomas-Conrad	Service: TCCFORUM

Thomas-Conrad, manufacturer of adapters, hub concentrators and other communications products for ARCnet, Ethernet, Token Ring and TCNS, spoonsors this forum to offer technical support for its products.  Representatives from Thomas-Conrad, as well as other experienced users, are online to answer your questions. Besides the message section, be sure to check out the libraries for files that may provide additional help and information.  A Product Feedback section is available for you to communication directly with reps from Thomas-Conrad about further developing its products or product line.  +


Thoughtprocessors
Thoughtprocessors	Service: MIDICVEN

Obtain support for Thoughtprocessors' NoteProcessor and Showtune, two MIDI-to-Notation utilities in Thoughprocessors' section of the MIDI C Vendor Forum. +


3Com Corporation
3Com Corporation	Service: THREECOM

Operated by 3Com's Customer Support organization, the Ask3Com Forum covers a wide variety of global data networking subjects.  Join 3Com support engineers and other members in discussions on internetworking hardware, protocols, standards, NetWare compatibility, network management and 3Com adapters.  Browse through new articles added monthly to the 1700-article Tehcnical Library by 3Com support engineers sharing solutions for common problems about every 3Com product.  +


3-D Visions
3-D Visions	Service: STANFORD

3-D Visions produces Stanford Graphics, a techical graphics program for the Windows environment.  3-D Visions provides techical support for Stanford Graphics in the 3-D Visions section of the Windows 3rd Party Applications A Forum.  +


Timeslips Corporation  .ident;quick=
Timeslips Corporation  	Service: PCVEND

Timeslips Corporation provides support for its Timeslips III, a time tracking and billing program, within the Timeslips section of the PC Vendors D Forum.  +


Timeworks
Timeworks  	Service: TIMEWORKS

Timeworks provides support for its series of full-featured desktop publishing programs including Publish It! in the Timeworks section of the Desktop Publishing Vendor Forum.  +


T/Maker Company
T/Maker Company  	Service: MACBVEN

T/Maker supports its products such as ClickArt and WriteNow in its section of the Mac B Vendor Forum.  +


TMS Peripherals
TMS Peripherals  	Service: MACCVEN

TMS Peripherals provides support for its products including InnerView and TMSFAX in the TMS section of the Mac C Vendor Forum.  +


Toshiba Forum
Toshiba Forum  	Service: TOSHIBA

If you're interested in portable personal computer laptops and notebooks, you'll enjoy the Toshiba Forum. You can get answers to your questions and accurate product information from other members in the forum and from Toshiba America's Technical Support Group. Access the libraries for downloadable files relating to Toshiba products.  +


Toshiba GmbH Forum
Toshiba GmbH Forum	Service: TOSHGER

The Toshiba GmbH Forum provides technical support for Toshiba's German-speaking customer base. Join the forum to communicate, in German, about Toshiba's products and to ask technical questions of Toshiba's technical staff at the German headquarters in Neuss. The libraries contain useful files and software products such as drivers, upgrades and utilities.  +


Traveling Software, Inc.
Traveling Software, Inc.  	Service: PALMTOP

Access the Traveling Software Section of the Palmtop Forum to find support for software developed by Traveling Software, which connects palmtop and notebook computers to desktop publishing systems.  +


TRIUS
TRIUS	Service: TRIUS

Find support for TRIUS' As-Easy-As product and other TRIUS products within its section of the PC Vendor F Forum.  Representatives are online to answer your questions on DRAFT Choice, ALITE and Odyssey, too.  +


Truevision
Truevision	Service: TRUEVISION

Support for TARGA, TrueVista, Horizon and Video VGA add-in videographics boards can be found in the Truevision section of the Multimedia Vendor Forum.  +


Tseng Labs
Tseng Labs	Service: TSENG

Tseng Labs is a manufacturer and distributor of video and graphics chips and boards. Access the Tseng Labs section of the Graphics B Vendor Forum to obtain technical support for Tseng Lab's line of Turbo drivers.  +


TurboPower Software
TurboPower Software  	Service: PCVENB

TurboPower Software offers technical support for Turbo Professional, B-Tree Filer, Turbo Analyst and Object Professional in its section of the PC Vendor B Forum.  +


Turtle Beach Systems
Turtle Beach Systems (MIDI)	Service: TURBEACH

Access the Turtle Beach section of the MIDI A Vendor Forum to find support for Turtle Beach Systems' IBM graphic MIDI sample editing and digital music software. Turtle Beach products include SampleVision (graphic sample editor), Oview (synth voice editor) and 56K/SoundStage (direct to disk recording/editing systems).  +


Turtle Beach Systems (Multimedia)
Turtle Beach Systems (Multimedia)	Service: MULTIVENDOR

Representatives from Turtle Beach are online in the Multimedia Vendors Forum to provide technical support for its full line of multimedia products.  +


Twelve Tone Systems
Twelve Tone Systems  	Service: MIDIAVENDOR

Twelve Tone Systems provides support for its popular DOS-based MIDI sequencing package, CAKEWALK, in the Twelve Tone section of the MIDI A Vendor Forum.  +


UK Computing Forum
UK Computing Forum  	Service: UKCOMP

The UK Computing Forum offers support for worldwide users of UK hardware and software products.  The forum contains several general computing sections managed by leading UK hardware and software vendors such as Ti'ko (PC hardware), Miracom (modems), Nextbase (Autoroute/Automap Software), Datasoft (Datatalk 4 Comms software), Psion Dacom (modems) and Ashmount Research (Wigwam and Teepee OLR software).  +


UK Shareware Forum
UK Shareware Forum  	Service: UKSHARE

The UK Shareware Forum is where shareware enthusiasts can exchange information, download upgrades, examine reviews and meet the authors of many of the most popular UK shareware programs for the IBM PC.  There are a number of sections within the UK Shareware Forum that are managed by leading UK shareware republishers including Shareware Publishing, Nildram Software, Unica Shareware and the Thompson Partnership.  +


UK Shopper Forum
UK Shopper Forum	Service: UKSHOPPER

The UK Computer Shopper magazine, separate from the US version, has its own forum online for its readers to discuss the magazine's contents and other UK computer-related issues.  Members share opinions about the products and applications covered in the magazine and often debate issues such as Macintosh vs. PC.  Magazine staff members are online and actively take part in many of the discussions, which often lead to new articles for the magazine.  +


Ultimedia Tools Series A Forum
Ultimedia Tools Series A Forum	Service: ULTIATOOLS

The Ultimedia Tools Series brings comprehensive multimedia solutions directly to its customers through thsi forum and through the Ultimedia Tools Series B Forum.  Multimedia application developers can select from over 30 products from IBM and numberous other Independent Software Vendors that use the Ultimedia Tools Series architecture.  The Ultimedia Tools Series offers a full range of authoring, content creation, caputre and editing facilities for video, audio, animation, graphics, image and music.  +


Ultimedia Tools Series B Forum
Ultimedia Tools Series B Forum	Service: ULTIBTOOLS

The Ultimedia Tools Series brings comprehensive multimedia solutions directly to its customers through thsi forum and through the Ultimedia Tools Series A Forum.  Multimedia application developers can select from over 30 products from IBM and numberous other Independent Software Vendors that use the Ultimedia Tools Series architecture.  The Ultimedia Tools Series offers a full range of authoring, content creation, caputre and editing facilities for video, audio, animation, graphics, image and music.  +


Universal Technical Systems
Universal Technical Systems   	Service: UTSSUPPORT

Universal Technical Systems markets powerful engineering and scientific problem solving software called TK Solver. Find support for TK Solver and related products in the UTS/TK Solver! section of the CADD/CAM/CAE Vendor Forum.  +


UNIX Forum
UNIX Forum  	Service: UNIXFORUM

UNIX users can discuss UNIX related issues and exchange UNIX related code in the UNIX Forum. Members can discuss the technical merits of the UNIX operating system and how its tools can be used to increase user productivity.  +


UnixWare Forum
UnixWare Forum	Service: UNIXWARE

If you have questions, comments or tips about UnixWare and other related products, join the UnixWare Forum. In the forum you can discuss topics ranging from X Windows to bug watchers. The libraries contain files about UnixWare development tools, network utilities, applications, device drivers and updates. +


US Robotics
US Robotics	Service: USROBOTICS

US Robotics provides support for its products such as BlastFax and Courier in its section ofthe Modem Vendor Forum.  +


Userland Software Forum
UserLand Software Forum	Service: USERLAND

Macintosh users familiar with or interested in scripting should join this forum sponsored by UserLand Software, the developer and publisher of Frontier scripting system.  With Frontier, you can write scripts to automate, customize and simplify your use of the Macintosh.  Meet other members experienced in using Frontier who can offer advice and can help you learn to use scripting to your advantage.  Software developers will also find this forum helpful in building Macintosh applications that can be scripted by Frontier.  +


VAX Forum
VAX Forum  	Service: VAXFORUM

The VAX Forum provides support for users of the VAX series of computer systems from Digital Equipment Corp. Sponsored by Professional Press, this forum enables its members through message boards and library files to better understand the VAX computer in terms of its usefulness, operating systems and programs available for use on the VAX.  +


Ventura Forum
Ventura Forum  	Service: VENTURA

Sponsored by Ventura Software Inc., this forum provides a place for users of Ventura software products to communicate and get the most out of their software. Software supported includes Ventura Publisher, FormBase and Ventura Database Publisher. Libraries contain public domain software, documentation, commonly asked questions and their answers and more. In addition to applications of the software, messages cover design tips and tricks, utilities and third party software, printers and other hardware used with the software, the different operating systems and network environments running the software, printer fonts, patches and fixes. You can converse with the publishers of Ventura Professional! magazine and find product reviews.  +


Vericomp
Vericomp  	Service: PCVENC

Vericomp provides technical support for SoftBytes, Memory Master and Password! in its section of the PC Vendor C Forum.  +


Vertisoft
Vertisoft	Service: VERTISOFT

Vertisoft supports DoubleDisk and Emulaser in its support section of the PC Vendor G Forum.  +


VideoLogic
VideoLogic  	Service: VIDEOLOGIC

VideoLogic provides online support through the Multimedia Vendors Forum for its multimedia products such as DVA-4000 full motion video adapters for ISA-bus, MCA-bus and Macintosh NuBus-based computers; MediaStation full motion JPEG compatible video compression/decompression processor for use with ISA-bus PCs; Mediator Intelligent VGA and Macintosh video-to-NTSC/PAL video encoders/processors and M.I.C., system II multimedia interactive control system software.  +


Virtural Reality Laboratories, Inc.
Virtural Reality Laboratories, Inc.	Service: VRLI

VRLI provides support for its "virtual reality" products in the VRLI section of the Graphics Vendor Forum.  +


Virtus Corporation
Virtus Corporation	Service: VIRTUS

Virtus WalkThrough is the first 3D drawing and spatial design tool which lets you create environments on your Macintosh and then walk through and explore those environments in real time.  Access the Virtus Corporation section of the Mac C Vendor Forum to obtain technical support.  +


VNU BPA Forum
VNU BPA Forum	Service: VNUBPA

Access the VNU BPA Forum to communicate with the editorial staff and other readers of the Dutch Personal Computer magazine, published by VNU Business Publications, Amsterdam. Discuss information published in the magazine and pose your PC-related questions to the magazine's experts. Commonly discussed topics are new uploads, utilities, games, graphics, hints and tips. Download demos of programs covered in the magazine or download Personal Computer magazine's shareware tip of the month from the Praktijk library. Visit the sharewarel ibrary for Dutch or Belgian produced shareware, word processors, DOS utilities, games and graphics. Also visit VNU NL Online for additional information and discussions. +


VNU NL Online
VNU NL Online	Service: VNUNL

VNU NL Online is the place for Dutch readers of Personal Computer magazine, published by VNU Business Publications, Amsterdam, to communicate directly with its editors. Members can download and upload shareware files and read the latests on computing industry news in Belgium and The Netherlands. For additional information and discussions, access the VNU BPA Forum.  +


The Voyager Company
The Voyager Company  	Service: VOYAGER

The Voyager Company offers support in the Voyager section of the Multimedia Vendors Forum for its products such as interfaces and drivers for interactive computer control of various videodisc players; VideoStack and CD AudioStack interactive multimedia toolkits for Apple Macintosh; various laserdisc and CD players; CD-Rom's and CD Companion series for Macintosh; Amandastories Hypercard stacks; and the Criterion Collection laserdisc versions of full length motion pictures.  +


Wall Data
Wall Data	Service: WALLDATA

Wall Data supports its Rumba, 3270 (PC to IBM host) connectivity software for the Windows environment in the Wall Data section of the Windows Third Party Applications C Forum.  +


Wang Support Forum
Wang Support Forum	Service: WANGFORUM

The Wang Support Forum, part of the WangWIDE technical support service, provides support for users of Wang computer products.  The sysops of this forum are employees of Wang Laboratories and have the technical knowledge and resources needed to answer your questions.  The message area hosts discussions about various Wang systems and includes a Wang User Groups section that provides a place for members to answer one another's questions and offer problem-solving tips.  In the Host Imaging Development section, which is moderated by representatives of HID Research and Development, OPEN/Image product users can communicate directly with its developers.  For more inforamtion about Wang support areas, see the Wang Support Area (GO WANG).  +


WATCOM
WATCOM	Service: WATCOM

Access WATCOM's section of the PC Vendor H Forum to obtain support for its line of SQL Fortran compilers. +


WexTech
WexTech	Service: WEXTECH

WexTech supports Quicture, Doc-To-Help and SHED its Secmented Hypergraphics Editor, in its section of the Windows 3rd Party Applications D Forum. +


What's New in the Atari Forums
What's New in the Atari Forums  	Service: ATA

This area gives useful information about all Atari forums including a What's New section and conference schedules.


Willies' Computer Software Co.
Willies' Computer Software Co.	Service: WILLIES

Obtain support within the Willies' Computer Software Co. section of the PC Vendor F Forum for any of Willies' multitasking and utility products such as COMM-DRV, MTASK, COMM-LOG and SCRN-INPUT.  +


Wilson WindowWare
Wilson WindowWare  	Service: WILSON

Wilson WindowWare provides support for Windows 3.0 applications including Command Post, Win Batch, Win Check and Win Edit. These products are supported in the Wilson WindowWare section of the Windows Third Party Applications A Forum.  +


Window Craft
Window Craft	Service: WINAPB

Window Craft produces Windowcraft, an application development package for the Windows environment.  Windowcraft is supported in the Windowcraft section of the Windows Third Party Applications B Forum.  +


Windows Sources Forum
Windows Sources Forum	Service: ZNT:WINSOURCES

The Windows Sources Forum, part of ZiffNet, gives you an opportunity to interact with the editors, columnists, writers, product reviewers and other readers of the magazine. Windows Sources is the place to go for information on Windows products you can buy direct from the manufacturer, plus insight into the issues affecting the Windows industry.  +


Windows 3rd Party Applications A Forum
Windows 3rd Party Applications A Forum 	Service: WINAPA

The Microsoft Windows 3rd Party Applications A Forum provides support for third party applications designed to work with Microsoft Windows. This forum includes the following companies:  Access Softek, Asymetrix Corporation, Future Soft Engineering, Geographix, hDC Computer Corporation, ICOM Simulations, Inc., Micrografx, Playroom Software, Polaris  Software, 3-D Visions, and Wilson WindowWare.  See each vendor's individual description within this section for a list of supported products. For additional vendors and support, visit the Windows 3rd Party Applications B Forum, the Windows 3rd Party Applications C Forum or the Windows 3rd Party Applications D Forum.  +


Windows 3rd Party Applications B Forum
Windows 3rd Party Applications B Forum 	Service: WINAPB

The Microsoft Windows 3rd Party Applications B Forum provides support for third party applications designed to work with Microsoft Windows. This forum includes the following companies: Chipsoft, Computer Presentations Inc., Connect Software, InfoAccess,   KASEWORKS, Kidasa Software, Knowledge Garden,    NBI, Softbridge, SoftCraft, Window Craft, and Zenographics. See each vendor's individual description within this section for a list of supported products. For additional vendors and support, visit the Windows 3rd Party Applications A Forum, the Windows 3rd Party Applications C Forum or the Windows 3rd Party Applications D Forum.  +


Windows 3rd Party Applications C Forum
Windows 3rd Party Applications C Forum 	Service: WINAPC

Access this forum for a list of additional vendors to those listed in Windows Vendor Applications A and Windows Vendor Applications B and Windows Applications D forums. As with the other three vendor forums, you can communicate online with vendors of Windows products for non-Microsoft applications. This forum includes the following companies: Abacus Software, Aristosoft,Bell Atlantic, Berkeley Systems, Campbell Services, GFA Software, Gilbert & Associates, Gold Disk, Gold Hill, Metz Software, Protoview, Saros Corporation, The Stirling Group and Wall Data. See each vendor's individual description within this section for a list of supported products. For additional vendors and support, visit the Windows 3rd Party Applications A Forum, the Windows 3rd Party Applications B Forum or the Windows 3rd Party Applications D Forum.  +


Windows 3rd Party Applications D Forum
Windows 3rd Party Applications D Forum	Service: WINAPD

Access this forum to talk with additional vendors to those listed in the Windows Applications A, B and C forums.  As with the other three vendor forums, you can communciate online with the  vendors of Windows products.  This forum includes the following companies:  ABC Systems and Development, Automated Design Systems, Baseline Publishing, DeltaPoint, Inmark, Okna Corporation, Peachtree,  Q+E Software, ShapeWare, SWFTE International and WexTech.  See each vendor's individual description for a list of supported products.  For addtional vendor support, visit the Windows 3rd Party Applications A Forum, the Windows 3rd Party Applications B Forum, or the Windows 3rd Party Applications C Forum.  +


Windows Vendor Forums
Windows Vendor Forums  	Service: WINVEN

Four Windows vendor forums are available where owners of non-Microsoft Windows applications can ask technical questions directly from Windows companies: Windows 3rd Party Applications A, Windows 3rd Party Applications B, Windows 3rd Party Applications C and Windows 3rd Party Applications D forums. Each forum represents a different selection of vendors, so be sure to access all four forums for a complete list of vendors participating online.  +


Wolfram Research Forum
Wolfram Research Forum  	Service: WOLFRAM

Wolfram Research's Mathematica is a software program that enables your computer to figure simple and complex math computations. By drawing from other members' expertise using Mathematica, learn to enhance your computer's mathematical capabilities such as by programming your plotter to create precise geometric forms. Access the libraries for text files containing additional information.  +


WordPerfect UsersForum
WordPerfect Users Forum  	Service: WPUSERS

Writers and editors can share their ideas, questions and solutions in the WordPerfect Users Forum, which provides support for WordPerfect products such as the WordPerfect word processor, DrawPerfect graphics package and DataPerfect database.  Whether you are puzzling with file transfers or looking for a good WP reference book, this forum is the place to find help. Other topics of discussion include printers, graphics, desktop publishing, merges, training methods, conversion files, networking, fonts, non-IBM hardware, 3rd party utilities and downloading from a database. It contains various macros and help files which will help you use your software more effectively.  This forum is sponsored by Support Group, Inc., a private company independent of WordPerfect Corporation.  +


WordStar Forum
WordStar Forum  	Service: WORDSTAR

The WordStar Forum provides users of WordStar products with support from WordStar International Technical Consulting Group. Members can exchange information, ideas and solutions with other WordStar users. Also available are sample programs, usage articles and press releases for WordStar products. Libraries contain printer drivers, templates and utilities.  +


Wordtech Systems
Wordtech Systems  	Service: WORDTECH

dBXL, Quicksilver, VP-Expert and VP-Graphics are supported by Wordtech Systems in the PC Vendor C Forum.  +


Working Software
 Working Software  	Service: MACBVEN

Quickletter, Findswell, Lookup and Spellswell are supported by Working Software in its section of the Mac B Vendor Forum.  +


World of Lotus
The World of Lotus  	Service: LOTUS

The World of Lotus contains useful and up-to-the-minute information about Lotus products and services, access to electronic distribution of software and the opportunity to 'talk' with fellow Lotus users. The World of Lotus contains an introduction, a list of recent changes and additions in its data libraries, Lotus company and product news, descriptions of third party products that complement Lotus products, books and periodicals about Lotus products, technical notes, answers to commonly asked questions and lists of supported computers, printers and other hardware. Software developed by Lotus is available along with instructions for downloading it to your computer.  +


WPCorp Files Forum
WPCorp Files Forum	Service: WPFILES

Download printer drivers, graphics drivers and intricate macros for programs such as WordPerfect, Draw, DataPerfect and PlanPerfect from the WPCorp Files Forum. The files in the libraries are fully supported by WPCorp. The message section contains discussions on the programs available through WPCorp. For further disucssion on WordPerfect products, access the WordPerfect Users Forum. +


WRQ/Reflection Forum
WRQ/Reflection Forum	Service: WRQFORUM

Walker, Richer and Quinn (WRQ) produce the Reflection series of equipment for DOS, Windows and Mac. In the WRQ/Reflection Forum, discuss WRQ's terminal emulation, networking, office automation and development applications products with other users and its technical staff. +


WUGNET
WUGNET	Service: WUGNET

The Window Users Group Network (WUGNET) provides technical information to users and developers of software for Windows.  Included as part of the services is a bimonthly WUGNET Journal.  Find support for WUGNET products in the WUGNET Forum.  +


XChange
XChange  	Service: XCHANGE

XChange offers services and support for developers of XTensions for QuarkXPress and other desktop related publishing products in the XChange section of the Desktop Publishing Vendor Forum.  +


XTree Company
XTree Company  	Service: XTREE

Access the XTree Company section of PC Vendor H to obtain support from XTree representatives. The entire XTree product line is supported in this section.  +


Zenith Forum
Zenith Forum  	Service: ZENITHUSER

The Zenith Forum is open to anyone interested in products from Zenith Data Systems and participating independent companies, including Fifth Generation, SoftKlone and Back & Forth. The forum SysOps can answer questions ranging from your Heath kit to the newest Zenith laptop. The libraries contain utilities from Zenith and the latest in shareware applications and games.  +


Zenographics
Zenographics  	Service: ZENO

Zenographics provides technical support for its series of printing and image handling applications including Import, Pixie and Super Print in the Zenographics section of the Windows Third Party Applications B Forum.  +


Zeos International
Zeos International  	Service: PCVENE

Zeos is now offering informational files and answers to technical and marketing questions through its section in the PC Vendor E Forum.  +


Ziff Buyers' Market
Ziff Buyers' Market	Service: BUYMARKET

Ziff Buyers' Market is an online service that enables its members to buy computer products directly from more than 130 companies.  With more than 10,000 products, Ziff Buyer's Market provides information in a searchable format, helping members comparison shop by product specifications and price.  This Ziff service contains information on computer systems, printers, peripherals, monitors, software and other products that are sold direct.  +


Ziff Windows Deutschland Forum
Ziff Windows Deutschland Forum	Service: GERWIN

Readers of the German magazine, Windows Aktiv can communicate directly with the magazine's editors and other readers of the magazine. Windows Aktiv provides Windows-related support, solutions, tips and tricks in the German language. The forum's libraries contain downloadable shareware programs and utilities, macros and demos. +


ZiffNet
ZiffNet  	Service: ZIFFNET

ZiffNet is the comprehensive online information service on computing and the first place to turn for productivity-boosting software and advice to help you get the most from your PC. Log on to ZiffNet and make more informed buying decisions, get instant access to shareware, utilities and technical tips and stay current on the news and events in the computer industry. With ZiffNet you get timely access to expert information and advice from independent sources that include PC Magazine, PC/Computing, PC Week, Computer Shopper and PC Sources and Windows Sources.  +


ZiffNet European Services
ZiffNet European Services	Service: ZEUS

The producers of PC Magazine and Ziff-Davis UK present ZiffNet European Services (ZEUS), a source of a wide range of services developed for readers of PC Magazine UK.  In ZEUS, you can directly connect withthe editors of PC Magazine UK and other ZEUS users, download utilities and information, keep up-to-date with computer industry news in the UK and access any of four magazine databases -- Business, Computer, Health and Magazine.  Subscriptions to PC Magazine UK are available online.  +


ZiffNet/Mac
ZiffNet/Mac  	Service: ZMAC

ZiffNet/Mac, also known as Zmac, is the information service and software resource dedicated to Macintosh users and their specific needs. With Zmac you get a full range of reference databases, an authoritative buyer's guide, instant access to technical tips and free downloadable utilities, hand-picked and tested in MacUser Labs. Plus you have access to the leading industry news and opinions from MacUser and MacWEEK.  +


Zoom Telephonics
Zoom Telephonics	Service: ZOOM

Zoom provides support for its line of modems in its section of the Modem Vendor Forum.  +


Related Topics - Computers and Software Support
Related Topics

Membership Support Services

CompuServe Software Information

Communications

CompuServe Mail Hub

Forums(SIGs)

Electronic Mall/Shopping

The Electronic Mall

 - See  Books/Periodicals

Computer Hardware/Supplies

Computer Software

Hobbies/Toys/Pets

Merchandise/Electronics

Office Supplies

SOFTEX Software Catalog

Investing and Finance

Error-Free File Transfer

Financial Forums

Micro Software Interfaces

News, Weather, Sports

Apple News Clips

Florida Today Forum

Weather Maps

Personal Interests/Hobbies

HamNet

Photography Forum

Sci-Fi/Fantasy Forum

Professional Interests

Computer Consultant's Forum

Computer Training Forum

Entrepreneur's Small Business Forum

Working From Home Forum

Reference Library

Book Review Digest

Books in Print

Business Database Plus

Computer Database Plus

Computer Directory

Consumer Reports

Health Database Plus

Information USA

IQuest

Magazine Database Plus

Peterson's College Database

Special Interest Groups (Forums)

Consumer Electronics

The Electronic Frontier Foundation Forum

IBM Special Needs Forum

Issues Forum

Space/Astronomy Forums

Travel

UK Forum


Electronic Mall/Shopping

This section contains the CompuServe products that enable you to shop in the comfort of your own home. Depending on the merchant, you can order from online catalogs or have print catalogs sent to your home and order via electronic order forms, by conventional mail or by telephone.

The Electronic mall is the fun way to introduce those who may not be familiar with online computing to an exciting new world.  Visit the Electronic Mall and experience how most shopping will be done in the future!

The Electronic Mall

Directory of Catalogs

SHOPPERS ADVANTAGE Club

SOFTEX Software Catalog

Related Topics


The Electronic Mall
The Electronic Mall	Service: MALL

The Electronic Mall enables you to order products from over a hundred national retailers without searching for a parking space or waiting in check-out lines. Using your terminal, you can order products, use your credit card to pay for them and have them shipped to your home or office. The Electronic Mall is open 24 hours a day, seven days a week, and there are no yearly membership fees or surcharges. The merchants are grouped in mall departments such as Auto/Boat/RV, Books/Periodicals and Office Supplies/Business Services. Each merchant brings his best products and services to CompuServe members, often at substantial savings. Many offer free catalogs so that you can also order from the merchant using conventional mail or telephone. This Week's Mall News (GO EMN) announces new merchants and special sales and promotions. You can contact the mall merchants directly through their online store or through CompuServe Mail for catalogs or more product information.

Since new merchants frequently appear in the mall, be sure to check the online directories. GO MALLDIRECT will display the merchant directory alphabetically. GO INX will give you a product index list by category merchandise found in the mall. Should you ever have questions or problems with a specific merchant or suggestions on how to improve the mall, you can leave a message through Electronic Mall Feedback (GO MALLMANAGER). A response will be sent to you via CompuServe Mail.  Join the Electronic Mall Elite (GO ELITE), the preferred mall shoppers club, and receive a connect-time usage credit, discounts from merchants and a monthly newsletter from the Mall Manager featuring mall special events.


Directory of Catalogs
Directory of Catalogs	Service: DTC

All catalogs from mall merchants are now available in one directory. Search using any of 12 categories to find the catalog you need. Then, by using a quick reference word, you can go directly to the store or place your order now with this convenient list.


SHOPPERS ADVANTAGE Club
SHOPPERS ADVANTAGE Club	Service: SAC

Now you can join the thousands of other educated consumers who access America's largest discount electronic shopping service. Shop a home for more than 250,000 name-brand products -- with savings of up to 50 percent. Now you can access SHOPPERS ADVANTAGE Club as a CompuServe member and browse through the electronic database for everything from air conditioners to computers to microwaves. SHOPPERS ADVANTAGE Club is your link to major manufacturers, wholesalers and suppliers. As a member you pay a yearly membership fee but much less on merchandise since costly retail price mark-ups, inventories and storefronts are eliminated. When you decide to buy, your low price includes delivery right to your door. There are no hidden costs. Your purchase comes in a factory-sealed carton with all manufacturer's warranties and guarantees in full effect. Visit SHOPPERS ADVANTAGE Club today, and you'll have a world of savings at your fingertips.


SOFTEX Software Catalog
SOFTEX Software Catalog	Service: SOFTEX

CompuServe's SOFTEX is an electronic software catalog that enables you to purchase and receive commercial software through your personal computer without the inconvenience of driving to a computer store or waiting for mail delivery. SOFTEX's growing selection includes popular commercially available software as well as hard-to-find software from smaller vendors. Selections include programming utilities, tutorials, spreadsheets, accounting packages and games for most personal computers. Your machine requires terminal software that supports an error-checking file transfer protocol, such as XMODEM or CompuServe's 'B' protocol. Purchases are billed to your CompuServe account.


Related Topics -- Electronic Mall/Shopping
Related Topics

Communications

CompuServe Classifieds

Computer and Software Support

Hardware Forums

Software Forums

Ziff Buyer's Market

Membership Support Services

Order from the CompuServe Store

Reference Library

Consumer Reports

New Car Showroom

Special Interest Groups (Forums)

Consumer Electronics


Games

This section contains many different types of games. Some games are for one player against the computer. For others, like the Entertainment Center, you interact with other players, either as allies or opponents. Because of this ability to interact and communicate with other players while you are playing the games, we think that you will find our new-technology games exciting and challenging as well as a lot of fun. Most games do not require special equipment. However, some are enhanced if you have CompuServe Information Manager or a recognized terminal emulator which supports cursor control.

Air Traffic Controller

Biorhythm Charting

BlackDragon

British Legends

CastleQuest

Chess Forum

Classic Adventure

The ELECTRONIC GAMER ARCHIVES

Enhanced Adventure

The Entertainment Center

Flight Simulation Forum

Game Publishers A Forum

Game Publisher B Forum

The Gamers' Forum

Hangman

Island of Kesmai

MegaWars I: The Galactic Conflict

MegaWars III:  The New Empire

The Modem Games Forum

The Modem-To-Modem Challenge Board

The Modem-To-Modem Gaming Lobby

The Multi-Players Games Forum

The Multiple Choice

Play-By-Mail Games Forum

Role-Playing Games Forum

Science Trivia Quiz

SHOWBIZQUIZ

SNIPER!

Stage II -- Two Stage Trivia

The Whiz Quiz

You Guessed It!

Related Topics


Air Traffic Controller
Air Traffic Controller	Service: ATCONTROL

If you have nerves of steel and like the challenge of thinking at several levels at once, Air Traffic Controller could be your game. As an ATC, you're responsible for all planes within your sector of airspace. The object is to keep them from running out of fuel or crashing. You must clear planes for arrival and landing while keeping track of those arriving from other sectors. Neighboring sectors may be controlled by other ATC players, challenging your communication skills as well as your nerves. Once you've built up your confidence, you can start again at an increased level of difficulty. In color.  +


Astrology Charting
Astrology Charting	Service: ASTROLOGY

Astrology Charting, developed for the practitioner and expert star-gazer, will reveal a collection of astrological facts for any event in time. Simply enter the date, place, time and time zone in effect for the event. You will receive comprehensive astrological output containing many features from house cusps to planetary angles.  +


Biorhythm Charting
 Biorhythm Charting	Service: BIORHYTHM

Biorhythm Charting helps you figure out what your emotional, mental and physical state is and will be. It plots personalized charts for any month or series of months within a given year, and it provides a written analysis of each month. Biorhythms features automatic GIF graphics generation for CIM users and other graphic protocol support.


BlackDragon
BlackDragon	Service: BLACKDRAGON

Enter a magical, multilevel Labyrinth filled with treasure, but beware of the deadly creatures, traps and pits which infest it. This fantasy role-playing game lets you accumulate treasures which, when converted to "experience points," add to the strength you'll need to make it through the maze alive and to conquer the evil Arch Demon. If you can make it through all levels of the maze, you are admitted to the Explorer's Hall of Fame for all to admire.


British Legends
British Legends	Service: LEGENDS

As an adventurer in the multi-player game British Legends, you will explore a land filled with mystery ... dense forests, an island, a cottage and much more ... in addition to the computer-generated and human characters you will encounter. Like all the multi-player games, your play is influenced and enhanced by the presence of other players, but unlike other multi-player games, well, take heed of these words of wisdom: "Life is never quite what it seems in 'British Legends.'" The goal of the game is to collect treasures, score points, and reach the enviable, honorable status of "Wizard." Once you reach this level of expertise, you are endowed with wondrous magical powers: the ability to become invisible, commit mischievous acts and more. In other words, British Legends is not an ordinary adventure game. It embodies a vast, fantastic world of its own.  +


CastleQuest
CastleQuest	Service: CQUEST

Picture yourself on a long-awaited vacation to Romania's legendary Carpathian Mountains. During your trip your car breaks down, and you can't find help. You walk a long time and make it to a castle perched on the summit of a rocky rise above the road. You pound on the thick wooden door. Nobody answers, but the door slowly swings open. As you enter the castle, you realize that you are very sleepy. You stumble up the stairs and collapse on a bed. When you awaken, your adventure begins. The goal of this game is to thoroughly explore the castle, kill the master, loot the castle of its treasures and accumulate points as the game progresses. To win, you must survive the many dangers you will encounter and reach the castle storeroom to store your treasures. Reaching the storeroom is not an easy task. In fact, it can be deadly. Good Luck!


Chess Forum
 Chess Forum	Service: CHESSFORUM

Make your move and join the Chess Forum where members play against each other in games of electronic postal chess. Earn your own CompuServe rating and/or a rating from the United States Chess Federation. Learn more about "the game of kings" and stay abreast of news about chess tournaments around the world.  +


Classic Adventure
Classic Adventure	Service: CLADVENT

This adventure game sparked all other versions, both micro and mainframe. The scene is a forest in which lies Colossal Cave. Most of your adventuring takes place within the cave. You begin your adventure, however, outside a small well house. This is the center of your activities, and it is where you will store your treasures. The entrance to the cave is south of the building, but you will want to investigate the interior of the house before you leave for the cave. The object of the game is to overcome the cave's deadly challenges as you explore it, collect its numerous treasures and deposit them in the well house. In Classic Adventure a perfect score is 350 points, if you can survive.


The ELECTRONIC GAMER ARCHIVES
The ELECTRONIC GAMER ARCHIVES(TM)	Service: TEG

The ELECTRONIC GAMER ARCHIVES is an online source of reviews and step-by-step "walk-throughs" for some of the popular computer games. While new game articles are continually added to Section 14 of the Gamers' Forum, TEG is still the place to start when looking for help with the classics.  +


Enhanced Adventure
Enhanced Adventure	Service: ENADVENT

The enhanced Adventure is much like Classic Adventure. The setting is the same, but not that there are more treasures to be found in Enhanced Adventure; more treasure inside and outside of the cave. A perfect ending garners you 751 points.


The Entertainment Center
The Entertainment Center	Service: ECENTER

Meet fellow game-players from around the world and engage in multi-player games with color graphics. The Entertainment Center offers a variety of PC computer games ranging from combat in outer space as in StarSprint to familiar board games such as backgammon, chess and checkers.  Dowload games in a few minutes and discover that no two games you play in the Entertainment Center are ever the same. (ECENTER games require EGA or better graphics and an IBM-compatible PC.) +


Flight Simulation Forum
Flight Simulation Forum	Service: FSFORUM

The sky is the limit when you join the Flight Simulation Forum. Members who indulge their flights of fancy through the computer share experiences, playing tips and software critiques in the forum. Also popular are the forum's "fly-ins" -- coordinated get-togethers where members using custom flight scenery fly their aircraft simulators to a designated airfield. You're cleared to land and join the forum in their discussions about civilian, space, combat and air traffic control simulations.  +


Game Publishers A Forum
Game Publishers A Forum	Service: GAMAPUB

In Game Publishers Forum, participating publishers support a large variety of games and game-related products for all types of computers. Selected publishers each have their own message section for direct correspondence with customers; a library containing product demonstrations, new releases, program updates and announcements; and a conference room for formal or informal interactive, real time discussions with members. Publishers include Accolade, Bethesda Softworks, Electronic Arts, Lucasarts, Merit Software, Origin, Sierra OnLine, SSI, SubLOGIC and Three-Sixty Pacific. For other publishers, see the Game Publishers B Forum. +


Game Publishers B Forum
Game Publishers B Forum	Service: GAMBPUB

Need help with a game? In the Game Publishers B Forum, participating publishers support a variety of games and game-related products for all types of computers. Selected publishers each have their own message section fo rdirect correspondence iwth customers; a library containing product demonstrations, news releases, program updates, and announcements; and a conference room for forman or informal interactive, real-time discussions with members. Publishers include Activision,Disney/Buena Vista Software, GameTek, Impressions, Infocom,Interplay, Konami, MacPlay, Maxis, MicroProse, Sir-Tech Software, Spectrum Holobyte and Westwood Studios. For other publishers, see the Game Publishers A Forum.  +


The Gamers Forum
The Gamers' Forum	Service: GAMERS

It's a computer-game-player's dream: an electronic forum dedicated to the communications, support and entertainment needs of the general computer game-playing community. Here you'll find tips, hints, reviews and instructions for the latest computer games on the market. You can also keep up on what is happening with Nintendo and other cartridge games, as well. You can ask questions or discuss games and game hints with other game players via this forum.  +


Hangman
Hangman	Service: HANGMAN

The computerized version of the famous game which both children and adults enjoy. You play against the computer which selects the word, and you make the guesses until the poor man is hung or until you guess the correct word. Playing this game helps you find out the size of your vocabulary. It might also teach you a new word or two. If you are very good, you may reach the Hall of Fame.


Island of Kesmai
Island of Kesmai	Service: ISLAND

Many years ago, a group of magicians wanted to escape persecution. They settled on the Island of Kesmai where they experimented in the black arts. They created many strange creatures through their sorcery, which took place in catacombs deep underground. As their anger and their pride grew over the years, they determined to have revenge on their persecutors by calling up an ancient Dragon of Droon. They produced the dragon, but they were not able to control it. The dragon destroyed the laboratories and killed most of the magicians. It found its way to the temple located in the lowest levels of the catacombs, and it remains there to this day. Many of the creatures created in the laboratories escaped and have been living and multiplying ever since. You'll travel over many "acres" of land and encounter many computer-run characters during your adventure. The game consists of two segments: the Basic Game, which includes the regions of Kesmai, Leng, Oakvael and Axe Glacier; and the Advanced Game, which includes the regions of Torii, Annwn, Rift Glacier and Shukumei. The game is constantly evolving, and more mysterious lands are made available regularly.  +


MegaWars I: The Galactic Conflict
MegaWars I: The Galactic Conflict	Service: MEGA1

Imagine yourself at the helm of a starship, trying to capture planets and build an empire before the enemy destroys you and your effort. At your command are weapons such as phasers and photon torpedoes and a bank of equipment on board to help you use them. The ship's radio lets you communicate with other members of your team or taunt the enemy into making a fatal mistake. In addition, as your skill increases, you will rise in rank from cadet to admiral and gain the use of specialized ships.  +


MegaWars III: The New Empire
MegaWars III: The New Empire	Service: MEGA3

Imagine yourself in a galaxy filled with strife and destruction. You find that you must have wealth and power in order to survive. But you may not be able to get it by yourself. You may want to join a team of people whose interests are similar to yours, people who want to expand their wealth and protect and manage what they have. So your team forms, but you are cautious because your team members may turn on you. MegaWars III is a multi-player game which consists of two separate phases. The interactive phase is where you fly your ship about the Galaxy exploring for new planets to colonize and fighting with enemies. The second phase is an economic model, where you manipulate the economies and populations of the bases you own. The game's starting point is its main menu. Here you may choose to build, repair or fly your ship, manage your planets and obtain game-related information. Throughout the game you may converse with other players who are playing at the same time. Although many players form teams when they play the game, players can play it alone. With these things in mind, you are ready to enter MegaWars III -- The New Empire. +


The Modem Games Forum
The Modem Games Forum 	Service: MODEMGAMES

Owners of modem-capable computer games meet in the Modem Games Forum. Members play in head-to-head tournaments organized by forum staffers and run in the Modem-To-Modem Gaming Lobby(TM). The forum also contains dozens of game programs that offers members a variety of games that can be played one-on-one via modem. +


The Modem-To-Modem Challenge Board
The Modem-To-Modem Challenge Board 	Service: MTMCHALLENGE

Owners of selected modem-capable games can locate worldwide opponents to play through the use of the MTM Challenge Board. Search the Challenge Board to find and challenge players to popular modem games such as Armor Alley, Battle Chess, ChessNet, Command HQ, Faces, Falcon 3.0, Flight Simulator, Knights Of The Sky, Lexicross, Medieval Warrior, Operation Combat, The Perfect General, Stunt Driver, Super Tetris, 3-D Helicopter, and 'Vette.  +


The Modem-To-Modem Gaming Lobby
The Modem-To-Modem Gaming Lobby 	Service: MTMLOBBY

The MTM Gaming Lobby lets you play PC computer games in head-to-head competition with players from around the world. Check into the Lobby to meet and play against your chosen opponent or visit the Lobby for a quick, pick-up match. The MTM Gaming Lobby staff can assist you in finding modem games and challenging opponents.  +


The Multi-Players Games Forum
The Multi-Players Games Forum	Service: MPGAMES

This specialized games forum supports the entertainment needs of members who play any of the unique and challenging, multiple-player games via the CompuServe online environment. Get hints, plan strategies, and socialize with fellow multi-player gamers and the forum's staff.  +


The Multiple Choice
The Multiple Choice	Service: TMC

The Multiple Choice offers a whole host of online games and tests to challenge, amuse, and even train you. Trivia games are available in versions for kids, teens and all ages. Relaxing and amusing games include jumbled word games, games where you fill in the missing part of a classic quote or an ad slogan, and games where you enter random verbs, nouns and adjectives to generate silly letters. There are two achievement challenges. One tests high school competency similarly to the New York State Board of Regents Tests for grades 9 - 12. The other is a simulation of the "Miller Analogies Test" used as an entrance test to many graduate schools. Use either to test your mettle or practice up for the real thing. Use personality profile tests to see how well you know yourself or how well you know others, IQ tests, intelligence tests, or the Super Brain Teaser.  +


Play-By-Mail Games Forum
Play-By-Mail Games Forum	Service: PBMGAMES

Join the Play-By-Mail Games Forum to talk about all types of commercial Play-By-Mail Games, including Beyond the Stellar Empire, Heroic Age, Out Time Days, SuperNova, Realms of Altair, Starweb, It's A Crime, Illuminati, Continental Rails and many others. Some companies even sponsor CompuServe-only versions of their games. Not only can you discuss games online, but you can play them by Electronic Mail or via the Message Board, as well. If you enjoy PBM Games - SciFi, Power, Fantasy, War, Crime, Sports - this is your forum!  +


Role-Playing Games Forum
Role-Playing Games Forum	Service: RPGAMES

The Role-Playing Games Forum invites you to discuss and play all types of board/paper/text role-playing games including AD&D, Rune Quest, Gamma World, Traveller, Champions and Justice, Inc. Role-playing games are conducted in the conference area every evening. For additional game support, access the Gamers' Forum. +


Science Trivia Quiz
Science Trivia Quiz	Service: SCITRIVIA

Is there a budding Einstein in the audience? Even if you missed the Nobel Prize this year, you can challenge the top scorers in the Science Trivia Hall of Fame. Test your knowledge of biology, chemistry and physics through the Science Trivia Quiz. Questions and comments can be discussed in the Science/Math Education Forum.


SHOWBIZQUIZ
SHOWBIZQUIZ	Service: SBQ

SHOWBIZQUIZ is a trivia game that tests your knowledge of the entertainment world in a variety of categories such as Frank Sinatra, the Twilight Zone or the Rolling Stones.


SNIPER!
SNIPER!	Service: SNIPER

Set in 1943 on the battlegrounds of World War II, SNIPER! is the multi-player war game that pits your squad of soldiers against others in a realistic simulation of wartime conditions. Using the color graphics front-end program called "Scope," the geography, architecture and military units spring to life. Your success in working your way up through the ranks to General depends not only on your skill and daring, but also on the strengths and weaknesses of your individual soldiers and the squad as a group, the uncertainty of intelligence about enemy forces and the effects of chance.  +


Stage II - Two Stage Trivia
Stage II - Two Stage Trivia	Service: STAGEII

Stage II is a trivia game whereby you answer three trivia questions and then look for a common theme in the answers. It can be played individually or as a group.  +


The Whiz Quiz
The Whiz Quiz	Service: WHIZ

Do you think you are a knowledgeable person? The Whiz Quiz, sponsored by Grolier's Academic American Encyclopedia, will test your knowledge in a variety of categories including geography, current events, movies, sports, music, science, literature, history and myths and legends. Up to four people can play. The top ten scores for a session will enter the Wizard Hall of Fame.


You Guessed It!
You Guessed It!  	Service: YGI

You Guessed It! is a real-time, multi-player game show simulation in which players form teams, answer general information and trivia questions and vie for prizes. There's interaction between players, as well as a cast of "online personalities." There is a lobby for meeting other players and a BIO feature, which lets you learn more about those playing. Will you meet new friends, have fun and discover the True Meaning of Life? You Guessed It!  +


Related Topics -- Games
Related Topics

Computer and Software Support

Graphics Forums

Hardware Forums

Sight and Sound Forum

Software Forums

Electronic Mall/Shopping

The Electronic Mall

 -- See	Computing

Hobbies/Toys/Pets

Investing and Finance

E*Trade Stock Market Game

Membership Support Services

Order From the CompuServe Store

News, Weather, Sports

Hollywood Hotline

Roger Ebert's Reviews & Features

Personal Interest and Hobbies

Comics/Animation Forum

Military and Veterans Forum

Music and Performing Arts Forum

Rocknet

Rocknet (Rock Music) Forum

Sci-Fi Fantasy Forum

Professional Interests

Aviation Forum

Reference Library

Magill's Databes Plus

Magill's Survey of Cinema

Special Interest Groups (Forums)

Consumer Electronics Forum

Science/Math Education Forum

Showbiz Forum

Soap Opera Summaries


Investing and Finance

This section provides you with an overview of the services which can assist you with your investments. Though tailored for the individual investor, CompuServe's financial services are also utilized by many Wall Street firms. You can get quotes on stock prices, find out information about companies and buy and sell securities. CompuServe invites you to use the H&R Block ticker symbol to practice and see the type of information each product provides. Type HRB at most company or issue prompts and get live information without a surcharge.

Australian/New Zealand Company Library

Basic Quotes

Brokerage Services

Business Dateline

Calculating Personal Finances

Citibank's Global Report

Commodity Markets

Commodity Pricing

Commodity Symbol Lookup

Company Analyzer

Company Information

Company Screening

Corporate Affiliations

Current Market SNAPSHOT

Current Quotes

D&B Dun's Electronic Business Directory

D&B Dun's Market Identifiers

Detailed Issue Examination

DISCLOSURE II

Dividends, Splits, Bond Interest

Earnings/Economic Projects

Error-Free File Transfer

E*TRADE, America's Electronic Brokerage

E*TRADE Stock Market Game

European Company Library

Financial Forums

FundWatch Online

Futures Focus

German Company Library

Highlights -- Previous Day

Historical Stock/Fund Pricing

I/B/E/S Earnings Estimates

Index Symbol Lookup

Instructions/Fees

International Company Information

Investext

Investment Analysis

Investor's Forum

IQINT -- Company Information

Issue/Symbol Lookup

List Bonds for Company

Market Quotes/Highlights

MetaStock Quote Club

Micro Software Interfaces

MMS International Financial Reports

Mortgage Calculator

MQDATA -- Prices, Dividends, Security Descriptions

MQINT -- Securities Prices

Multiple Issues -- 1 Day

National Association of Investors Corporation Forum

News-A-Tron Market Reports

Options Profile

Personal Finance/Insurance

Portfolio Valuation

Price/Volume Graph

Pricing History -- 1 Issue

Pricing Statistics

Quick Way

Rategram Federally Insured CDs

Return Analysis

S&P Online

Search for Company Name, Ticker Symbol or CUSIP

Securities Screening

Tenderlink

Thomas Companies & Products Online

TRW Business Profiles

UK Company Library

UK Historical Stock Quotes

UK Issue Lookup

Related Topics


Australian/New Zealand Company Library
Australian/New Zealand Company Library	Service: ANZCOLIB

The Australian/New Zealand Company Library contains selected directory and news information on more than 95,000 business, both public and private, in Australia and New Zealand.  Information is available from leading business directories and databases such as D&B-Australian Dun's Market Identifiers, D&B-New Zealand Dun's Market Identifiers, Asia-Pacific and Reuter Textline.  Directory information can be retrieved by entering company names, industry codes, city name, number of employees, or sales figures.  Database information can be searched by name key words, country, region or publication date.  $*


Basic Quotes
Basic Quotes	Service: BASICQUOTES

Members of CompuServe's Basic Services can retrieve delayed quotes for items such as stocks, options, indexes, exchange rates and mutual funds. Each stock quote provides the volume, high, low and most-recent trade, as well as an indication of any current news stories on a particular issue. Up to 20 quotes can be retrieved in a single session.


Brokerage Services
Brokerage Services	Service: BROKERAGE

This menu enables you to choose among the various brokerage services on CompuServe.


Business Dateline
Business Dateline	Service: BUSDATE

Business Dateline is a searchable database containing the full text of articles from more than 115 regional business publications in the U.S. and Canada. The articles provide a regional outlook with information on local economic conditions, retailing, real estate, people and management, financial institutions, transportation and electronics from 1985 to the present.  $*


Calculating Personal Finances
Calculating Personal Finances	Service: FINTOL

This section offers products that enable you to calculate your net worth and generate a loan amortization schedule.  +


Citibank's Global Report
Citibank's Global Report	Service: GLOREP

Citibank's Global Report, the primary information resource for many large corporations worldwide, integrates and organizes news and financial data from well-respected sources.  You will find real-time foreign exchange rates, spot commodity prices and market and industry news, including up to six months of historical news on many publicly held companies.  Global Report is updated around the clock from sources around the world.  $


Commodity Markets
Commodity Markets	Service: COMMODITIES

CompuServe offers access to historical information on futures contracts and cash prices along with exclusive newsletters offering news, features and analysis. CompuServe's commodities database contains open, high, low, settling and cash prices along with volume and open interest for every trading day over the past 12 years. Futures prices are generally available by 7:00 P.M. Eastern time (U.S.)  (midnight GMT) with the cash price, volume and open interest available 24 hours later. The data are provided by MJK Associates which uses multiple sources to ensure accuracy and guarantee timeliness. Data are available for all commodities on the U.S., Canadian and select global exchanges with significant trading volume. Data include financial and currency futures as well as metal, petroleum and agricultural commodity contracts. Composite prices from the Commodity Research Bureau are also available. +


Commodity Pricing
Commodity Pricing	Service: CPRICE

Pricing History -- One Contract presents historical performance by day, week or month for the requested commodity contract (or optionally the contract nearest delivery). The program displays open, high, low and settling prices along with volume and open interest. Also available are aggregated volume and open interest for all contracts for the requested commodity along with the cash market price for the commodity.  $


Commodity Symbol Lookup
Commodity Symbol Lookup	Service: CSYMBOL

Commodity Group Listing displays available commodity groups including foods, grains, metals, financial, petroleum, fibers, currencies and indexes. Access symbols, active contracts, exchange, where traded and commodity description are shown for each commodity.


Company Analyzer
Company Analyzer	Service: ANALYZER

Company Analyzer provides "one-stop shopping" for financial information. Simply enter a company name, ticker symbol, or CUSIP number, and the ANALYZER will search the various financial services to determine which ones contain data for the company you have entered. The service then builds a customized menu of the services offering information, which can include income statement, balance sheet, and ownership information from Disclosure, Value Line, Standard & Poor's and estimates of future earnings from the Institutional Brokers Estimate System. Also available from the menu are price and volume graphs, pricing statistics, a detailed issue examination and current news when available.  $E


Company Information
Company Information	Service: COMPANY

This menu provides access to the various sources of information on specific companies.


Company Screening
Company Screening	Service: COSCREEN

Company Screening makes it possible to screen the DISCLOSURE II database based on entered criteria and produce a list of companies that meet the criteria. The ticker symbols of the companies can be saved for use in other CompuServe programs. Selection criteria include a variety of growth rates and financial ratios along with industry codes, state, total assets, book value, market value, annual sales, net income, cash flow, latest price, etc. Updated weekly with market prices updated overnight.  $E


Corporate Affiliations
Corporate Affiliations	Service: AFFILIATIONS

Corporate Affiliations offers profiles and reference information on most of the large U.S. public companies and their affiliates. This database includes organizations traded on the New York and American Stock Exchanges, their affiliates, and any company traded over-the-counter having affiliates. Information on a business can include its name, address, phone number, business description, the names of its executives, and the business' place in its corporate family hierarchy.  $*


Current Market SNAPSHOT
Current Market SNAPSHOT	Service: SNAPSHOT

Current Market SNAPSHOT provides a picture of the current stock market by depicting key indicators in a concise one-page report of statistics. SNAPSHOT highlights current trading trends by presenting the highest, lowest and latest values for the Dow Jones 30, Standard and Poor's 500 and NASDAQ Composite. The strength of this trend is defined by summarizing New York Stock Exchange activity, including percent change and number of shares traded in the current session. The trend's breadth is described by reporting advancing and declining issues and separating up from down volume. SNAPSHOT also presents the value of the U.S. dollar in gold, yen, deutsche marks and pounds. $E


Current Quotes
Current Quotes	Service: QQUOTE

Quick Quote, CompuServe's current quotations service, allows you to retrieve the current market value of stocks, options and market indexes. Quotes are delayed over 15 minutes, which is as soon as the exchanges will allow you to receive them without the payment of a monthly fee. The information includes volume, high/ask, low/bid, last, change and time of last trade or quote. Major foreign currency exchange rates are updated twice each day, and current values for mutual funds and money market funds are available by 7 P.M. ET (midnight GMT). You can retrieve the quotes by specifying a ticker symbol, the company name or a previously stored file of ticker symbols. Optionally, retrieved data may be directed to an output file in formats readable by microcomputer spreadsheet packages.

QQuote will place an asterisk at the end of a quote line for any issue which has a current news story available. To read this late-breaking news, simply enter /CONEWS at the Issue: prompt. Updated continually.  $


D&B Dun's Electronic Business Directory
D&B Dun's Electronic Business Directory	Service: DUNSEBD

Dun and Bradstreet's Electronic Business Directory is a directory of information on more than 8.5 million professionals and business in the U.S., both public and private and of all sizes and types. In addition to names, addresses and telephone numbers, the directory lists the type of business, its SIC code, number of employees, the industry to which it belongs, the population of each entry's city and information about parent companies.


D&B Dun's Market Identifiers
D&B Dun's Market Identifiers	Service: DUNS

Dun and Bradstreet brings three searchable directories of business information online with its Market Identifiers databases. You can search:

D&B-Dun's Market Identifiers, a directory with information on over 2 million U.S.

public and private establishments having more than 5 employees or with more than

1 million in sales

D&B-Canadian Dun's Market Identifiers, a directory with information on over

350,000 Canadian companies

D&B-International Dun's Market Identifiers, a 90-country international directory

with information on over 200,000 public, private, and government controlled

companies located in Asia, Africa, Europe, the Middle East, South America, the

Pacific Rim and Australia.

Information on a company can include its name, address, telephone number, and company characteristics such as sales figures, number of employees, corporate family relationships, and names of the executives.  $*


Detailed Issue Examination
Detailed Issue Examination	Service: EXAMINE

Detailed Issue Examination gives a detailed description of a single issue including trading status, recent price, dividends, risk measures and capitalization. For stocks, it shows the shares outstanding, twelve-month earnings-per-share, beta factor, indicated annual dividend and the dividend yield. For bonds, the program includes the maturity date, bond rate, yield to maturity, interest payment history and amount outstanding. Options information includes shares per contract, open interest, expiration date and exercise price. The 52-week high and low price are included for all securities. Updated overnight.  $


DISCLOSURE II
DISCLOSURE II	Service: DISCLOSURE

The DISCLOSURE II database is compiled from the 10Ks and other reports that all publicly-owned companies file with the Securities and Exchange Commission. This information includes the 10K management discussions, detailed financial statements, business segment data, 5-year financial summaries, company name and address, a list of SEC filings, a business description, officers and directors, a list of subsidiaries and lists of insider owners, institutional owners and owners of 5% or more of the company's stock. Updated every Sunday with market prices updated every night. Ownership information is updated quarterly. $E


Dividends, Splits, Bond Interest
Dividends, Splits, Bond Interest 	Service: DIVIDENDS

Dividends, Splits, Bond Interest gives dividend, split and bond interest information for an issue over a given period. Hard-to-obtain mutual fund distributions are also available. You may specify either the number of dividends you wish to view or a specific date range. The report includes the ex-date, record date, payment date, distribution type and the rate or amount of each distribution. Updated overnight.  $


Earnings/Economic Projections
Earnings/Economic Projections	Service: EARNINGS

This menu choice enables you to access information about different companies' earnings, projected earnings and growth, and economic projections.


Error-Free File Transfer
Error-Free File Transfer	Service: FILTRN

FILTRN, CompuServe's file transfer program, facilitates accurate transfer of data files from your microcomputer to CompuServe, and from CompuServe to your microcomputer. B protocol, which is supported by CompuServe's VIDTEX software, and XMODEM protocol are available to ensure accurate transfer. Other popular transfer protocols can also be selected.  +


E*Trade, America's Electronic Brokerage
E*TRADE, America's Electronic Brokerage	Service: ETRADE

E*TRADE is a brokerage service which allows you to take complete control of your investments.  Provided by Trade*Plus and available at base-connect rates, E*TRADE offers its customers:

Commissions of 1 1/2 cents per share, $35 minimum

Black-Scholes option analysis using current prices

Around-the-clock availability

Free checking account tied to your money market fund

Investment management -- quotes, news alerts, portfolio reports, limit orders

E*TRADE will handle all types of accounts including individual, joint, investment club, margin, IRA KEOGH and 401K.  It also has the E*Trade Stock Market Game that uses actual stock market data and prices.  +


E*TRADE Stock Market Game
E*TRADE Stock Market Game	Service: ETGAME

See if you have what it takes to be a Wall Street tycoon.  The E*TRADE Stock Market Game provides its participants with $100,000 to invest in game accounts.  Choose to play either the stocks-only game, the stocks and options game or both.  You will have access to actual market data and prices, and the E*TRADE computers even track commission costs to make the game realistic.  At the end of every month, the player in each game with the largest percentage increase wins a cash prize.  +


European Company Library
European Company Library	Service: EUROLIB

The European Company Library contains directory and financial information on more than 2 million European companies. Information is available from leading business databases such as D&B-European Dun's Market Identifiers, Europe's Largest Companies, Hoppenstedt Austria, Hoppenstedt Benelux, Irish Company Profiles, Kompass Europe and Telefirm. Information can be retrieved by entering the company name, industry codes or specific geographic location. $*


Financial Forums
Financial Forums	Service: FINFORUM

This section contains financial forums. The Financial Forums enable you to ask specific questions about financial matters such as investments and the economy, or about technical matters such as running Lotus 1-2-3. You'll be asking professionals who know their subject matter well, and you will have a chance to trade ideas with others like yourself.


Fundwatch Online
FundWatch Online	Service: MONEYMAG

Fundwatch Online by Money Magazine is a comprehensive mutual fund database for screening and reporting on over 1,900 professionally managed investment alternatives.  FundWatch Online allows you to screen on numerous critera to find the best-performing funds with the lowest expense rates.  And the detailed reports show you how any of the funds have performed in the current month, current year, and over 1, 3, 5 and 10 year time spans, as well as the fees and expenses and a contact phone number should you decide to invest or have addtional questions.  $


Futures Focus
Futures Focus	Service: ACI

Futures Focus is a weekly newsletter for the futures trader published by News-a-tron. It features the TSF trading system, a market overview and tips on how to improve one's trading performance. Updated Fridays. $


German Company Library
German Company Library	Service: GERLIB

The German Company Library contains directory, financial and product information for more than 48,000 public and private German companies. Information is available from leading business databases such as Creditreform, D&B-German Dun's Market Identifiers, Hoppenstedt Directory of German Companies, and Kompass Germany. Information can be retrieved by entering the company name, industry codes or specific geographic location.  $*


Highlights - Previous Day
Highlights - Previous Day	Service: MARKET

Market Highlights analyzes the most recent trading day for the New York Stock Exchange, American Stock Exchange and Over-The-Counter markets and prepares 19 different reports. Included are the most active stocks, the largest gainers and losers, stocks for which the price has risen or dropped over the past three, four or five trading days, stocks with new 6-month highs or lows, stocks with a low above yesterday's high or a high below yesterday's low and stocks that have traded twice their average volume. Updated overnight.  $


Historical Stock/Fund Pricing
Historical Stock/Fund Pricing	Service: SECURITIES

This menu accesses the MicroQuote II historical database in a variety of ways.


I/B/E/S Earnings Estimates
I/B/E/S Earnings Estimates	Service: IBES

I/B/E/S is the Institutional Broker's Estimate System and represents a consensus of annual and long-term forecasts from more than 2,500 analysts at 130 brokerage and institutional research firms. These firms include the top 20 research firms in the country and 100% of the all-star analysts as ranked by Institutional Investor magazine. The database includes information about more than 4,500 companies and reports the most optimistic and pessimistic EPS estimates as well as median, mean and variation. Current share price, earnings per share and price/earnings ratio are included. Updated every Sunday with market values updated daily.  $E


Index Symbol Lookup
Index Symbol Lookup	Service: INDICATORS

This product gives the ticker and the CUSIP number for all indexes included in the MicroQuote II database along with the time period for which each index has data. Issues are categorized into manageable groups designated by Market/Industry Indexes, Bonds/Yields, Exchange Rates, Volumes, Advances and Declines and any issues that are new or do not fall into one of the previous categories.


Instructions/Fees
Instructions/Fees	Service: FINHELP

This area provides immediate answers to commonly asked questions, information about session charges and product surcharges, update times, and offers you an opportunity to give feedback on the financial service offerings.


International Company Information
International Company Information	Service: COINTL

Information on millions of international companies from Canada (GO COCAN), the US (GO COMPANY), Germany (GO COGERMAN), the UK (GO COUK), other European countries (GO COEURO) and countries in the Pacific (GO ANZCOLIB) is available in International Company Information. Each section contains its own databases to help you easily track information such as the countries' largest companies and their products for many public and private companies and leading businesses. Available company information includes location, number of employees, annual earnings and industry codes.


Investext
Investext	Service: INVTEXT

Investext contains the full text of company and industry research reports compiled during the most recent 2 years by analysts in more than 50 Wall Street, regional, and international brokerage houses and research firms. Company reports include historical information such as a company profile; revenues, earnings and other financial operating results; stock performances; and can additionally include the researching brokerage's recommendations and an analysis and forecast of the company's future performance. Industry reports, available for more than 50 industry groups, can contain information on trends and conditions in the industry; new technology and product development; competition and market share; and can additionally contain an analysis with descriptive text and statistics.  $*


Investment Analysis
Investment Analysis	Service: ANALYSIS

Investment Analysis menu selections offer various methods of using MicroQuote II investment data. DISCLOSURE Screening and Securities Screening give members the opportunity to search the entire DISCLOSURE universe of over 10,500 companies or the MicroQuote universe of over 160,000 securities respectively for prospective purchase candidates. Return Analysis and Portfolio Valuation can then be used to track purchased securities and gauge your success.


Investors' Forum
Investors' Forum	Service: INVFORUM

The Investors' Forum provides a meeting place where those interested in the world of investing meet to discuss market trends, download investment software and participate in "real-time" conferences with money managers, brokers and individual investors. Conferences are scheduled regularly, and many feature experts speaking on specific areas of investing. All types of investments, from stocks to real estate to insurance, are discussed, and both novice and expert investors are welcome.  +


IQINT - Company Information
IQINT - Company Information	Service: IQINT

IQINT, like MQINT, is designed for program-controlled downloading to your microcomputer. IQINT, however, retrieves descriptive items about the specified issue from MicroQuote II, company financial information from DISCLOSURE II and earnings information from I/B/E/S. Updated weekly.  $


Issue/Symbol Lookup
Issue/Symbol Lookup	Service: SYMBOLS

Through this menu you can determine what securities and indexes are covered and the access symbol for each. Updated overnight.


List Bonds for Company
List Bonds for Company	Service: BONDS

Bonds Listing displays all active bonds for the designated company. The report includes the ticker symbols, CUSIP numbers, issue description, yield and current selling price for each bond. Also included in the report is the quality rating expressed by both Standard & Poor's and Moody's. Updated overnight.  $


Market Quotes/Highlights
Market Quotes/Highlights	Service: QUOTES

This menu delivers CompuServe's current and historical quotes products via menus. Quick Quote contains current market quotes on stocks, options and market indexes along with end-of-day foreign currency exchange rates, net asset values for mutual funds and current yields on money market funds. The MicroQuote database contains historical information on more than 160,000 stocks, bonds, mutual funds and options as well as international exchange rates and hundreds of market indexes. Dividend, interest, distribution and split histories go back 20 years, and daily price and volume data are available for the past 12 years. MicroQuote II also contains investment data on earnings, risk and capitalization. Quick Quote current stock quotes are delayed over 15 minutes. Most commodities data are available by 7:00 P.M. Eastern Time (midnight GMT), and MicroQuote II price and volume information for all securities is updated and available by 7:00 A.M. (noon GMT) the next morning. CompuServe is very careful about the accuracy of its data. We perform automated reasonability tests and use independent sources to check any discrepancies. Many major investment banking firms regularly depend upon this data. Here are a few tips that you may find useful when using quotation data:

You will need to enter a ticker symbol. If you do not know it you can enter an

asterisk followed by the beginning of the company name or you can look them

up using the Issue/Symbol Lookup programs.

If you are at a prompt for company name or ticker symbol and you wish to exit

the program, the navigational commands such as TOP or MENU will not work.

Instead, you need to enter /T or /M so that the system knows you are not trying

to enter a company name or ticker symbol.

For some products you will need to enter the date or the number of days,

weeks or months for which you wish pricing information. Dates may be

entered in several formats including mm/dd/yy (i.e. 10/15/92 or 2/7/93).

To check the current price of a stock anywhere on the service type QUOTES and a stock ticker symbol at any ! prompt. Separate the symbols with commas to price more than one issue. The display includes the ticker symbol, the day's most recent quote and posting time, change from yesterday's close and the number of shares traded.  $


MetaStock Quote Club
MetaStock Quote Club	Service: METASTOCK

If you retrieve quotes using either of the popular EQUIS financial applications -- the DownLoader for MetaStock or the Pulse Portfolio Management System -- you can realize substantial savings over our regular quote rates by becoming a member of the MetaStock Quote Club. A monthly fee enables you to retrieve quotes without connect-time charges, and quotes for stocks, options, bonds, indexes, commodities, and mutual funds are just one cent per quote. $E


Micro Software Interfaces
Micro Software Interfaces	Service: INTERFACES

This choice contains menu options for software interfaces that can increase the abilities of your personal computer to interact with CompuServe.


MMS International Financial Reports
MMS International Financial Reports	Service: MMS

MMS International is a multinational corporation specializing in financial and economic research. MMS has expertise in monetary theory and forecasting of central banking policies and operations. They produce a series of economic reports released on a daily, weekly and biweekly basis. Reports offered include FEDWATCH, which focuses on interest rate trends and Federal Reserve Board activity, daily analysis of the debt, currency and equity markets, and special briefings on economic data, including expectations. Also included is the recommended MMS stock portfolio. A schedule of updates is included online with the product.  $*


Mortgage Calculator
Mortgage Calculator	Service: MORTPAY

With the Mortgage Calculator, you can quickly and easily generate a loan amortization schedule. Simply enter the amount of the loan, interest rate, number of years and number of payments per year. The calculator displays the amount of each payment an dthe total interest paid.


MQDATA
MQDATA - Prices, Dividends, Security Descriptions	Service: MQDATA

MQDATA creates files for transfer to your microcomputer and allows access to MicroQuote II data. Members may select one or more issues for a range of days, weeks or months and create files formatted for use in spreadsheets, databases or BASIC programs. Members can also download dividends, earnings, yields and other descriptive and performance data. Updated overnight.  $


MQINT - Securities Prices
MQINT - Securities Prices	Service: MQINT

MQINT is designed to meet the needs of microcomputer software that automates the downloading process. CompuServe guarantees an unchanging dialogue within the program, with all prompts ending in a colon. MQINT allows access to the MicroQuote II, Quick Quote and Commodity databases. Members may select to retrieve single-day quotes for one or several issues or a time-series of quotes for a single issue or contract. The program minimizes data transmission time and employs a check sum if requested to assure correct data. Updated continually.  $


Multiple Issues - 1 Day
Multiple Issues - 1 Day	Service: QSHEET

Multiple Issues - 1 Day gives volume, close/average, high/ask, low/bid and CUSIP numbers for several issues for a given day. You may enter a previously stored file of up to 500 ticker symbols for processing. Updated overnight.  $


National Association of Investors Corporation Forum
National Association of Investors Corporation Forum	Service: NAIC

The goal of the National Association of Investors Corporation Forum is to educate long-term investors in how to find quality companies and buy stocks at good prices. Well-managed companies are identified from reported financial data and in-depth analysis. Members can share information on portfolio management, software and favorite stocks.  +


News-A-Tron Market Reports
News-A-Tron Market Reports	Service: NAT

Market Reports give analysis and cash market prices on selected commodities, market indexes, financial instruments and foreign exchange information.  $


Options Profile
Options Profile	Service: OPRICE

Options Profile lists all options currently trading on a given common stock or market index. Coverage includes put and call options trading on major U.S. exchanges. It lists the name, 15-minute delayed price or pricing date, ticker symbol and exchange code for the underlying company. The exercise price and closing option price are displayed for each active option. Market prices updated continuously. $


Personal Finance/Insurance
Personal Finance/Insurance	Service: FINANCE

This menu includes many services and programs that are useful for making personal financial and insurance decisions.


Portfolio Valuation
Portfolio Valuation	Service: PORT

Portfolio Valuation finds the value of a previously created portfolio for dates you select and displays unrealized gains and losses. Market prices updated continuously.  $


Price/Volume Graph
Price/Volume Graph	Service: TREND

Price/Volume charting provides graphic presentations of both the traded price and the trading volume for the requested days, weeks or months. Relevant information such as the current earnings, price, dividend and risk information for common stocks is displayed with the graph. Your personal computer and communications software must be able to support graphics to use this product. The CompuServe Information Manager (CIM) software supports the graphics in the trend chart. Updated overnight.  $


Pricing History - 1 Issue
Pricing History -- 1 Issue  	Service: PRICES

Pricing History -- 1 Issue gives over 12 years of historical prices by day, week or month. It includes CUSIP, exchange code, volume, high/ask, low/bid and close/average for a given security. You may designate the beginning and ending date or a number of time periods. Updated overnight.  $


Pricing Statistics
Pricing Statistics  	Service: PRISTATS

Pricing Statistics provides a snapshot of price and volume performance for a requested issue over a given period. It indicates such items as whether an issue is trading closer to recent high or low prices. The statistics include the current high/ask, low/bid and close average as well as the highest high, the highest close, the lowest low, the lowest close, the highest volume, the lowest volume and the average and standard deviation for high, low, close and volume. Also included are the total volume, the beta factor and the beta centile rank. Updated overnight.  $


Quick Way
Quick Way  	Service: QWK

Quick Way offers all the functions of a traditional stockbroker conveniently through your computer including market and limit orders and trading on margin. The service is provided by Quick & Reilly, one of the largest discount brokerage firms. Quick & Reilly offers its customers:

Discount commissions

Online quotes for stocks, options, market indexes, commodities and mutual

funds

The ability to place buy and sell orders, review, change, cancel orders,

and receive confirmations when orders are executed

The ability to place buy or sell orders 24 hours per day

With Quick & Reilly you can open individual or joint accounts, as well as IRA, Keogh, pension, profit sharing, custodial, trust, estate, corporate, partnership, and investment club accounts. Portfolio evaluation services include value, income, unrealized gains and losses, and year-to-date realized gains and losses. For monthly exchange fees, you can get real-time quotes (otherwise quotes are delayed a minimum of 15 minutes).  $


Rategram Federally Insured CDs
Rategram Federally Insured CDs  	Service: RATEGRAM

Rategram provides a service for finding the highest yielding federally insured savings instruments available nationwide. Information is available on liquid money market accounts, certificates of deposits, money market mutual funds and tax free money market funds. A weekly yield summary is provided along with a rate almanac listing information such as the prime lending rate, discount rate, federal funds rate, Fannie Mae home loan mortgage rates and one year T-bill and T-note rates.  $


Return Analysis
Return Analysis  	Service: RETURN

Return Analysis calculates the annualized returns for your securities. Because you enter the holding period, this product is useful for analyzing the historical performances of specific issues such as mutual funds in bull and bear markets. Updated overnight.  $E


S&P Online
S&P Online  	Service: S&P

S&P Online from Standard & Poor's Corporation contains recent information on approximately 5,600 companies including business summaries, earnings outlooks, historical earnings and dividends and product line summaries. All information is dated to indicate when it was last reviewed. The S&P Master List presents buy recommendations for various investment objectives and S&P Investment Ideas present stocks which Standard & Poor's expects will outperform the market over the next 12 months. Updated every Tuesday night.  $


Search for Company Name, Ticker Symbol or CUSIP
Search for Company Name, Ticker Symbol or CUSIP 	Service: LOOKUP

LOOKUP will search by name, CUSIP number, ticker symbol, CNUM or SIC code and list all the issues for a company you select. The product displays the ticker symbol, CUSIP number, exchange code, SIC code, name and description for each issue. Use LOOKUP to find ticker symbols or CUSIP numbers for use in other investment services.


Securities Screening
Securities Screening  	Service: SCREEN

This product enables you to select a type of investment and then screen the MicroQuote II database to see what securities meet your criteria. When selecting common stocks, for example, you can search on price, earnings, dividends, risk, capitalization, recent highs and lows, exchange and industry. Securities Screening is useful for identifying issues to buy or sell short and for picking bonds with specific maturity dates and yield targets. Updated overnight.  $E


Tenderlink
Tenderlink	Service: TENDERLINK

The Tenderlink searchable database contains business opportunities such as new tenders, successful tenders, expressions of interest and project proposals. The up-to-date information is obtained from governments, banks, councils and large institutions from over 240 countries. The business opportunities, covering more than 15,000 products and service, can be search by product code, keyword, location (city and country) and date.  +


Thomas Companies and Products Online
Thomas Companies & Products Online  	Service: THOMAS

Thomas Companies & Products Online offers access to two databases.  Thomas Register Online contains company information on almost 150,000 U.S. and Canadian manufacturers and service providers. Information in each database record includes the company name, address, telephone number, and products or services provided. Thomas New Industrial Products contains the latest technical information on new industrial products introduced by U.S. (and some non-U.S.) manufacturers and sellers.  A wide variety of information about industrial products is covered including features, attributes and performance specifications.  $


TRW Business Profiles
TRW Business Profiles  	Service: TRWREPORT

TRW Business Profiles provide credit and business information on more than 13 million organizations. Use this database to find actual account information for over 70 million business account relationships as reported by participating corporations. Information in a report can include credit histories; financial information and ratios; key business facts such as size, ownership and products; UCC filings; tax liens; judgments and bankruptcies; and an executive summary.  $*


UK Company Library
UK Company Library  	Service: UKLIB

The UK Company Library contains directory, credit and financial information on more than 1.2 million UK companies. Information is available from leading business databases such as D&B-European Dun's Market Identifiers, Extel Cards, Financial Times Analysis Reports, ICC British Company Directory, ICC British Company Financial Datasheets, Jordans Registerd Companies, Kompass UK, and McCarthy Information Company Fact Sheets. You can retrieve information by entering the company name, industry codes or specific geographic location.  $*


UK Historical Stock Quotes
UK Historical Stock Quotes  	Service: UKPRICE

This service offers pricing information updated on a daily basis for over 5,000 United Kingdom equity issues and approximately 350 market indices. Most securities in the service have data dating back to 1-JUL-90.  $


UK Issue Lookup
UK Issue Lookup  	Service: SEDOL

This service enables you to quickly and easily locate SEDOL (Stock Exchange Daily Official List) numbers, which provide a means of identifying issues traded on the UK exchanges. After finding an issue's SEDOL number, historical quotes can be retrieved from the UK Historical Pricing Service.


Related Topics -- Investing and Finance
Related Topics

Computer and Software Support

Hardware Forums

Software Forums

Electronic Mall/Shopping

The Electronic Mall

  - See	Computer Hardware/Supplies

Computer Software

Office Supplies/Business Services

News, Weather, Sports

AP Online

The Business Wire

Executive News Service

NewsGrid

Newspaper Library

UK Newspaper Library

Professional Interests

Business Management

International Trade Forum

IQuest Business Management InfoCenter

PR and Marketing Forum

Reference Library

British Trade Marks

Business Database Plus

Business Demographics

CENDATA The Census Bureau Service

Commerce Business Daily

Entrepreneur's Buisines Franchise and Opportunities Database

Government Publications

Information USA

IQuest

Magazine Database Plus

Marketing/Management Research Center

Patent Research Center

TRADEMARKSCAN

UK Marketing Library


News, Weather, Sports

The products in this section contain a global news clipping service, business news, feature stories, sports scores and interviews, public and aviation weather, and even Hollywood gossip. This section also includes sports forums.

AIDS News Clips

AP Online

Apple News Clips

Associated Press Sports Wire

The Business Wire

EMI Non-graphic Map

Executive News Service

Florida Today Forum

Global Crises Forum

Hollywood Hotline

Motor Sports Forum

NCAA Collegiate Sports Network

NewsGrid

Newspaper Library

NWS Aviation Weather

Outdoors News Clips

Reuter News Pictures Forum

Roger Ebert's Reviews & Features

Soviet Crisis News Clips

Sports

Sports Forum

Sports Medicine

UK News Clips

UK Newspaper Library

UK Sports Clips

UK Weather

Weather

Weather Maps

Weather Reports

Related Topics


AIDS News Clips
AIDS News Clips	Service: AIDSNEWS

Review the latest full-text news reports about AIDS including international news and reports and the most recent AIDS research results.  +


AP Online
AP Online	Service: APO

AP Online gives the latest news from Associated Press. It includes national news, Washington news, world news, political happenings, entertainment, business news, Wall Street news, Dow Jones averages, features, sports, weather and science/health stories.


Apple News Clips
Apple News Clips	Service: APPLENEWS

Review the latest full-text articles and reports about Apple Corporation and Apple products from AP, UPI, Reuters and other news wires.  $


Associated Press Sports Wire
Associated Press Sports Wire	Service: APSPORTS

The Associated Press Sports Wire gives the latest scores, news and league leaders in football, baseball, basketball, soccer, hockey, tennis and golf as well as information on college sports, Olympic competitions and other sports.  $


The Business Wire
The Business Wire	Service: TBW

The Business Wire makes available press releases, news articles and other information from the world of business. It is updated continuously throughout the day and brings information on hundreds of different companies.  +


EMI Non-graphic Map
EMI Non-graphic Map	Service: AERORAD

An EMI Non-graphic Map shows radar precipitation with numerical indicators of precipitation intensity. Display the eastern two-thirds of the U.S., the western two-thirds, or the entire country (information for the Southwest is not included). You can also send the eastern or western maps directly to a FAX machine (for a fee). The weather data are updated every hour with information from the National Weather Service.


Executive News Service
Executive News Service	Service: ENS

Members can keep informed of news affecting their business and personal interests with the Executive News Service. ENS is the unique electronic clipping service that monitors Associated Press news wires, the Washington Post, United Press International and Reuters news wires for stories containing words or phrases you specify. The stories are clipped as they come across the wires and held in electronic folders for you to review at your convenience. $E


Florida Today Forum
Florida Today Forum	Service: FLATODAY

Talk with the editor's of Floriday Today, the "Space Coast's" newspaper, about topics ranging from space to sports. Find out the latest space shuttle launch updates, learn about the Florida Marlins (Florida's first major league baseball team), and discuss Florida politics, education and social issues.  +


Global Crises Forum
Global Crises Forum	Service: CRISIS

Join the Global Crises Forum to discuss the latest news on areas such as the Balkans, the Baltic Republics, the Old East Bloc and the Middle East. Also, you can discuss political or business issues about the former USSR with others who share your concerns. Every month the forum concentrates on different global HOT SPOTS, depending on world events. Additionally, downloadable files can help you learn more about our world.  +


Hollywood Hotline
Hollywood Hotline	Service: HOLLYWOOD

Hollywood Hotline is a news and information service of noteworthy events in motion pictures, television programs and music recordings.  It also includes a trivia quiz, entertainment features, and an entertainment encyclopedia that includes such things as past Academy and Tony award winners.  Hollywood Hotline also offers you reviews of the most recently released movies in the theater.  In addition there is an informative guide to the movies that lists the films by useful categories such as "Must See!  Get Right in Line" and "For an Entertaining Night at the Movies."  +


Motor Sports Forum
Motor Sports Forum	Service: RACING

Motor Sports Forum provides the member with driver biographies, track information, sanctioning organization addresses and contact information, schedules and other information of interest to motor sports fans. In addition, the forum includes real-time auto racing reports, filed directly from major events around the world.  +


NCAA Collegiate Sports Network
NCAA Collegiate Sports Network	Service: NCAA

Rah Rah! Sis-Boom Bah! Keep up-to-date on your favorite college football, basketball, baseball and softball Division I, II and III teams. Updated weekly, the NCAA Network, sponsored by the National Collegiate Athletic Association, provides you with accurate statistics for individual players and teams, current news releases and poll results for men's and women's collegiate sports.  +


NewsGrid
NewsGrid	Service: NEWSGRID

NewsGrid is a comprehensive news service compiled from several global news wire services. It covers business, U.S. and world news. You can access stories using Headline Menus, Market Updates or Keyword Search. Headline Menus change as new top stories become available throughout the day. Market Updates provide regularly scheduled financial reports on the economy and Wall Street. Keyword Search selects stories sent within the past seven days based on the keywords you enter.  +


Newspaper Library
Newspaper Library	Service: NEWSLIB

Newspaper Library offers full-text articles from more than 48 newspapers from across the United States (classified ads not included). These 48 range from the A of the Akron Beacon Journal to the W of the Wisconsin State Journal & Madison Capital Times and include such papers as the Boston Globe, Chicago Tribune, Charlotte Observer, Detroit Free Press, Lexington Herald-Leader, USA Today and the Washington Post. There is a two-day delay in making today's articles available.  $*


NWS Aviation Weather
NWS Aviation Weather	Service: AWX

CompuServe Aviation Weather is instant weather for pilots. It uses the N.O.A.A. Service "A" weather wire. This is the same data used in International Flight Service stations. It includes hourly reports, terminal forecasts, NOTAMS, PIREPS, SIGMETS, AIRMETS, area forecasts and radar summaries. Updated continuously.


Outdoors news Clips
Outdoors News Clips	Service: OUTNEWS

Review the latest full-text news reports on issues concerning the environment and outdoors activities including hunting and fishing. News items are extracted from major news sources such as AP and UPI.  $


Reuter News Pictures Forum
Reuter News Pictures Forum	Service: NEWSPIX

In the Reuter News Pictures Forum you can view live, real-time news an dsports photos, often within hours of the event's occurrence. The copyrighted photos, provided by the Reuters News Service and Bettman Archives, are categorized by subject: United States, World, Canada, Washington DC, Sports and Bettman Archives (historical photos) and are available in both GIF and JPEG formats. GIF can be displayed on your CIM system, while JPEG can be viewed offline with the assistance of decoder files in the forum's libraries. +


Roger Ebert's Reviews & Features
Roger Ebert's Reviews & Features	Service: EBERT

Before spending your hard earned money on movie tickets and popcorn, access Roger Ebert's Reviews and Features for reviews of even the most recent box-office hits and flops. The well-known critic also provides the movie-goer with celebrity interviews, a Movie Lover's Source List, a list of the top ten movies of all time and advice on attending film festivals. A Feedback section is available to communicate directly with Roger.


Soviet Crisis News Clips
Soviet Crisis News Clips	Service: SOVNEWS

What is happening with the Soviet economy? How do Soviet leaders feel about Middle East affairs? What is happening in the numerous Soviet republics? Learn about this and other subjects in the Soviet Crisis News Clips Forum. The forum offers full-text articles from Reuters and UPI news wires coveirng hte latest-breaking news from the past 24 hours.  +


Sports
Sports	Service: SPORTS

This menu includes options for sports news, sports forums, games and other sports information.


Sports Forum
Sports Forum	Service: FANS

The Sports Forum includes discussions on NFL football, major league baseball, NHL hockey and NBA basketball. Topics include trade rumors, performances and injuries of upcoming opponents and possible franchise moves. Members can get in the spirit of the games by playing Fantasy Football and Baseball within this forum.  +


Sports Medicine
Sports Medicine	Service: INFOUSA

Jog, bike, swim or ski to the Sports Medicine clinic. Information is available through Information USA on basic exercise physiology, exercise testing, training, nutrition and the general risks versus benefits of exercise. Articles discussing specific sports give information on each sport's benefits, advantages and disadvantages and how to get started. You can keep track of your fitness efforts by using the chart of energy costs for various activities.  +


UK News Clips
UK News Clips	Service: UKNEWS

UK News Clips offers full-text stories which pertain to the UK from the Reuters World news wire.  The articles cover a broad range of UK financial, political and economic news and often focus on UK relations and business dealings with the US, Pacific Rim and neighboring European community naitons.  Stories are held within this clipping file for 24 hours.


UK Newspaper Library
UK Newspaper Library	Service: UKPAPERS

The UK Newspaper Library contains articles from the leading United Kingdom newspapers including The Daily Telegraph and Sunday Telegraph, The European, The Financial Times, The Guardian, The Times and Sunday Times, The Independent, Today and The Observer. Articles are extracted from current issues of the newspapers, as well as from several years back. Retrieve full-text articles by searching for a name, word or phrase.  $*


UK Sports Clips
UK Sports Clips	Service: UKSPORTS

UK Sports contains full-text sports stories from the Reuters World news wire.  It is a comprehensive source for stories about sports such as cricket, football (known as "soccer" in the US), snooker (billiards), athletics (track and field) and rugby.  Competition coverage is world-wide.


UK Weather
UK Weather	Service: UKWEATHER

The HMI version of UK Weather contains short-term weather reports for more than 12 cities within England, Scotland, Wales and Northern Ireland, as well as high- and low-resolution weather maps.  Also available are reports and maps for sites in continental Europe, North America and the Pacific Rim.  The HMI version works with DOS CIM 1.3 or higher and with MAC CIM 1.5 or higher.  Accu-Weather, Inc. provides all other maps and all weather reports outside the United States.


Weather
Weather	Service: WEATHER

This choice contains various weather products.   For US locations, a wide variety of National Weather Service reports and Accu-Weather maps are provided.  For loacations outside th US, Accu-Weather maps and current condition and three-day forecast reports are available.  Weather information is also available as part of some aviation products (GO AVIATION).


Weather Maps
Weather Maps	Service: MAPS

Using CompuServe CIM or any GIF compatible program, you can display 16 color or black and white maps of the United States, United Kingdom, Continental Europe, Pacific Rim and Australia/New Zealand. Each section offers a satellite map, current conditions and forecast maps. Radar depiction and regional wake-up maps are also available for the United States. Most maps are provided by AccuWeather, Inc.


Weather Reports
Weather Reports	Service: WEA

For United States locations, the National Weather Service features short term state and local forecasts, extended state and national forecasts, severe weather alerts, precipitation probability, state summaries and daily climatological reports.


Related Topics -- News, Weather, Sports
Related Topics

Electronic Mall/Shopping

The Electronic Mall

 - See Sports/Fitness/Health

Investing and Finance

Citibank's Global Report

Investors' Forum

News-A-Tron Market Reports

Personal Interest & Hobbies

Aids Information

CCML AIDS Articles

Earth Forum

Health/Fitness

Outdoor Forum

RockNet

Sailing Forum

Scuba Forum

Professional Interests

Broadcast Professional Forum

Journalism Forum

Media Newsletters

Media Services

PR and Marketing Forum

Reference Library

Information USA

Magazine Database Plus

Magill's Survey of Cinema

US-State-County Reports

Special Interest Groups (Forums)

Issues Forum

Showbiz Forum

Soap Opera Summaries

Space/Astronomy Forum

Travel

Dept. of State Advisories

VISA Advisories


Personal Interests and Hobbies

This section contains information on diverse interests and hobbies such as food, wines, genealogy, sailing, stamp collecting, pets, fitness and health.

AIDS Information

Aquaria Fish Forums

Art/Music/Literature

The Attention Deficit Disorder Forum

Automobile Forum

Automotive Information

Bacchus Wine Forum

Cancer Forum

CCML AIDS Articles

Collectibles Forum

Comics/Animation Forum

Cooks Online

Crafts Forum

Diabetes Forum

Disabilities Forum

Food/Wine

Gardening Forum

Genealogy Forum

HamNet (Ham Radio) Forum

Handicapped Users' Database

Heath and Fitness Forum

Health/Fitness

HealthNet

Literary Forum

MENSA Forum

Military and Veterans Forum

Model Aviation Forum

Network Earth Forum

New Age Forum

Outdoor Forum

Personal Finance/Banking

Pets/Animal Forum

Photography Forum

RockNet

Rocknet (Rock Music) Forum

Sailing Forum

Sci Fi/Fantasy Forum

Scuba Forum

TrainNet Forum

Worldwide Car Network

Related Topics


AIDS Information
AIDS Information  	Service: AIDS

This choice gives you a menu of products that contain information pertaining to AIDS, the Acquired Immune Deficiency Syndrome.


Aquaria Fish Forums
Aquaria Fish Forums  	Service: FISHFORUMS

Aquarium professionals and hobbyists alike can find information and friends in FISHFORUMS. Join the Aquaria/Fish Forum (GO FISHNET) to talk 'fish'. Members of fish specialty groups can exchange information on products, fish diseases and news. Join a live conference and meet fellow fish fanciers across the country. Regular conferences are scheduled with some of the nation's best known aquarists. Questions to the Forum Administrator (SysOp) will be answered within 24 hours, but if you can't wait, a voice line is available.  +


Art/Music/Literature
Art/Music/Literature  	Service: ARTS

From Bach to rock, from Shakespeare to Spiderman, this menu lets you converse on a variety of topics.


The Attention Deficit Disorder Forum
The Attention Deficit Disorder Forum	Service: ADD

If you or your child, spouse, co-worker or friend experiences Attention Deficit Disorder (ADD), join the ADD Forum. This forum is dedicated to discussions on ADD such as diagnosis, scholls, learning, therapy and ADD in the workplace. You can find out where and when support group meetings are held, and question doctors about ADD and its effects. For questions that require immediate attenion, an SOS message section is available. +


Automobile Forum
Automobile Forum  	Service: CARS

Attention, car buffs! The Automobile Forum covers all facets of the automotive world from buying, selling and fixing cars to dreaming about what future cars will be like. You can find answers to your questions or demonstrate your own knowledge about car finance, insurance, safety and problems. Swap stories with other members about unforgettable experiences, classic cars or new developments in the car industry.  +


Automotive Information
Automotive Information  	Service: AUTO

This menu provides information on a variety of automotive products, including car showrooms, an auto racing forum and automotive equipment.


Bacchus Wine Forum

Bacchus Wine Forum  	Service: WINEFORUM

The Bacchus Wine Forum presents information on many wine-related and home beer brewing topics. Information about your favorite wines may also be shared with other wine lovers. Issues of the Informed Enophile, a wine newsletter, are included, and online wine-tasting parties are held regularly.  +


Cancer Forum
Cancer Forum  	Service: CANCER

The Cancer Forum is an online hotline providing information about cancer and support for people with cancer, their friends and relatives. Topics covered include standard and supplemental methods of cancer treatment, research and cancer in children. Support is provided by forum members and the Cancer Hotline in Kansas City. The forum does not provide medical opinions or diagnoses.  +


CCML AIDS Articles
CCML AIDS Articles  	Service: CCMLAIDS

People interested in AIDS research can use this searchable medical library to find full text AIDS-related articles. Sources include medical reference books, text books, and medical journals such as the New England Journal of Medicine, Science and Nature.  $*


Collectibles Forum
Collectibles Forum  	Service: COLLECT

Philatelists, numismatics and other collectors will enjoy the Collectibles Forum. Beginners and dealers will want to stop by regularly for pricing and trading information and to check out the Collectors' and Dealers' Network. Baseball cards and other collectibles are also included.  +


Comics/Animation Forum
Comics/Animation Forum  	Service: COMICS

The Comic Book Forum features news, reviews and conferences with some of the greats of comic books and animations.  +


Cooks Online
Cooks Online  	Service: COOKS

This is a place where people can share their enthusiasm for cooking and gourmet food. Members swap recipes, exchange cooking tips and share menu planning ideas. Fine restaurants are discussed, and members can consult with cooking experts online.  +


Crafts Forum
Crafts Forum  	Service: CRAFTS

If you enjoy stitching, knitting, wood-working or other crafts, join the Craft Forum and become enveloped in a world of fresh ideas and inspiration. Message sections are devoted to specific crafts like quilting, cross-stitching, sewing and painting. Members compare techniques, swap project ideas and describe projects they are working on now or have done in the past. The libraries are stuffed with downloadable patterns and articles about crafts.  +


Diabetes Forum
Diabetes Forum  	Service: DIABETES

The Diabetes Forum is for anyone interested in diabetes, hypoglycemia or related genetic autoimmune conditions. Meet other diabetics, family members of diabetics, friends and medical practitioners. Message sections and libraries cover medications, diet and exercise, technology, treatments and more.  +


Disabilities Forum
Disabilities Forum  	Service: DISABILITIES

The Disabilities Forum is a communication facility and support group for anyone interested in disabilities to exchange information. Disabled people share information, ideas and experiences related to their daily living. Parents and families of disabled people and professionals who work with disabled people also share their experiences and information. The Disabilities Forum is open to everyone.  +


Network Earth Forum
Earth Forum  	Service: EARTH

Get involved in your world. The Earth Forum is for people who want to help solve environmental problems. Members hold conferences online with environmental experts and professionals to enhance the members' knowledge and ability to help save the environment.  +


Food/Wine
Food/Wine  	Service: FOOD

This menu contains forums for people who enjoy good food and wine.


Gardeining Forum
Gardening Forum	Service: GARDENING

Before grabbing a spade and your straw hat, join the Gardening Forum.  Managed by the National Gardening Association, publishers of the National Gardening Magazine, this forum contains over a decade's worth of gardening knowledge and experience from green-thumbed experts.  Learn to create and properly care for blossoming floral gardens and productive vegetable, herb and fruit gardens.  Dig into the weed-free libraries and message sections for information about house plants, pest control, landscaping, gardent tools and seed swapping. +


Genealogy Forum
Genealogy Forum  	Service: ROOTS

Are you related to Pocahontas? Need information from Revolutionary war veterans' land applications? Want a list of Irish genealogy societies, addresses of vital records departments in all the Canadian provinces or a list of organizations that help adoptees locate their natural parents? Maybe you just want to read or photograph faded tombstones. You'll find what you're looking for in the Genealogy Forum, the forum for people interested in researching ancestry and using PCs for genealogy databases, word processing and genealogy data communications. +


HamNet (Ham Radio) Forum
HamNet (Ham Radio) Forum  	Service: HAMNET

This conferencing facility of HamNet Online enables you to converse with others who are interested in amateur radio and short-wave listening.  +


Handicapped Users' Database
Handicapped Users' Database  	Service: HUD

Handicapped Users' Database provides articles and topics of interest both for and about the handicapped. Included are a reference library, a list of organizations and information about computer products specifically geared for use by handicapped individuals. An online message board for the exchange of ideas is also available.  +


Health and Fitness Forum
Health and Fitness Forum  	Service: GOODHEALTH

The Health and Fitness Forum provides the member with general health-related information and support groups. Included are discussions of exercise, nutrition, fitness, mental health, emotional and family health, the elderly, food, substance abuse such as alcohol and drug dependency, environmental hazards, and alternative health care.  +


Health/Fitness
Health/Fitness  	Service: HEALTH

This menu contains options for information on health-related matters including sports medicine, sexuality, mental health and general health topics.


HealthNet
HealthNet  	Service: HNT

HealthNet is a comprehensive online medical reference source containing a reference library and section about sports medicine. Included in the Reference Library are sections about disorders and diseases, home health care, prescription drugs and eye care. The Sports Medicine section contains information on nutrition, exercise and the benefits of and injuries incurred from some specific sports. +


Humane Society of the United States Forum
Humane Society of United States Forum	Service: HSUS

Join in the national Humane Society's efforts to create a humane world and sound habititat.  In this forum, you can participate in discussions about topics such as wildlife protection, the humane education of children, experimentation on animals and pet care.  Also browse through libraries which contain information that you can use to support the ethics you share with the Society.  +


Literary Forum
Literary Forum  	Service: LITFORUM

The Literary Forum is a gathering place for professional writers, literature readers, journalists, humorists and those with an interest in any related field. Included are sections on poetry, controversial topics, fiction, science fiction, comics, humor and journalism.  +


Masonry Forum
Masonry Forum	Service: MASONRY

The Masonry Forum provides a medium for furthering communications among the members of the worldwide bodies of Freemasonry and its affiliated organizations.  Members of this forum discuss and learn about all aspects of Freemasonry (which may be publicly discussed) including the history, symbolism and day-to-day concerns of brothers and lodges.  Learn how to become a Mason and to live by Mason principles.  Non-Mason members are welcome to participate.  +


MENSA Forum
MENSA Forum  	Service: MENSA

Sponsored by American Mensa, Ltd., the MENSA Forum provides a place for Mensa members and non-members to exchange information and ideas on the development and application of human intelligence. Message and library sections include topics such as scholarships, gifted children and puzzles.  +


Military and Veterans Forum
Military and Veterans Forum  	Service: MILITARY

The Military and Veterans Forum encourages discussion of current topics and includes a section for vets to inquire about benefits and data library files on the MIA/POW issue, military hardware, Atomic Vets, veterans organizations and member writings. It contains Vietnam veterans information plus current military service information including careers and military news. This area also includes information on current military service.  +


Model Aviation Forum
Model Aviation Forum  	Service: MODELNET

The Model Aviation Forum is for the model hobbyist. Builders of model airplanes, rockets, cars and boats will find all these disciplines covered in the forum. In addition, forum members have access to newsletters and articles from Model Aviation Magazine and a complete contest calendar. A 'Swap Shop' enables hobbyists to trade parts.  +


Music and Performing Arts Forum
Music and Performing Arts Forum	Service: MUSICARTS

Join fellow music fans in conversations about music (including classical, jazz/blues, big band, rock, Broadway, new age, ethnic, country/folk and gospel), ballet/dance and drama.  An Upcoming Events section provides schedules and previews of notable music arts events, and an Education/Careers section hosts discussions among teachers, parents and aspiring professional musicians.  +


New Age Forum
New Age Forum  	Service: NEWAGE

Welcome to the dawning of a new age. Join the New Age Forum to participate in lively discussions about "new age" topics such as psychic arts and sciences; yoga and meditation; Eastern and occult religions and beliefs; natural foods/healing; and environmental issues.  +


Outdoors Forum
Outdoors Forum  	Service: OUTDOORS

The Great Outdoors provides outdoor lovers with an avenue to converse and share information with other outdoor lovers. Areas and topics of information include camping, climbing, backpacking, fishing, hunting, cycling, sailing and winter sports. The National Rifle Association manages a section on firearms. In addition, search and rescue, nature, wildlife, equipment reviews and park and campground information is included.  +


Pets/Animal Forum
Pets/Animal Forum  	Service: PETS

The Pets/Animal Forum covers all kinds of animals, including dogs, cats, snakes, birds, reptiles, horses, bats and other critters. Find help with animal behavior problems. Tell your favorite pet stories. There is an Ask-A-Vet section, pet loss support, pet graphics and other files for downloading, and a fire hydrant section for pet owners to relieve themselves.  +


Photography Forum
Photography Forum  	Service: PHOTOFORUM

Shutterbugs of all levels, professional and amateur, can meet in the Photography Forum. Members can discuss photography equipment, film types and camera techniques and view GIF graphic images. Professionals can communicate with others in the business and share money-making ideas.  +


RockNet
RockNet  	Service: ROCK

RockNet provides the music enthusiast with up-to-the-minute news and information on the world of rock. It contains

The RockNet Forum

Rock news

A list of top albums and tapes, and

Articles about rock music.  +


RockNet (Rock Music) Forum
RockNet (Rock Music) Forum  	Service: ROCKNET

The RockNet Forum has many members with the record industry, and you may learn news items before they appear in newspapers.  +


Sailing Forum
Sailing Forum  	Service: SAILING

The Sailing Forum is an electronic Yacht Club for people interested in discussing and learning about all aspects of sailing. It includes conferences with sailing celebrities and experts. Members enjoy relaxing on deck and soaking up the digital sunshine, diving into the depths of the database libraries and round-robin discussions in the conference area.  +


Sci Fi/Fantasy Forum
Sci-Fi/Fantasy Forum  	Service: SCIFI

The Sci-Fi Forum is a place where people who enjoy science fiction can get together and chat about their mutual likes and dislikes. There are also conferences with famous authors, producers and publishers.  +


Scuba Forum
Scuba Forum  	Service: DIVING

The Scuba Forum is run by experienced scuba divers and diving professionals and has information ranging from seeking scuba instruction to pursuing a career in diving. The forum is for experienced divers as well as people with just a casual interest who want to find out more about diving. Browse through the forum for dive sites; ask questions of fellow divers; attend scheduled conferences with diving physicians, professional divers, instructors, underwater photography specialists and others. Learn how to care for equipment and take better underwater photographs. Make new diving friends on the Scuba Forum.  +


TrainNet Forum
TrainNet Forum  	Service: TRAINNET

TrainNet is your railroad forum. If you are a model railroader or railfan, TrainNet offers something for anyone interested in anything that runs on flanged wheels from Amtrak to Z Scale. You can use TrainNet to find a hobby store near you, find railroad historical or technical societies, or locate model railroading and railfan magazines. All aboard!  +


Worldwide Car Network
Worldwide Car Network	Service: WCN

If you are interested in classic and later models of American, European or Japanese cars, motorcycles or trucks, you should check out the Worldwide Car Network forum.  Sponsored by Worldwide Car Network, the world's largest provider of information about the exotic- and collectible-car market, this forum hosts discussions on everything about cars from driving the latest Ferrari to finding parts for that old Ford.  From the forum's inception, it has emphasized worldwide coverage with many members from the UK and other areas of Europe.  +


Related Topics -- Personal Interests and Hobbies
Related Topics

Computer and Software Support

Computer Art Forum

Logo Forum

MIDI A Vendor Forum

MIDI B Vendor Forum

MIDI/Music Forum

Electronic Mall/Shopping

The Electronic Mall

 - See	Arts/Music/Video

Auto/Boat/RV

Books/Periodicals

Gifts/Flowers/Gourmet Foods

Hobbies/Toys/Pets

Sports/Fitness/Health

Games

Astrology Charting

Investing and Finance

Calculating Personal Finances

News, Weather, Sports

Aids News Clips

Executive News Service

Florida Today Forum

Hollywood Hotline

Motor Sports Forum

Newspaper Library

Outdoors News Clips

Roger Ebert's Reviews & Features

Sports Forum

Professional Interests

AMIA Medical Forum

Aviation Forum

Computer Training Forum

Entrepreneur's Small Business Forum

IQuest Medical InfoCenter

SafetyNet

Working From Home Forum

Reference Library

Academic American Encyclopedia

Biz*File

Book Review Digest

Books in Print

Business Database Plus

Computer Database Plus

Computer Directory

Consumer Reports

Demographics

Dissertation Abstracts

ERIC-Education Research

Health Database Plus

Information USA

IQuest

KNOWLEDGE INDEX

Magazine Database Plus

Magill's Survey of Cinema

Marquis Who's Who

New Car Showroom

NORD Services/Rare Disease Database

Paperchase

Peterson's College Database

Phone*File

Physician's Data Query

Special Interest Groups (Forums)

Consumer Electronics Forum

Education Forum

Educational Research Forum

Foreign Language Forum

Human Sexuality Database and Forums

IBM Special Needs Forum

Issues Forum

Political Debate Forum

Religion Forum

Science/Math Education Forum

Seniors Forum

Showbiz Forum

Soap Opera Summaries

Space/Astronomy Forums

Students' Forum

White House Forum

Travel

California Forum

Travel Forum

UK Forum

Zagat Restaurant Survey


Professional Interests

This section describes forums which enable professionals to exchange ideas and information with others in the same field. People interested in the law, medicine, and other professional fields will find a forum to suit their professional interests.

AMIA Medical Forum

Aviation Forum

Broadcast Professional Forum

Broadcast Professional Area

Business Management

Compendex--Engineering Index

Computer Consultant's Forum

Computer Training Forum

Court Reporters Forum

E-Span

EMI Aviation Services

Entrepreneur's Small Business Forum

Entreprenuer's Small Business Square

The European Community Telework Forum

International Trade Forum

IQuest Business Management InfoCenter

IQuest Education InfoCenter

IQuest Engineering InfoCenter

IQuest Medical InfoCenter

Journalism Forum

Legal Forum

Media Newsletters

Media Services

Office Automation Support Forum

PR and Marketing Forum

SafetyNet

Working From Home Forum

Related Topics


AMIA Medical Forum
AMIA Medical Forum  	Service: MEDSIG

AMIA is sponsored by the American Medical Informatics Association. Members represent all segments of the professional medical community and use this forum to exchange ideas and information on medically related topics.  +


Aviation Forum
Aviation Forum  	Service: AVSIG

The Aviation Special Interest Forum is a group of people interested in computers and airplanes. It covers general flying issues, safety, weather, air traffic control, balloons and soaring, want ads and personal computer programs. AVSIG is open to any and all who care to visit and share their ideas and experience in the field of aviation.  +


Broadcast Professional Forum
Broadcast Professional Forum  	Service: BPFORUM

Broadcast Professional Forum covers the major publications, manufacturers and trade associations, conventions, organizations and seminars that relate to the fields of broadcast and audio engineering, production and land mobile communications. Also included is the latest FCC news as it relates to the broadcast and communications professions. +


Broadcast Professionals Area
Broadcast Professionals Area	Service: BPF

The Broadcast Professionals Area contains several sections of interest to television and radio broadcast professionals in fields such as engineering, production, programming, promotion and land mobile service.  For the latest industry information, access Incue Online for article summaries, reviews, previews and product announcements.  Broadcast engineers can learn more about professional groups such as AESNET, the online area for the Audio  Engineering Society, and SBENET, the online area for the Society of Broadcast Engineers.  For more information, see Broadcast Professionals Forum, which is accessible from BPA. +


Business Management
Business Management  	Service: MANAGEMENT

This menu contains information for the needs of managers of both large and small businesses.


Compendex Engineering Index
Compendex-Engineering Index  	Service: COMPENDEX

The Compendex-Engineering Index is a searchable database containing abstracts of articles taken from significant engineering and technical literature. Information comes worldwide from journals, publications of engineering professional organizations, conference proceedings and selected government reports and books. Covering virtually all engineering disciplines, topics include properties and testing of materials, fluid flow, pollution, ocean technology, applied physics, food technology and measurement.  $*


Computer Consultant's Forum
Computer Consultant's Forum 	Service: CONSULT

The Computer Consultant's Forum is the place for computer consultants to exchange ideas and information on networks, product vendors, commercial software and equipment. Independent consultants can share business tips, technical information and solutions to client problems. The forum is sponsored by the Independent Computer Consultants Association (ICCA), which represents data processing professionals.  +


Computer Training Forum
Computer Training Forum  	Service: DPTRAIN

The Computer Training Forum is for computer trainers, teachers, information center staff, vendors and anyone else with an interest in the computer learning process. Data libraries contain information on training techniques, office automation, careers and computers in schools. International members contribute reports on computer trends overseas. Members can enroll in free online Professional Seminars taught by leading instructors across the country. +


Court Reporters Forum
Court Reporters Forum	Service: CRFORUM

Are you the one in the courtroom who captures and preserves every word of testimony on a mysterious shorthand machine? Or, would you like to know more about these highly skilled individuals who use state-of-the-art software programs to produce verbatim transcripts, as well as television and on-site captioning services for the hearing impaired? If you are a court reporter or are interested in court reporting as a profession, join the Court Reporters Forum to exchange information on topics such as ethics, scopists and notereaders, students, hardware, software and other issues related to this interesting career.  +


E-Span
E-Span	Service: ESPAN

To easily search large numbers of employment opportunities targeted for CompuServe members, access the E-Span employment database within CompuServe classifieds.  E-Span is updated twice weekly to provide current information on employment opportunities in a variety of careers.


EMI Aviation Services
EMI Aviation Services	Service: EMI

Pilots of any aircraft from giant cargo to single-engine can use EMI Aerocorp's flight planning programs to produce complete cockpit flight logs for trips between any two points in the contiguous 48 states and southern Canada.  An optional customized briefing and flight plan filing are provided at no surcharge.  Other no-surcharge pilot services offered include an abbreviated summary of local conditions, radar weather maps and a time and distance check that calculates the great circle distance between two points. $ +


Int'l Entrepreneurs' Network
Entrepreneur's Small Business Forum  	Service: USEN

The Entrepreneur's Small Business Forum is an information exchange for entrepreneurs and business resources sponsored by Entrepreneur Group, publishers of Entrepreneur Magazine. Topics discussed include business start-up procedures and the development of entrepreneurship. Members are encouraged to discuss business-related problems, ideas and techniques.  +


Entrepreneur's Small Business Square
Entrepreneur's Small Business Square	Service: ENTMAGAZINE

Entrepreneur's Small Business Square is a menu offering three products provided by Entrepreneur Magazine. From the menu, you can access Entrepreneur's Small Business Forum, its Business Franchise and Opportunities Database, or its Small Business Forum.


The European Community Telework Forum
The European Community Telework Forum	Service: ECTF

Concerns and questions about telecommunications and telematics in the European Community can be addressed in the European Community Telework Forum. Forum discussions focus on innovative advances in telecommunications and on the use of telematics for small businesses and tourism in Europe. A portion of the forum is dedicated to the Research into Advanced Communications for Europe (RACE) programme. Access the ECTF forum to learn more about ECTF and RACE and their effects in the European Community.


International Trade Forum
International Trade Forum	Service: TRADE

If you'd like to join others in the international trade arena, join the International Trade Forum. The forum enables you to post messages describing products or services you need or can make available to other traders. Also, join the forum to seek out new opportunities and make contacts all over the world. Information about starting out in international trade, tips on travel, business, shipping and customs are found in the forum. Also find out about international trade practices and relationships with governments in various areas ranging from the EEC to New Zealand. An SOS sections is also available for urgent questions or comments.


IQuest Business Management InfoCenter
IQuest Business Management InfoCenter 	Service: IQBUSINESS

Use the IQuest Business Management InfoCenter as an online reference tool to find information about business including management research, marketing studies and specific companies. InfoCenter databases provide access to business management information extracted from published sources such as journals, books and government publications.  $*


IQuest Education InfoCenter
IQuest Education InfoCenter  	Service: IQEDUCATION

Use the IQuest Education InfoCenter as an online reference tool to find information such as education theory and research, testing and vocational training. InfoCenter databases provide access to information extracted from published sources such as journals, books and government publications about education.

$*


IQuest Engineering InfoCenter
IQuest Engineering InfoCenter 	Service: IQENGINEER

Use the IQuest Engineering InfoCenter as an online reference tool to find information such as engineering research, mathematics materials, physics and aerospace. InfoCenter databases provide access to information extracted from published sources such as journals, books and government publications about engineering.  $*


IQuest Medical InfoCenter
IQuest Medical InfoCenter  	Service: IQMEDICINE

Use the IQuest Medical InfoCenter as an online reference tool to find information such as medical practice, research, pharmaceutical news and allied health studies. InfoCenter databases provide access to information extracted from published sources such as journals, books and government publications about health and medicine.  $*


Journalism Forum
Journalism Forum  	Service: JFORUM

Journalism Forum serves the professional journalist with a variety of services and specialized data libraries. Journalism Forum offers separate data libraries for radio, TV, print and photo/video journalists. In addition, there are data libraries dedicated to jobs listings, freelance opportunities, equipment exchanges, commentary and a listing of names and phone numbers of proven resources.  +


Legal Forum
Legal Forum  	Service: LAWSIG

If you are an attorney, police officer, corrections officer, paralegal or lay person interested in the law, the Legal Forum is for you. Topics such as copyrights, bankruptcy, software/hardware for the law office, Lexis vs. Westlaw, pros and cons of polygraph tests, fingerprinting children and other law-related subjects are debated.  +


Media Newsletter
Media Newsletters  	Service: MEDIANEWS

Media Newsletters offers the full text of articles from several of the leading newsletters covering the broadcasting and publishing industries. The articles provide facts, figures, analysis and current information on changing market and company conditions, company activities, new products and technologies, and government policies and trade agreements. The title, newsletter name, publisher and date of publication are provided with each text.  $*


Media News
Media Services  	Service: MEDIA

This section contains the services for people in media including broadcasting, marketing and engineering.


Office Automation Support Forum
Office Automation Support Forum	Service: OAFORUM

Whether your office is highly or only partly computerized, join the Office Automation Support Forum to discuss the trends, opportunities and benefits of office automation. Obtain support from many vendors specializing in accounting, tax systems or obtaining the "paperless office." Vendors such as Dayo Software and MicroBiz can be reached through this forum. +


PR and Marketing Forum
PR and Marketing Forum  	Service: PRSIG

The Public Relations and Marketing Forum provides a special interest group for professional communicators such as public relations, marketing and communications directors or those holding related jobs in the public and private sector. The data libraries cover a wide variety of topics as they relate to PR including government, education, public affairs, financial institutions, consumer affairs, computers, high tech, health/social services and PRSA. The teleconferences enable a member to hear from recognized communications experts. In addition, the forum may be used to establish meetings by members for specific reasons.  +


SafetyNet
Safetynet  	Service: SAFETYNET

Safetynet is the gathering place for law enforcement officials, firefighters and emergency medical professionals. Those concerned about safety-related issues in their community should join the Safetynet Forum for discussions on timely issues such as chemical and environmental hazards, consumer products, OSHA and law enforcement.  Members of safety forces trade on-the-job stories and provide one another with support and information about seminars and workshops.  +


Working From Home Forum
Working From Home Forum	Service: WORK

The Working From Home Forum unites those who work from their homes with others who are in similar circumstances.  It allows a member to exchange information, make contacts, share resources and solutions to problems, meet other members and keep up-to-date on the latest home/office management tips, resources, laws, tax benefits and marketing approaches.  +


Related Topics -- Professional Interests
Related Topics

Computer and Software Support

Autodesk Forums

CADD/CAM/CAE Vendor Forum

Canopus Forum

Desktop Publishing Forum

EETNEet Forum

Engineering Automation Productivity Forum

Hardware Forums

MIDI Forums

Software Forums

Electronic Mall/Shopping

The Electronic Mall

  --  See	Books/Periodicals

Computer Hardware/Supplies

Computer Software

Merchandise/Electronics

Office Supplies/Business Services

Investing and Finance

Business Dateline

Financial Forums

Market Quotes/Highlights

Tenderlink

TRW Business Profiles

News, Weather Sports

Newspaper Library

NEWS Aviation Weather

Weather Maps

Personal Interests and Hobbies

Cancer Forum

CCML AIDS Articles

Diabetes Forum

Earth Forum

Health/Fitness Forum

HealthNet

Masonry Forum

Military and Veterans

Model Aviation Forum

Music and Performing Arts Forum

Reference Library

Biz*File

Book Review Digest

British Trade Marks

Business Database Plus

CENDATA The Census Bureau Service

Commerce Business Daily

Computer Database Plus

Computer Directory

Data-Processing Newsletters

Dissertation Abstracts

Entrepreneur's Business Franchise and Opportunities Database

Health Database Plus

Information USA

IQuest

Legal Research Center

Magazine Database Plus

Marketing/Management Research Center

Marquis Who's Who

NORD Services

PaperChase

Patent Research Center

Peterson's College Database

Physician's Data Query

PsycINFO - Psychological Abstracts

TRADEMARKSCAN

UK Marketing Library

Special Interest Groups - Forums

Education Forum

Foreign Language Forum

Human Sexuality Databank and Forums

IBM Special Needs Forum

Science/Math Education Forum

Travel

Air Information/Reservations

EAASY SABRE

EAASY SABRE (CIM)

Hotels Information

OAG Electronic Edition Travel Service

WORLDSPAN Travelshopper

WORLDSPAN Travelshopper (CIM)


Reference Library

This section comprises an extensive reference library that enables you to gather vast amounts of current and historical information quickly and efficiently. The section includes large databases comprised of demographic information; articles from periodicals; directories of products, manufacturers, and households; trademark and legal information; government proceedings, information, and statistics; consumer information; and newsletters.

American Academic Encyclopedia

Biz*File

Book Review Digest

Books in Print

British Trade Marks

Business Database Plus

Business Demographics

CENDATA The Census Bureau Service

Commerce Business Daily

Computer Database Plus

Computer Directory

Consumer Reports

Consumer Reports Complete Drug Reference

Data-Processing Newsletters

Demographics

Dissertation Abstracts

Entrepreneur's Business Franchise and Opportunities Database

ERIC - Education Research

Government Information

Government Publications

Health Database Plus

Information USA

IQuest

Knowledge Index

Legal Research Center

Magazine Database Plus

Magill's Survey of Cinema

Marketing/Management Research Center

Marquis Who's Who

Neighborhood Report

New Car Showroom

NORD Services/Rare Disease Database

NTIS-Government Sponsored Research

PaperChase

Patent Research Center

Peterson's College Database

Phone*File

Physicians Data Query

PsycINFO--Psychological Abstracts

SUPERSITE

Trademark Research Center

UK Marketing Library

US-State-County Reports

Related Topics


Academic American Encyclopedia
Academic American Encyclopedia 	Service: ENCYCLOPEDIA

The online edition of Grolier's Academic American Encyclopedia is filled with the latest in science, technology, politics, business, law, the arts and social sciences as well as the whole range of historical data associated with a top-ranked encyclopedia. This is a general reference source of over 33,000 articles and ten million words that is updated and revised four times a year.


American Heritage Dictionary
American Heritage Dictionary	Service: DICTIONARY

The American Heritage Dictionary database contains over 200,000 word definitions,  place descriptions and people biographies. Often the definition will contain synonyms, antonyms and usage notes. Search the database by entering the word, and if the spelling is unknown, enter the first five characters.


Biz*File
Biz*File	Service: BIZFILE

Need the number of a florist in Miami or a list of seafood stores in Halifax, Nova Scotia?  Put away those cumbersome yellow books and use Biz*File for access to over 10 million US and Canadian business establishments.  Each business is listed by business name, address, telephone number and length of time it has been listed in the yellow pages.  You can search the database by company name and geographical location, by telephone number or by type of business.  Available 24 hours a day.  $


Book Review Digest
Book Review Digest  	Service: BOOKREVIEW

Book Review Digest provides references to over 26,000 fiction and nonfiction English language books. Reviews are drawn from over 80 American, Canadian and British periodicals covering general and social sciences, humanities and general reference. The digest maintains a full citation and abstract for each book included and is updated twice weekly.  $*


Books in Print
Books in Print 	Service: BOOKS

Books in Print enables you to find books distributed in the U.S. for single- or multiple-copy purchase, books currently in print, books to be published in the next six months, and books which went out of print or out of stock in the last two years. You can search by subject, author and title and find information such as: author, title, publisher, date of publication, edition, binding (such as paperback), list price and subject.  $*


British Trade Marks
British Trade Marks	Service: UKTRADEMARK

The British Trade Marks database contains information on trademarks in the United Kingdom. Updated weekly, the British Trademarks database contains all registered trademarks and pending applications, as well as lapsed trademarks and applications since 1976. The records include the trademark name, design description (graphical display not available), owner name and address, type of product or service, international class numbers and the date and status of the application.  $*


Business Database Plus
Business Database Plus  	Service: BUSDB

Keep current in your field without trips to the library or subscribing to scores of periodicals. Business Database Plus is a service that lets you search for and retrieve full-text articles from more than 500 regional, national and international business and trade publications. BDP gives you seven methods to locate articles that can provide you with sales and marketing ideas, product news, industry trends and analysis. For additional articles, access Magazine Database Plus, Computer Database Plus and Health Database Plus.  $


Business Demographics
Business Demographics  	Service: BUSDEM

Business Demographics Reports are designed to help businesses analyze their markets. Two types of reports are available by various geographical units (including Zip Code, county, Arbitron TV Markets) and Nielsen TV Markets. The Business to Business Report details all major business categories (as represented by SIC codes) by number of employees and state percentage. The Advertisers Service Reports provide employee counts and number of establishments by employee size for retail trade businesses.  $


CENDATA The Census Bureau Service
CENDATA The Census Bureau Service 	Service: CENDATA

Now at your fingertips, the Census Bureau offers its data on manufacturing, housing starts, population, agriculture and more to CompuServe members. CENDATA lists tabular data and reports from the censuses conducted by the Census Bureau including the 1990 Census of Population. Some of the data have been condensed into reports that are available on CENDATA and answer specific questions such as "How many bookstores are in Franklin County, Ohio?" and "What are the occupations with major employment gains for women?" CENDATA also has the latest press releases from the Census Bureau. It even lists the Census Bureau representative in your state. +


Commerce Business Daily
Commerce Business Daily  	Service: COMBUS

The Commerce Business Daily is a database that includes the full text of U.S. Commerce Department publications listing all significant

Federal contracts

Requests for proposals

Other data related to government contracts.

It is comprised of listings from the Commerce Business Daily, published by the U.S. Commerce Department, and from "DMS Bluetops," published by the Office of the Assistant Secretary of Defense. The database is updated daily and includes only listings from the most recent 90 days. Listings available include a summary of each contract/procurement, the name of the contracting agency, the "Section Heading" or category of the needed product/service, and the date the text was issued.  $*


Computer Database Plus
Computer Database Plus  	Service: COMPDB

The computer industry changes daily and no one can keep up with all the new changes, right? Wrong. Computer Database Plus is a comprehensive collection of computer-related article summaries and/or full text from leading computer industry publications covering hardware, software, electronics, engineering, communications and technology applications. Computer Database Plus includes nearly 200 magazine, newspaper and journal titles including PC Magazine, Byte, Digital Review, MacUser, PC Week, PC World and Communications of the ACM. Coverage for most titles starts with 1987. Search the over 370,000 articles by subject, company name, product name, featured people, publication name and publication date. Updated weekly.  $


Computer Directory
Computer Directory  	Service: COMPDIR

Computer Directory provides information on over 69,000 computer-related products and more than 8,500 manufacturers. Hardware, software, peripherals and data communications and telecommunications equipment products are covered. Product information includes the manufacturer's name, key specifications, compatibility information and pricing data. Company listings include address, telephone numbers (including toll-free and fax numbers when available), annual sales figures, top executives, number of years in the business and types of products manufactured. $


Consumer Reports
Consumer Reports  	Service: CONSUMER

Before you buy a new car, camera, VCR or other big-ticket item, check it out in Consumer Reports. Automobiles, appliances, electronics/cameras and products for the home are all covered. Easy-to-use reports provide the features to look for, brand ratings and recommendations from Consumers Union. The Automobiles feature allows you to select cars by size, reliability and other important characteristics. Most reports appeared in Consumer Reports magazine within the last two years. Reports are added monthly.


Consumer Reports Complete Drug Reference
Consumer Reports Complete Drug Reference	Service: DRUGS

Find information information about prescription and over-the-counter medicines written in everyday language in the Consumer Reports Complete Drug Reference as compiled by the U.S. Pharmacopeia. The database contans over 700 entries, each covering a generic drug or a drug family. Each entry contains a description of the drug, what you need to know before use, the proper use, precautions and side effects of the medicine. Searches are done by entering the common, generic or brand name of the drug. The database is updated quarterly.


Data-Processing Newsletters
Data-Processing Newsletters  	Service: DPNEWS

Data-Processing Newsletters is a searchable database providing the full text of articles taken from several of the leading newsletters covering the computer, electronics and telecommunications industries. It gives facts, figures, analysis, and current information on changing market and company conditions, company activities, new products and technologies, government policies and trade agreements.  $*


Demographics
Demographics  	Service: DEMOGRAPHICS

This section enables you to obtain demographic information for any area of the United States. Information includes the population as well as the income, age and race of the residents. The data is based on the 1990 Census and current year and five-year forecasts.


Dissertation Abstracts
Dissertation Abstracts  	Service: DISSERTATION

Dissertation Abstracts provides information on dissertations for academic doctoral degrees at accredited U.S. institutions since 1861, selected masters theses, and dissertations accepted at Canadian and many other non-U.S. institutions. Information on each database entry includes the author, title, date of publication, and the college and degree for which the dissertation was submitted. Abstracts are available online for dissertations added to the database after July 1980.  $*


Entrepreneur's Bus. Franchise & Opp. Database
Entrepreneur's Bus. Franchise & Opp. Database	Service: EBF

Find information about franchising and business opportunities in Entrepreneur magazine's Business Franchise and Opportunities Database. Based on the magazine's annual "Guide to Franchise and Business Opportunities," the database provides a description of franchising and business opportunities throughout the Untied States. With each description is the company name, address, phone numbers and contact names. The opportunities are searchable by line of business or by the individual company name. Visit Entrepreneur magazine's Small Business Forum to ask questions of or talk with representatives of Entrepreneur magazine.  +


ERIC - Education Research
ERIC - Education Research	ERIC

The Educational Resources Information Center (ERIC) database contains abstracts of articles covering all aspects of education, including vocational education, counseling, teacher education and testing.  Information extends back to 1966 and is updated monthly.  There are two subfiles within ERIC:  the Resources in Education (RIE) file and the Current Index to Journals in Education (CIJE) file.  The RIE subfile contains research/technical reports, conference papers and proceedings, program descriptions, opinion papers, bibliographies, reviews, dissertations, teaching and curriculum materials, lesson plans and guides.  The CIJE subfile contains abstracts of articles from 750 education related professional journals.  The information available in each article can include the author, title, source publication, publication year and an abstract of the article.  ERIC is published by the U.S. Department of Education.  $*


Government Information
Government Information  	Service: GOVERNMENT

This choice give you a menu of information on government services and publications.


Government Publications
Government Publications  	Service: GPO

There are two basic parts to this program. The first is a catalog of government publications, books and subscription services. In addition to providing ordering information, any CompuServe Member with a valid MasterCard or VISA can order online any publication handled by the Government Printing Office. The orders are compiled and forwarded directly to the Government Printing Office at least once a week and more frequently as volume dictates. The second part has online consumer information articles from government publications including articles on personal finance, health and fitness, automotive topics, food preparation and storage, parent and child, energy conservation and consumer notes. The entire database is updated weekly or as important changes occur. +


Health Database Plus
Health Database Plus  	Service: HLTDB

Health Database Plus provides information from consumer and professional health, nutrition, and fitness publications. The database makes available the full text of articles from selected lay journals published after January 1989, including Food and Nutrition, Health and Psychology Today. Synopses with author abstracts are available for articles published in technical and professional journals after June 1989, including Patient Care, RN and the New England Journal of Medicine. The full text of health related articles taken from a variety of consumer publications since 1983 are also generally available.  $


Information USA
Information USA  	Service: INFOUSA

Information USA contains three sections which provide access to free or nearly free government publications:

How would you like a birthday greeting from the President? Biking and

hiking maps from the National Park Service? Information USA tells you

how to use the free or nearly free government publications and services

that are available. It explains the art of obtaining information from

bureaucrats and gives other helpful information when dealing with the

government.

Information USA/International lists American Embassies and consulates,

potential health hazards and passport information available from the State

Department. Travelers benefit from booklets on cost of living overseas,

customs, language materials, schools and hospitals.

Information USA/Travel has information available on favorite pastimes

such as diving, hiking, camping or visiting historical sites.

Information USA was extracted from the reference book of the same name written by Matthew Lesko. +


IQuest
IQuest  	Service: IQUEST

IQuest, CompuServe's online information retrieval service, provides easy access to more than 850 databases from companies such as Dialog Information Services Inc., BRS Information Technologies, NewsNet Inc., Data-Star, ORBIT Search Service, Pergamon Financial Data Services, H.W. Wilson Company, FT Information Online, Ltd., G. Cam-L'Europeenne De Donnees, Questel Inc. and VU/TEXT Information Services Inc. All types of information are included. From scholarly to popular press, business-related to the obscure, IQuest is the most comprehensive source of online information anywhere. IQuest contains fully indexed historical data and is updated electronically each day. Both bibliographic and full-text documents are available. Source materials include magazines, newspapers, indexes, conference proceedings, directories, books, newsletters, government documents, dissertations, encyclopedias, patent records and reference guides. All IQuest databases are accessible via the same easy-to-use, menu-driven format. No training is required. IQuest offers three simple ways to retrieve information:

IQuest-I will choose the appropriate database once a member has selected a topic.

IQuest-II allows a member to go directly to a specified database.

Smart-SCANS search multiple databases.

Online real-time help is available in IQuest by typing SOS.  $*


KNOWLEDGE INDEX
KNOWLEDGE INDEX	Service: KI

KNOWLEDGE INDEX enables you to access over 50,000 journals through more than 100 full text and bibliographic databases available through Dialog. KNOWLEDGE INDEX provides access to three types of databases:  bibliographic, full text and directory. Search the databases with commands or through menu options; you need to know only the database names and the search terms. Often you can retrieve the full article; otherwise you can arrange to have the full text sent to you. This service is accessible evenings and weekends only.  $


Legal Research Center
Legal Research Center  	Service: LEGALRC

The Legal Research Center provides access to seven databases containing .

Indices to articles from more than 750 law journals

Indices to publications, studies, and other sources covering practical and

theoretical aspects of criminal justice, criminology, and law enforcement

Summaries of legislative, regulatory, judicial and policy documents

covering federal taxation; major legal issues in banking and finance

Indices to child abuse information sources

Databases included are American Banker Full Text, Child Abuse and Neglect (published by the U.S. Department of Health and Human Services), Congressional Information Services, Criminal Justice Periodical Index, Legal Resource Index, National Criminal Justice Reference Service (published by the U.S. Department of Justice), and Tax Notes Today.  $*


Magazine Database Plus
Magazine Database Plus  	Service: MAGDB

Find full-text magazine articles in more than 90 publications in Magazine Database Plus. This valuable research tool offers many advantages over your local library because the Database gives you six different methods of finding an article, magazines cannot be vandalized, and you don't have to leave the comfort of your own home or office. For additional online magazine articles, see Business Database Plus, Computer Database Plus and Health Database Plus.  $


Magill's Survey of Cinema
Magill's Survey of Cinema  	Service: MAGILL

Magill's Survey of Cinema provides a database of in-depth articles covering films released since 1902. Database entries can contain the film title, information about its release date, country of release, cast, credits, Motion Picture Association of America rating, running time and production studio. The plots and significant influences are extensively summarized and discussed.  $*


Marketing/Management Research Center
Marketing/Management Research Center	Service: MGMTRC

The Marketing/Management Research Center offers access to nine databases containing

Indices and full text of major U.S. and international business, management

and technical magazines

Indices to market and industry research reports, market studies and

statistical reports

U.S. and international company news releases.

Conduct marketing and management research using key word searches in databases such as ABI/INFORM, Findex, FINIS, Industry Data Sources, Infomat International Business, McGraw-Hill Publications Online, PTS MARS, PTS New Product Announcements, and PTS PROMT.  $*


Marquis Who's Who
Marquis Who's Who  	Service: BIOGRAPHY

The Marquis Who's Who database provides information on key North American professionals, obtained primarily directly from the subject. The information includes the subject's name; occupation; date and location of birth; name of spouse and names of parents and children; education; positions held during career; civic, military and political activities; memberships; awards; and other organizational affiliations. $*


Neighborhood Report
Neighborhood Report  	Service: NEIGHBORHOOD

The Neighborhood Report provides a summary of the demographic makeup of any Zip Code in the United States. Population, race and age breakdowns are displayed on the report as well as the household income distribution, the types of households and the occupations of the residents of the neighborhood. Housing patterns for the neighborhood are also examined with the status of occupied housing, average home value and rent, and the age of housing structures shown on the report. With the Neighborhood Report prospective home buyers or apartment dwellers can research areas to which they are considering moving. Similarly, home sellers can determine the most favorable selling points of their current Zip Code. An 80-column printer is needed for printing reports. Updated annually.  $


New Car Showroom
New Car Showroom  	Service: NEWCAR

New Car Showroom is a comparison shopping guide for consumers making new vehicle purchases. You can examine and compare features and specifications of passenger cars, trucks, vans and special-purpose vehicles. Over 500 foreign and domestic cars and trucks are compared by prices, standard and optional features and technical specifications, such as fuel economy and roominess. You can also calculate your monthly payments after you have selected a vehicle.  $*


NORD Services/Rare Disease Database
NORD Services/Rare Disease Database 	Service: NORD

The NORD Services/Rare Disease Database provides the member with current and accurate information on rare disorders and diseases. Some topics covered include AIDS research, education for handicapped children and information on digestive disease research centers. Members also have access to biomedical literature through MEDLINE and can communicate with other members on various subjects. In addition, a NORD newsletter is available which explains NORD and presents news on the latest rare disease updates and facts. Through NORD's networking program, people with the same orphan disorder can be linked together for mutual support.  +


NTIS-Government Sponsored Research
NTIS-Government Sponsored Research  	Service: NTIS

National Technical Information Service offers a database of references to articles from government-sponsored research, development and engineering reports. Information available on each article can include the title, author, corporate source, sponsor, report number, publication year, contract number and abstract. The database is updated every two weeks and includes information from 1970 to the present.  $*


PaperChase
PaperChase  	Service: PCH

PaperChase gives access to MEDLINE, the National Library of Medicine's database of references to biomedical literature. Included are over 7 million references from 4,000 journals which date from January 1966 through the present.  $


Patent Research Center
Patent Research Center  	Service: PATENT

The Patent Research Center provides access to databases containing:

Summaries of U.S. patents granted in chemical, mechanical, electrical and

design categories

Summaries of patents granted internationally

Conduct research on patents listed in the Claims/U.S. Patent Abstracts (1950 to present) and the World Patents Index (1963 to present).  $*


Peterson's College Database
Peterson's College Database  	Service: PETERSON

Peterson's College Database offers the member a comprehensive database that contains detailed descriptions of over 4,000 accredited or approved U.S. and Canadian colleges that grant associate and/or bachelor degrees. Members may search colleges by characteristics or college name/location. The guide will also give you in-depth information about specific aspects of any college you choose.


Phone*File
Phone*File 	Service: PHONEFILE

Want to find your college roommate or a long lost relative? Phone*File contains the names, addresses and phone numbers of more than 75 million US households. Relatives and friends across the nation are easy to find by searching the database by name and address; surname plus state, city and zip code or telephone number. Phone*File can be a cost-effective way of acquiring addresses and phone numbers.  $


Physicians Data Query
Physicians Data Query  	Service: PDQ

Physicians Data Query accesses four databases published by the National Cancer Institute. One database contains material written for the lay person covering more than 80 cancer types, providing information on treatment alternatives, stage expectations and general prognoses. Another is written for health care providers, making current information on most major cancers available, such as prognosis, stage-of-growth classifications with treatment options, and extensive bibliographies for further research. A directory database contains organizational and physician listings, with names, addresses, and other information provided for cancer centers, programs and specialists. A protocol database contains the treatment and medications used for different cancers.  $*


PsycINFO-Psychological Abstracts
PsycINFO-Psychological Abstracts 	Service: PSYCINFO

The PsycINFO database provides abstracts of articles from international literature in psychology and behavioral sciences. The articles cover applied, developmental, general and experimental psychology, communications systems, education, personal and professional issues, psychometrics, treatment and prevention, social processes and issues and more. Information on each article can include the authors, title, journal name, language, date of publication and abstract. The database is published by the American Psychological Association.  $*


SUPERSITE
SUPERSITE  	Service: SUPERSITE

SUPERSITE demographic information from CACI is available for the entire U.S. and every state, county, SMSA, Arbitron TV Market (ADI), Nielsen TV Market (DMA), Place, Census Tract, Minor Civil Division (MCD) and geometric definition by circle and Zip Code in the United States. Demographic reports are provided covering general demographics, income, housing, education, employment and current and five-year forecasts. In addition, sales potential reports for major types of retail stores can be generated. ACORN (A Classification of Residential Neighborhoods) Target Marketing profiles and potentials are also available. ACORN classifies all households in the U.S. into 44 market segments based on the demographic, socioeconomic and housing characteristics of the neighborhoods. The ACORN Market Potential Reports are created by linking the ACORN clusters to syndicated national surveys. Each report in SUPERSITE is surcharged, and you will be shown the cost of your requested reports before they are run to give you the opportunity to abort the run before incurring any surcharges. An 80-column printer is needed for printing reports. Sample reports are available at no surcharge. Updated annually.  $E


Trademark Research Center
TRADEMARKSCAN  	Service: TRADERC

The Trademark Research Center provides access to databases containing all textual-numeric (non-graphic) federal trademarks active in the U.S. and all nongraphic trademarks for the 50 U.S. states and Puerto Rico. The content of any entry contains the U.S class, international class, a description of the service or product, the status of the trademark, the registration date and date of first use. Additional information can include the filing date, original owner, assignor and assignee, series code and serial number.  $*


UK Marketing Library
UK Marketing Library	Service: UKMARKETING

UK Marketing LIbrary databases contain market research reports compiled by top marketing analysts.  The information is gathered from a variety of sources and includes reports from the ICC Key Note series, Management and Marketing Abstracts, Marketing Surveys Index, Mintel Research Reports and Mintel Special Reports and MSI Market Research Reports.  Most databases provide full-text articles and are updated regularly.  $*


US-State-County Reports
US-State-County Reports  	Service: USSTCN

The US-State-County Demographic Profiles provide summaries of the demographic makeup of the entire United States, any state or county. The profile gives population data, race and age breakdowns, household income distribution, types of households and occupations of residents in the defined area. In addition, the status of occupied housing, average home value and rent and the age of housing structures are reported. The US-State-County Profiles carry a surcharge per report. With these reports you can compare a Zip Code report, generated by the Neighborhood Report, to its county or state. An 80-column printer is needed for printing reports. Updated annually.  $


Related Topics -- Reference Library
Related Topics

Computer and Software Support

Hardware Forums

Software Forums

Electronic Mall/Shopping

The Electronic Mall

  --  See Auto/Boat/RV

Books/Periodicals

Investing and Finance

Australian/New Zealand Company Library

Company Information

Corporate Affiliations

D&B Dun's Electronic Business Directory

European Company Library

Fundwatch Online

German Company Library

International Company Information

IQINT - Company Information

UK Company Library

News, Weather, Sports

AIDS News Clips

AP Online

Executive News Service

Global Crises Forum

NewsGrid

Newspaper Library

Roger Ebert's Reviews & Features

Soviet Crisis News Clips

UK News Clips

UK Newspaper Library

Personal Interest and Hobbies

AIDS Information

Handicapped Users' Database

HealthNet

Professional Interests

Journalism Forum

Legal Forum

Special Interest Groups (Forums)

Consumer Electronics

Educational Research Forum

Human Sexuality Databank and Forums

Space/Astronomy Forums


Special Interest Groups (Forums)

This section contains forums for a variety of special interests such as education, aviation, computer art, astronomy, the military and entertainment.

Astronomy Forum

Consumer Electronics Forum

CyberForum

Democratic Forum

Dinosaur Forum

Education Forum

Educational Research Forum

The Electronic Frontier Foundation Forum

Foreign Language Forum

Human Sexuality Database and Forums

IBM Special Needs Forum

Issues Forum

JFK Assassination Forum

Political Debate Forum

Religion Forum

Science/Math Education Forum

Seniors Forum

Showbiz Forum

Soap Opera Summaries

Space/Astronomy

Space Forum

Students' Forum

White House Forum

Related Topics


Astronomy Forum
Astronomy Forum  	Service: ASTROFORUM

Amateur or professional stargazers can join cosmic forces with fellow astronomers from around the world. Beginners with a universe of questions can learn about hardware or techniques. Professionals can take advantage of the Astronomy Forum to rapidly disseminate information among colleagues. Members of all levels can learn about national or international special events of interest. Archives contain public domain astronomy software, quality reference articles and many vivid GIF graphic images.  +


Consumer Electronics Forum
Consumer Electronics Forum  	Service: CEFORUM

The Consumer Electronics Forum is dedicated to exchanging information about electronic consumer products such as VCRs, telephone answering machines, compact disk players and even earth station equipment. The forum features articles, reviews, new products and news in its data libraries. You can get answers for your questions and discuss the latest issues facing this industry. Special interactive online conferences feature guests from manufacturers such as Sony, Pioneer and Panasonic.  +


# CyberForum
CyberForum	Service: CYBERFORUM

Are you excited or just curious about the outlook of computing? Do you have opinions about the direction it is heading? Then enter CyberForum and discuss the future of various topics ranging from virtual reality to "nano-technology." Chat about how computers will affect fields such as science, the arts, literature and society. Join one of the workgroups to share your ideas about interfaces, programs or concepts that could be implemented today or in the near future. +


Democratic Forum
Democratic Forum	Service: DEMOCRATS

Politics and policies are on the agenda in the Democratic Forum. The forum, overseen by the Democratic National Committee, is dedicated to providing information and encouraging conversation about Democratic politics. The forum enables citizens to discuss the latest happenings and decisions. From the library, download a variety of papers and publications, from press releases, to speeches, to a calendar of events. Information is provided by organizations such as the Democratic Senatorial Campaign Committee and the College Democrats of America. +


Dinosaur Forum
Dinosaur Forum	Service: DINO

Dino lovers, scholars and fans of those prehistoric creatures can expand their knowledge by interacting with some of the world's most notable scientists and paleontologists in the Dinosaur Forum. Devoted to dinsosaurs, the forum offers learning games, activities and information on recent discoveries and on museum events. The libraries contain exciting graphics, expedition reports and information about such organizations as Dinamation International, Dinosaur Society and Dinosaur Club. +


Education Forum
Education Forum  	Service: EDFORUM

The Education Forum is designed to meet the diverse needs of people involved in the teaching and learning process. This includes teachers, parents, students, faculty members and other professionals in the education field. The increasing use of microcomputers and other high technologies in our schools and homes has been a natural topic of discussion in this forum.  +


Education Research Forum
Educational Research Forum 	Service: EDRESEARCH

The Educational Research Forum is for people who are interested in research about the process and products of education. Through the forum, the latest research findings are shared and compared, and a dialogue is established between researchers and educators in the schools. The forum is sponsored by the American Educational Research Association.  +


The Electronic Frontier Foundation Forum
The Electronic Frontier Foundation Forum 	Service: EFF

The EFF Forum enables people to share facts and opinions about issues concerning computer-based communication. Popular topics of discussion among the members of this forum include policy, social concerns and innovation.  +


Foriegn Language Forum
Foreign Language Forum 	Service: FLEFO

The Foreign Language Forum provides a service to both general and specific interests in the area of foreign languages and foreign language learning. It includes

Conferences

A job bank for translators, educators and students

Information on legislation and factors influencing the foreign language

profession

A list of professional organizations.  +


Human Sexuality Databank and Forums
Human Sexuality Databank and Forums 	Service: HUMAN

Human sexuality questions and problems are answered in an informative manner. Special features include articles on social skills, dating, relationships and sexual problems. Experts answer questions on a variety of topics. Two forums are available for members to share their feelings, experiences and relationships with others in a warm, supportive environment.  +


IBM Special Needs Forum
IBM Special Needs Forum  	Service: IBMSPECIAL

As a teacher, parent or student, do you or someone you know have special learning needs? If so, visit the IBM Special Needs Forum which addresses all aspects of special education -- from education of the handicapped to bilingual and vocational education, from K-12 to adult literacy programs. The forum includes information on and support of IBM educational programs such as Write to Read, Listen to Learn and PALS, and emphasizes software and hardware for IBM-compatible machines.  +


Issues Forum
Issues Forum  	Service: ISSUES

The Issues Forum is a forum for the free exchange of ideas about current issues and names in the news. Included are sections for African American issues, Hispanic issues, Asian issues, Native American issues, ethics/human rights, parenting, paranormal issues and more. A number of regularly scheduled conferences are held.  +


JFK Assassination Forum
JFK Assassination Forum	Service: JFKFORUM

 Serious researchers and amateurs are invited to discuss all aspects of the assassination of President John F. Kennedy and the resulting theories surrounding htat tragic event. +


Poltical Debate Forum
Poltical Debate Forum	Service: POLITICS

Here is where the Republicans, Democrats, Libertarians and others can meet to debate candidates and issues. There also are sections for independent groups, individual liberty, conspiracy theories and more.  +


Religion Forum
Religion Forum  	Service: RELIGION

The Religion Forum is designed for people who like to share discussions, opinions and information, as well as ask questions on topics that relate to religion. Forum members may meet new friends while expanding their theological horizons.  +


Science/Math Education Forum
Science/Math Education Forum  	Service: SCIENCE

This forum serves a variety of needs for science educators, students and others with interests in science and science education. It includes a large data library of software that can be downloaded into class and home computers. Plus, this forum contains practice problems for science and math college boards.  +


Seniors Forum
Seniors Forum	Service: SENIORS

If you are a senior (or even a pre-senior) or if you enjoy the company of those with lots of life experience, join the Seniors Forum. Discussion sections include retirement, social security, memories, grieving and health. Also, you can download articles and information from the library on a variety of topics ranging from relationships to legislation affection senior citizens. +


Showbiz Forum
Showbiz Forum  	Service: SHOWBIZ

There's no business like show business, and it's everybody's business in the Showbiz Forum. Share information and opinions with other members about your favorite movies, plays, celebrities and television shows. Keep informed of which movies are box-office hits, and, through the message board, you may even meet a future celebrity.  +


Soap Opera Summaries
Soap Opera Summaries  	Service: SOAPS

What did Erica do to Brooke? What did Frankie say to the DA? And who was in bed with Phillip? If you care about any of these questions, you should check out the Soap Opera Summaries. In addition to daily summaries, you will learn what is happening in real life to your favorite stars, cast lists, where to write to soap stars and fan club news. $


Space/Astronomy
Space/Astronomy  	Service: SPACE

If you like to ponder the secrets of the stars or are involved with the more practical aspects of astronomy and space education, explore the different parts of the Space/Astronomy. Find up-to-date sunspot and solar flare information in the American Sunspot Program. Find space shuttle status reports, reports on manned and unmanned missions, launch schedules, payload manifests, annual reviews of NASA's activities and accomplishments, and an archive of the spinoffs of space technology in the NASA News and Information section. Also access Sky and Telescope Online, the electronic news service of Sky & Telescope astronomy magazine.  +


Space Forum
Space Forum  	Service: SPACEFORUM

Space Forum is for members interested in all aspects of space exploration, travel, research, colonization, research and development and related activities. NASA news releases are posted regularly in this forum.  +


Students' Forum
Students' Forum  	Service: STUFO

The Student's Forum is popular with students who want to share their ideas and interests with other students around the world. Teachers exchange ideas using the forum.  +


White House Forum
White House Forum	Service: WHITEHOUSE

How is the Clinton administration doing? Here you can discuss the pros and cons of our executive branch. Topics of concern, such as the economy, the trade deficit, defense, education, social security and international affairs are debated. The libraries contain only files provided by the Office of Media Affairs for the White House: daily press briefings, the President's schedule and his speeches and comments at a variety of meetings and presentations.  +


Related Topics -- Special Interest Groups (Forums)
Related Topics

Communications

CB Forum

Computer and Software Support

Autodesk AutoCAD Forum

Borland International

Desktop Publishing Forum

Dr. Dobb's Journal

DTP Vendor Forum

European Forum

Graphics Forum

Javelin/EXPRESS Forum

LOGO Forum

MID Forums

Sight and Sound Forum

The World of Lotus

Electronic Mall/Shopping

The Electronic Mall

  - See	Books/Periodicals

Computer Hardware and Supplies

Computer Software

Hobbies/Toys/Pets

Merchandise/Electronics

Sports/Fitness/Health

Games

Gamers Forums

Investing and Finance

Calculating Personal Finances

Investors' Forum

NAIC Forum

News, Weather, Sports

Executive News Service

Florida Today Forum

Global Crises Forum

Motor Sports Forum

Outdoors News Clips

Roger Ebert's Reviews & Features

Soviet Crisis News Clips

Sports Forum

Personal Interests and Hobbies

Aquaria Fish Forums

Art/Music/Literature

Automotive Information

Bacchus Wine Forum

Collectibles Forum

Comics/Animation Forum

Cooks Online

Crafts Forum

Disabilities Forum

Earth Forum

Gardening Forum

Genealogy Forum

HamNet - Ham Radio - Forum

Handicapped Users' Database

Health/Fitness

Humane Society of the United States Forum

Literary Forum

Masonry Forum

MENSA Forum

Military and Veterans Forum

Music and Performing Arts Forum

New Age Forum

Outdoors Forum

Pets/Animal Forum

Photography Forum

RockNet

Sailing Forum

Sci-Fi/Fantasy Forum

Scuba Forum

TrainNet Forum

Worldwide Car Network

Professional Interests

AMIA Medical Forum

Aviation Forum

Broadcast Professionals Forum

Computer Consultants Forum

Computer Training Forum

Court Reporters Forum

E-Span

Entrepreneur's Small Business Forum

European Community Telework Forum

International Trade Forum

IQuest Business Management InfoCenter

IQuest Education InfoCenter

IQuest Engineering InfoCenter

IQuest Medical InfoCenter

Journalism Forum

Legal Forum

Office Automation Forum

PR and Marketing Forum

Safetynet

Working From Home Forum

Reference Library

Academic American Encyclopedia

Book Review Digest

Books in Print

Dissertation Abstracts

Entrepreneur's Business Opportunites and Franchise Database

Information USA

IQuest

Magazine Database Plus

Magill's Survey of Cinema

Marquis Who's Who

Peterson's College Database

Travel

Adventures in Travel

Califorinia Forum

Travel Forum

UK Forum

West Coast Travel


Travel

The Travel chapter provides you with air, hotel, car, tour and cruise information.

ABC Worldwide Hotel Guide

Adventures in Travel

Air Information/Reservations

California Forum

CompuServe Pacific Forum

Department of State Advisories

EAASY SABRE

EAASY SABRE (CIM)

Florida Forum

Hotel Information

OAG Electronic Edition Travel Service

Travel Britain Online

Travel Forum

UK Forum

VISA Advisors

West Coast Travel

WORLDSPAN Travelshopper

WORLDSPAN Travelshopper (CIM)

Zagat Restaurant Survey

Related Topics


ABC Worldwide Hotel Guide
ABC Worldwide Hotel Guide  	Service: ABC

The hotel guide provides an up-to-date comprehensive listing of over 25,000 hotel properties worldwide including location, local and toll-free telephone numbers, credit cards accepted, rates and facilities. You can search for hotels by city, hotel name, chain, rates, special services or amenities. Updated every three months.  +


Adventures in Travel
Adventures in Travel  	Service: AIT

Adventures in Travel contains travel articles covering all aspects of travel all over the world. Articles are written by travel writer Lee Foster and other professional travel writers. New articles appear every two weeks, and you can also read articles from previous weeks. Updated twice a month.  +


Air Information/Reservations
Air Information/Reservations  	Service: FLIGHTS

Air Information/Reservations contains EAASY SABRE, EAASY SABRE (CIM), the Official Airline Guide Electronic Edition Travel Service, WORLDSPAN Travelshopper and WORLDSPAN Travelshopper (CIM). Each offers complete schedule and fare information for all commercial flights throughout the world. When using any of these products, you will be asked for your departure and destination cities and your date of travel. All systems offer reservations and ticketing options as well as other travel information.


California Forum
California Forum	Service: CALFORUM

Enjoy online sunshine with the California Forum! Join the daily happy hour or the weekly poolside chat in the forum's conference sections. Find out the latest happenings in every corner of California, from the redwoods to San Diego. Discuss politics, touring and sports with California natives and California lovers in the California Forum. +


CompuServe Pacific Forum
CompuServe Pacific Forum	Service: PACFORUM

Whether you are a resident, expatriate or lover of the land down under, visit the CompuServe Pacific Forum to keep up to date with the latest news and happenings. Discuss topics such as sports and upcoming elections in the forum or read about entertainment events or business issues in the libraries. Potential visitors can learn all about the culture and sights to be found both in Australia and New Zealand.  +


Department of State Advisories
Department of State Advisories  	Service: STATE

The United States Department of State's Citizen Emergency Center maintains a continuously updated information service for Americans traveling abroad. Advisories and warnings cover conditions such as warfare, political unrest, hotel/motel shortages, currency regulations and other information of interest to the American traveler. Updated constantly by the Department of State.


EAASY SABRE
EAASY SABRE  	Service: SABRE

EAASY SABRE, the travel reservation system from American Airlines, provides flight schedules for almost all commercial airlines, information on more than 45 million airfares and access to more than 27,000 hotels and 52 car rental agencies. You can use EAASY SABRE to find the fastest route to a destination, check weather reports and AAdvantage travel awards and take advantage of the lowest airfares with the Bargain Finder feature. After confirming airline, hotel and car reservations online, you can arrange to receive your tickets through a travel agency, city ticket office, corporate travel office, airport or by U.S. mail. EAASY SABRE also offers a travel club called Travelers Access in which club members enjoy the lowest fares and hotel rates (money-back guaranteed), plus a 5% cash bonus on all bookings made through Travelers Access. Book flights, rent cars and reserve condo vacations, cruises and hotels. Save up to 25% on vacation travel and up to 65% on short-notice travel. Updated continually.


EAASY SABRE (CIM)
EAASY SABRE (CIM)  	Service: SABRECIM

EAASY SABRE has been CIMplified. Use the CompuServe Information Manager (CIM) to access EAASY SABRE and access flights, fares, hotel and car rental information and reservations. With CIM, you can easily scroll through pages of flights and fares. A Travel Profile is stored with your AAdvantage number to make reservations and flight searching easier. Use the powerful Bargain Finder feature to access the lowest fares available.


Florida Forum
Florida Forum	Service: FLORIDA

The Florida Forum allows residents, vacationers, or anyone with an interest in Florida to share information about the sunshine state.  You can take with the residents to find the best places to stay, eat or visit if you're planning a Florida vacation.  Find information on sporting and recreational activities or events/attractions of interest.  Access the Disneymania section for topics about DisneyWorld such as cartoon characters, attractions and vacation packages.  +


Hotel Information
Hotel Information  	Service: HOTELS

This choice contains menu options for finding information on accommodations when traveling in the U.S. and around the world.


OAG Electronic Edition Travel Service
OAG Electronic Edition Travel Service 	Service: OAG

Planning a trip?  Connect to the source.  The OAG ELECTRONIC EDITION Travel Service is your access point to a world of first-hand travel planning information.  Access OAG and explore the following databases:

Actual Airport Arrival/Departure/Gate Information - updated every 10

minutes for all airlines.

Worldwide Flight Information and Reservations

Weather Information

Lodging and Dining

Worldwide Travel Facts

Travel Industry News

Currency Exchange Rates

Frequent Flyer Program Information

Cruises and Discount Travel Packages

Travel File

Travel Advisories

Make your travel reservations online and choose from a number of ticketing options.  Updated continually. $


Travel Britain Online
Travel Britain Online	Service: TBONLINE

Who's playing in London's West End theatres? Where are the most popular pubs in London? Where and when are Britain's liviliest festivals? Answers to these and other questions can be found in Travel Britain Online. A database of events provides information on British festivals, exhibitions, shows and sports events. Users can also access a listing of some of London's best pubs and check out the latest tourist news on Travel Britain News.


Travel Forum
Travel Forum  	Service: TRAVSIG

The Travel Forum allows you to exchange travel stories, ideas and information with other forum members who are interested in traveling. You can talk with others who have already been to your destination to find out the best (or worst) restaurants and hotels. You can learn about the customs in foreign countries and other important information. You can also find out about destination spots, cruises, academic travel programs and rail travel. Leave questions for others or share your experiences.  +


UK Forum
UK Forum	Service: UKFORUM

The UK Forum focuses on a variety of UK cultural and social themes such as politics, sports, business, TV/film, hobbies, photography and UK travel.  The forum includes the ever-popular "Rovers Return Club" where members can participate in the kinds of forthright discussions associated with British pubs.  +


VISA Advisors
VISA Advisors  	Service: VISA

VISA Advisors is a passport and visa expediting firm located in Washington D.C. providing visa and passport requirements and documents. They will assist you in visa and passport processing and legalization of documents. VISA Advisories charges a service fee per document and hand carries your documents to the embassies or consulates involved. Visa and passport requirements updated monthly.


West Coast Travel
West Coast Travel	Service: WESTCOAST

West Coast Travel is a travel guide by Lee Foster which beckons you to the many pleasures of travel destinations in the western United States. For each area, Lee describes the flavor, how to get there, the area's history, the main attractions, nearby trips and where to get more information. He also has a section featuring articles on special interest travel. Questions may be left for Lee, which he will answer in future columns. Updated weekly.  +


WORLDSPAN Travelshopper
WORLDSPAN Travelshopper  	Service: WORLDSPAN

WORLDSPAN Travelshopper gives direct access to the WORLDSPAN reservation system (formerly PARS), which is owned by TWA, Northwest Airlines and Delta Airlines. You can look up flight availability and fares for any airline in the world. Travelshopper also provides the lowest fares available with Travelshopper's Low Fare Finder. Also you can book hotel rooms and rental cars. You can make reservations online and arrange ticketing through your travel agent or local airlines, or you can opt to pay by check (time permitting) or by credit card and have airline tickets mailed to you. Additional services and travel information, such as TWA and NORTHWEST flight operations information, weather, in-flight meals and movies, local times in other cities and currency conversion are also provided.


WORLDSPAN Travelshopper (CIM)
WORLDSPAN Travelshopper (CIM)  	Service: WORLDCIM

CompuServe and WORLDSPAN Travelshopper provide this new interface to the WORLDSPAN Reservation System for members who use CompuServe Information Manager (CIM). WORLDSPAN Travelshopper (CIM) allows you to navigate easily through flights, fares, fare restrictions and flight details. In addition, store your flight search criteria, passenger information and personal profile data online to save time and money when making a reservation or simply browsing flights.


Zagat Restaurant Survey
Zagat Restaurant Survey	Service: ZAGAT

Want to find out about a restaurant before you visit it?  Whether you are seeking French cuisine or deep-dish pizza, access the Zagat Restaurant Survey.  The survey features thousands of reviews based on annual surveys of restaurant patrons just like you.  Search for old and new restaurants in more than 20 cities and regions across the United States by restaurant name, location, type of cuisine or price.  While online, find out how to become a Zagat restaurant reviewer.  Bon appetit!


Related Topics -- Travel
Related Topics

Computer and Software Support

European Forum

Pacific Vendor Forum

Electronic Mall/Shopping

Electronic Mall

 - See Travel/Vacations

Investing and Financing

International Company Information

News, Weather, Sports

EMI Non-graphic Map

Florida Today Forum

Global Crises Forum

NWS Aviation Weather

Soviet Crisis News Clips

UK News Clips

UK Newspaper Library

Weather Maps

Weather Reports

Personal Interest and Hobbies

Model Aviation Forum

Sailing Forum

Scuba Forum

Professional Interests

Aviation Forum

Reference Library

Information USA

IQuest

Magazine Database Plus

Special Interest Groups (Forums)

Foreign Language Forum