										HELP

Install has detected that your faxmodem and mouse send the same signal to your computer to get its attention. This signal is called an Interrupt Request (or IRQ, for short). Ideally, each device connected to your computer should send a different IRQ signal.

Because of a shortage of available IRQs, computer devices sometimes share the same IRQ. Unfortunately, a mouse can't share an IRQ. Both your modem and mouse may act erratically or stop functioning until you eliminate the IRQ conflict.

To eliminate the IRQ conflict, consider these two suggestions. Check your faxmodem manual for others.

*  RESELECT COM PORT? On the previous screen, you were asked to 
   specify which COM port your faxmodem uses. If you made a mistake 
   specifying the COM port, Install will be mistaken about the faxmodem's IRQ. 
   When you specify a COM port, Install assumes that your faxmodem uses 
   the IRQ commonly assigned to that COM port (COM1 and COM3 are 
   assigned to IRQ4 and COM2 and COM4 to IRQ3). Check again that you 
   have specified the right COM port. If you don't know the faxmodem's COM 
   port, try a different port now. Install will check to see whether it's the correct 
   one.

*  CHANGE COM PORT? Reconnect your faxmodem to another COM port or 
   select another IRQ for the faxmodem.

   To change your faxmodem's COM port or IRQ, see the faxmodem manual. 
   You will have to cancel Install (and probably exit from Windows) to complete 
   the change. After changing the COM port or IRQ, restart Windows and this 
   FAXability Install program.
