										HELP

SPACE NEEDED: Install needs about 10 megabytes of free space to install FAXability: 1.5 megabytes on the drive where your Windows directory is, and 8.5 megabytes on the drive where you want to install FAXability.

OPTIONS: If you don't have enough space on the designated drive:
*	Select another drive that you think has enough space.

*	Cancel out of Install. Use Windows File Manager to delete files you 
	no longer need. Then run FAXability Install again.

INSTALLING OVER ANOTHER VERSION: If you are installing over another copy of FAXability, there may actually be enough room on the designated drive to install this version of FAXability. To find out, first uninstall the other version and re-run Install. (To uninstall the other version, select OK on the message screen and cancel Install. Then run Install again and select UnInstall from its main menu.)