; Zinc Interface Library - Version 2.0 definition file for MS Windows 3.0 DLL
; COPYRIGHT (C) 1990, 1991.  All Rights Reserved.
; Zinc Software Incorporated.  Pleasant Grove, Utah  USA
LIBRARY
DESCRIPTION	'Zinc Interface Library 2.0 DLL'
EXETYPE         WINDOWS
;CODE		PRELOAD MOVEABLE
;DATA		PRELOAD MOVEABLE MULTIPLE
CODE		FIXED NONDISCARDABLE PRELOAD
DATA		NONDISCARDABLE SINGLE PRELOAD
;HEAPSIZE	19200
;STACKSIZE	19200
HEAPSIZE	8192
