;******* Maximus CBCS DownSORT Definition File (.DEF) ********
;
;  The module definition file supplies extra information about the program
;  module to the LINKER.

NAME    DOWNSORT  WINDOWCOMPAT

DESCRIPTION 'MAXimus CBCS DOWNload file SORT. Copyright (1988,90) Rob Hamerling'
; PROTMODE
STACKSIZE  4096
HEAPSIZE   2048
; STUB      "g:\toolkt12\os2stub.exe"
