The connect command allows you to make an AX.25 connection to
another station.

Check the 'path' command to see if a path to the station you
want to connect to exists.

If there is a path to your desired station, all you need type
is.....

(G6XXX) G6XXX de G6DHU> conn <callsign>

You will be told when the connection is made (or fails).

Once you disconnect that station, or they disconnect you, you
will be returned to this node. 
