* prototypes for OctaMEDPlayer.library V7
##base _OctaPlayerBase
##bias 30
##public
GetPlayer8()()
FreePlayer8()()
PlayModule8(module)(A0)
ContModule8(module)(A0)
StopPlayer8()()
LoadModule8(filename)(A0)
UnLoadModule8(module)(A0)
SetModnum8(modnum)(D0)
RelocModule8(module)(A0)
SetHQ(hq)(D0)
* functions below in V7.00 or later
RequiredPlayRoutine8(module)(A0)
FastMemPlayRecommended8(module)(A0)
LoadModule_Fast8(module)(A0)
SetFastMemPlay8(newstate,buffsize)(D0/D1)
##end
