
This command allows you to make a connect to another NET/ROM node.

	eg  nconnect gb7ux-2
	or  nconnect aqusul

will connect you to the GB7UX-2 network node. Once you have typed the
command, this node will send you a message when the connection is made
(or if it fails).

