Das CompuServe Anmeldeprogramm

Wenn Sie Fragen zur Anmeldung haben, wenden Sie sich an das nächstgelegene CompuServe Büro.  Verwenden Sie die Bildlaufleiste dieses Hilfefensters, um die betreffende Adresse nachzuschlagen.

Liste der CompuServe Niederlassungen

Argentinien

Australien/Neuseeland

Chile

Deutschland

Frankreich

Großbritannien

Hong Kong

Israel

Japan

Kolumbien

Mexiko

Österreich

Schweiz

Singapur

Südafrika

Südkorea

Taiwan

Ungarn

USA / Kanada

Venezuela

Andere Länder


Das Fenster CompuServe Anmeldeprogamm
Das Fenster CompuServe Anmeldeprogramm

Wenn Sie Fragen zur Anmeldung haben, wenden Sie sich an das nächstgelegene CompuServe Büro.  Verwenden Sie die Bildlaufleiste dieses Hilfefensters, um die betreffende Adresse nachzuschlagen.

Liste der CompuServe Niederlassungen

Argentinien

Australien/Neuseeland

Chile

Deutschland

Frankreich

Großbritannien

Hong Kong

Israel

Japan

Kolumbien

Mexiko

Österreich

Schweiz

Singapur

Südafrika

Südkorea

Taiwan

Ungarn

USA / Kanada

Venezuela

Andere Länder


Das Fenster Verbindung einstellen

Im Fenster Verbindung einstellen können Sie den Verbindungsaufbauprozeß an Ihre Gegebenheiten anpassen.

Wenn Sie sich bei einer Einstellung nicht sicher sind, verwenden Sie den angezeigten Vorgabewert.

Falls Sie modemspezifische Informationen angeben wollen, klicken Sie auf Modemkonfiguration.

Wenn Sie die Verbindung über eine Kommunikationsschnittstelle herstellen, die auf ein LAN oder einen Modem-Pool zugreift, klicken Sie auf die Schaltfläche LAN.

Verwendung des Fensters Verbindung einstellen

1	Wenn Sie den Wert des Feldes Schnittstelle ändern wollen, klicken Sie auf den Drop-Down-Pfeil und anschließend auf die gewünschte Option.

Schnittstelle, oder Kommunikationsschnittstelle, bezieht sich auf den Anschluß auf der Rückseite Ihres Rechners, der für die Kommunikation verwendet wird. Üblicherweise wird dort das Modem angeschlossen.

2	Wenn Sie den Wert des Feldes Baudrate ändern möchten, klicken Sie auf den Drop-Down-Pfeil und anschließend auf die gewünschte Option.

Die Baudrate, oder Schnittstellengeschwindigkeit, gibt die aktuelle Geschwindigkeit an, mit der Daten über Ihre Schnittstelle übertragen werden.  Ihr Modem muß die ausgewählte Geschwindigkeit unterstützen.

3	Wenn Sie den Wert des Feldes Zugangsnetzwerk ändern möchten, klicken Sie auf den Drop-Down-Pfeil und anschließend auf die gewünschte Option.

Das Zugangsnetzwerk ist die Kombination von Leitungen, Satelliten und Geräten, die den Austausch von Informationen zwischen Ihrem Computer und CompuServe ermöglicht.

4	Wenn Sie den Wert des Feldes Wählsystem ändern wollen, klicken Sie auf den Drop-Down-Pfeil und anschließend auf die gewünschte Option.

Das Wählsystem gibt an, ob Ihr Rechner eine Nummer wählen muß, um mit CompuServe verbunden zu werden (z. B. Ton bei einem Tonwahltelefon).  Wählen Sie Direkt nur, wenn Ihr Rechner über eine Standleitung mit einem anderen System verbunden ist, das die Verbindung für Sie zur Verfügung stellt.

5	Wenn Sie den Wert des Feldes Einwahlnummer ändern wollen, geben Sie einen neuen Wert in das Feld ein.

Das Einwahlnummer ist die Telefonnummer, mit der Sie die Verbindung zu CompuServe herstellen.  (Sie ist NICHT mit Ihrer privaten oder geschäftlichen Telefonnummer zu verwechseln.)

6	Falls Sie modemspezifische Informationen angeben wollen, klicken Sie auf Modemkonfiguration.  (Geben Sie die erforderlichen Informationen ein, und klicken Sie anschließend auf OK, um zum Fenster Verbindung einstellen zurückzukehren.)

7	Wenn Sie die Verbindung über eine Kommunikationsschnittstelle herstellen, die auf ein LAN oder einen Modem-Pool zugreift, klicken Sie auf die Schaltfläche LAN. (Geben Sie die erforderlichen Informationen ein, und klicken Sie anschließend auf OK, um zum Fenster Verbindung einstellen zurückzukehren.)

8	Klicken Sie auf Weiter.

Liste der CompuServe Niederlassungen

Argentinien

Australien/Neuseeland

Chile

Deutschland

Frankreich

Großbritannien

Hong Kong

Israel

Japan

Kolumbien

Mexiko

Österreich

Schweiz

Singapur

Südafrika

Südkorea

Taiwan

Ungarn

USA / Kanada

Venezuela

Andere Länder


Das Fenster Kommunikationsschnittstelle auswählen

Im Fenster Kommunikationsschnittstelle auswählen legen Sie die Kommunikationsschnittstelle fest, an die Ihr Modem angeschlossen ist.  Aktivieren Sie das Optionsfeld der gewünschten Schnittstelle.

Die Kommunikationsschnittstelle ist der Anschluß auf der Rückseite Ihres Computers, der für Kommunikationszwecke verwendet wird.

Wenn Sie nicht wissen, welche Schnittstelle dies ist, markieren Sie die Option Automatisch einstellen (empfohlen).

Wenn Sie den Verbindungsaufbauprozeß an Ihr speziellen Gegebenheiten anpassen wollen, markieren Sie die Option Modem- und ISDN-Konfiguration einstellen.

Liste der CompuServe Niederlassungen

Argentinien

Australien/Neuseeland

Chile

Deutschland

Frankreich

Großbritannien

Hong Kong

Israel

Japan

Kolumbien

Mexiko

Österreich

Schweiz

Singapur

Südafrika

Südkorea

Taiwan

Ungarn

USA / Kanada

Venezuela

Andere Länder


Das Fenster Baudrate auswählen

Im Fenster Baudrate auswählen legen Sie die Schnittstellengeschwindigkeit fest.

Die Baudrate oder Schnittstellengeschwindigkeit gibt die aktuelle Geschwindigkeit an, mit der Daten über Ihre Schnittstelle übertragen werden.  Ihr Modem muß die ausgewählte Geschwindigkeit unterstützen.

Wenn Sie die Schnittstellengeschwindigkeit nicht kennen, klicken Sie im vorhergehenden Fenster auf Automatisch einstellen (empfohlen).

Liste der CompuServe Niederlassungen

Argentinien

Australien/Neuseeland

Chile

Deutschland

Frankreich

Großbritannien

Hong Kong

Israel

Japan

Kolumbien

Mexiko

Österreich

Schweiz

Singapur

Südafrika

Südkorea

Taiwan

Ungarn

USA / Kanada

Venezuela

Andere Länder


Das Fenster zur Auswahl eines anderen Landes

Im Fenster zur Auswahl eines anderen Landes werden Informationen über das Land aufgezeichnet, von dem aus die Verbindung zu CompuServe hergestellt wird.

Liste der CompuServe Niederlassungen

Argentinien

Australien/Neuseeland

Chile

Deutschland

Frankreich

Großbritannien

Hong Kong

Israel

Japan

Kolumbien

Mexiko

Österreich

Schweiz

Singapur

Südafrika

Südkorea

Taiwan

Ungarn

USA / Kanada

Venezuela

Andere Länder


Das Fenster Land auswählen

Im Fenster Land auswählen geben Sie das Land an, von dem aus die Verbindung zu CompuServe hergestellt wird.

Wählen Sie Ihr Land aus der Liste aus, indem Sie darauf klicken.  (Durch Klicken auf die Pfeilschaltfläche können Sie durch die Liste blättern.) Klicken Sie anschließend auf Weiter.

Liste der CompuServe Niederlassungen

Argentinien

Australien/Neuseeland

Chile

Deutschland

Frankreich

Großbritannien

Hong Kong

Israel

Japan

Kolumbien

Mexiko

Österreich

Schweiz

Singapur

Südafrika

Südkorea

Taiwan

Ungarn

USA / Kanada

Venezuela

Andere Länder


Das Fenster Einwahlnummer auswählen

Im Fenster Einwahlnummer auswählen können Sie nach einer für Sie geeigneten Einwahlnummer suchen.

Die Einwahlnummer ist die lokale CompuServe Telefonnummer, mit der die Verbindung zu CompuServe hergestellt wird.  (Sie ist NICHT mit Ihrer privaten oder geschäftlichen Telefonnummer zu verwechseln.)

Markieren Sie die Zeile mit den gewünschten Einträgen, und klicken Sie anschließend auf Weiter.

Liste der CompuServe Niederlassungen

Argentinien

Australien/Neuseeland

Chile

Deutschland

Frankreich

Großbritannien

Hong Kong

Israel

Japan

Kolumbien

Mexiko

Österreich

Schweiz

Singapur

Südafrika

Südkorea

Taiwan

Ungarn

USA / Kanada

Venezuela

Andere Länder


Das Fenster Nummer ändern

Im Fenster Nummer ändern können Sie weitere Einzelheiten zu der Einwahlnummer angeben, über die die Verbindung zu CompuServe hergestellt wird.

Diese Angaben sind wichtig.  Möglicherweise müssen vor oder nach der Einwahlnummer weitere Ziffern (oder Codes) hinzugefügt werden.  Beispielsweise wird für die Option Mein Anschluß verfügt über eine Anklopffunktion ein Code benötigt, der die Anklopffunktion vorübergehend außer Kraft setzt.  Wenn Sie nicht sicher sind, welche Ziffer bzw. welcher Code angegeben werden muß, wenden Sie sich an Ihre Telefongesellschaft.

Ist die Anklopffunktion aktiviert und geht ein Anruf ein, während Sie mit CompuServe verbunden sind, wird die Verbindung abgebrochen. Sie müssen dann die Verbindung erneut herstellen, um die CompuServe Sitzung fortzusetzen.

Aktivieren Sie die Kontrollkästchen, die für Ihre Situation zutreffen.  Wenn Sie eine Auswahl treffen müssen, klicken Sie auf den Drop-Down-Pfeil des betreffenden Feldes und anschließend auf die gewünschte Option.  Die gewählte Option wird dann in dem Feld angezeigt.

Trifft keine der Optionen in der Liste für Ihre Situation zu, klicken Sie einfach auf das Feld, und geben Sie anschließend die gewünschte Information ein.

Wenn Sie nicht wissen, welche Auswahl für Sie zutrifft, verwenden Sie die voreingestellte (bereits angezeigte) Option.

Liste der CompuServe Niederlassungen

Argentinien

Australien/Neuseeland

Chile

Deutschland

Frankreich

Großbritannien

Hong Kong

Israel

Japan

Kolumbien

Mexiko

Österreich

Schweiz

Singapur

Südafrika

Südkorea

Taiwan

Ungarn

USA / Kanada

Venezuela

Andere Länder


Das Fenster zur Festlegung der Verbindungseinstellungen

Wenn Sie Fragen zur Anmeldung haben, wenden Sie sich an das nächstgelegene CompuServe Büro.  Verwenden Sie die Bildlaufleiste dieses Hilfefensters, um die betreffende Adresse nachzuschlagen.

Liste der CompuServe Niederlassungen

Argentinien

Australien/Neuseeland

Chile

Deutschland

Frankreich

Großbritannien

Hong Kong

Israel

Japan

Kolumbien

Mexiko

Österreich

Schweiz

Singapur

Südafrika

Südkorea

Taiwan

Ungarn

USA / Kanada

Venezuela

Andere Länder


Das Fenster Modemeinstellungen

Im Fenster Modemeinstellungen legen Sie die Informationen für den Betrieb des Modems fest.  Sie benötigen dieses Fenster nur, wenn Sie ein Modem verwenden, das nicht dem Standardtyp (Hayes-kompatibel) entspricht.

Falls Ihr Modem nicht in der Liste aufgeführt ist, wählen Sie Andere. Schlagen Sie den Initialisierungsbefehl und andere Einstellungen, die eventuell geändert werden müssen, im Handbuch zu Ihrem Modem nach.  Geben Sie die entsprechenden Informationen ein, und klicken Sie auf OK.

Modem

Klicken Sie auf den Drop-Down-Pfeil des Feldes Modem, um eine Liste mit den verfügbaren Modems anzuzeigen.  Falls Ihr Modem in der Liste enthalten ist, wählen Sie es aus, indem Sie darauf klicken.  (Die korrekten Informationen werden dann automatisch eingefügt.)

Initialisierung

Geben Sie den Befehlsstring zur Initialisierung des Modems ein.  AT S0 Q0 V1^M ist der voreingestellte String für Hayes-kompatible Modems.  (AT teilt dem Modem mit, daß weitere Befehle folgen.  SO deaktiviert die automatische Antwort.  Q0 aktiviert die Weitergabe des Ergebniscodes sowohl an das lokale als auch an das entfernte Modem.  V1 aktviert Ergebniscodes im Klartext.)

Zurücksetzen

Dieser String setzt das Modem zurück.  (Voreingestellt ist Z).

Präfix

Dieser String leitet einen Befehl ein.  Das Präfix wird auch als AT-Befehl (Attention) bezeichnet.  (Voreingestellt ist AT).

Suffix

Dieser String beendet einen Befehl. Normalerweise wird ein Zeilenumbruchszeichen benutzt.  (Voreingestellt ist ^M).

Abbrechen

Dieser String löst einen Escape-Befehl (Abbrechen-Befehl) aus.  Voreingestellt ist +++.  (Auf Modems, die das MNP- oder ARC-Fehlerprotokoll benutzen, führt +++ ebenfalls zum Verbindungsabbruch.)

Verbindung

Dieser String zeigt an, daß die Verbindung hergestellt ist.  (Voreingestellt ist CONNECT.)

Tonwahl

Dieser String leitet das Tonwahlverfahren ein.  (Voreingestellt ist DT.)

Impulswahl

Dieser String leitet das Impulswahlverfahren ein.  (Voreingestellt ist DP.)

Auflegen

Dieser String trennt die Verbindung.  (Voreingestellt ist H).

Befehl erkannt

Dieser String gibt an, daß ein Befehl vom Modem empfangen und erkannt wurde.  (Voreingestellt ist OK.)

Keine Verbindung

Dieser String gibt an, daß keine Verbindung besteht bzw. kein Signal vorhanden ist.  (Voreingestellt ist NO CARRIER.)


Informationen zur Kontaktaufnahme mit dem Kundendienst stammen aus CS3.hlp ...


Andere Länder

In Ländern, die nicht aufgeführt sind, wenden Sie sich bitte an CompuServe USA:

Direkt

+(1)(614) 718 2800

Fax

+(1)(614) 529-1611


Argentinien

CompuServe S.A. Argentina

Stadt	Telefon innerhalb Argentiniens	Einwahlnummern innnerhalb Argentiniens

Buenos Aires	(01) 345-3817/3871	(01) 311-0600

Catamarca	(0822) 33279	Noch nicht verfügbar

Comodoro Rivadavia	(097) 44-3409	(097) 46-4616

Csrdoba	(051) 22-1507	(051) 22-0990

La Plata	(021) 24-4641	(021) 89-0555

La Rioja	(0822) 33279	Noch nicht verfügbar

Mar del Plata	(023) 91-6249	(023) 94-3242

Mendoza	(061) 29-6581	(061) 23-5151

Necochea	(0262) 38005	Noch nicht verfügbar

Neuquin	(099) 43-7884	Noch nicht verfügbar

Olavarrma	(0284) 45400	Noch nicht verfügbar

Parana	(043) 31-9200	(043) 31-9100

Resistencia	(0722) 29948	Noch nicht verfügbar

Rosario	(041) 26-4402	(041) 26-3008

Santa Fi	(042) 50-0115	(042) 50-5080

Tucuman	(081) 22-3000	Noch nicht verfügbar

Usuahia	(0901) 36163	Noch nicht verfügbar

Villa Constitucisn	(0461) 93113	(0461) 73130

* Alle oben aufgelisteten Einwahlnummern unterstützen 28,800 Baud.

Vorwahl:	Außerhalb Argentiniens: (541)

Innerhalb Argentiniens: (01)

Geschäftszeiten: Werktags 9.00 - 18.00


Australien/Neuseeland

Fujitsu Australia Ltd.

Gebührenfreie Nummer

1-800-025-240

Außerhalb Australiens: (+61) (2) 410-4260

Fax:	Innerhalb Australiens: (+61) (2) 410-4223

International: +61 2 410 4260

Geschäftszeiten:

Werktags 7.00 - 19.00 (Ortszeit)

Samstags 8.00 - 13.00 (Ortszeit)

CompuServe Pacific

Neuseeland

Gebührenfreie Nummer

0800-446-113

Außerhalb Neuseelands: (+61) (2) 410-4260

Fax:	International: +61 2 410 4260

Geschäftszeiten:

Werktags 9.00 - 21.00 (Ortszeit - Neuseeland)

Samstags 10.00 - 15.00 (Ortszeit - Neuseeland)


Österreich

Österreich

0660-8750

Direkt

+49 180 525 81 47

Fax

+(49)(89) 6657 8008


Chile

Chilepac S.A.

Direkt

+(56) 225-25171

Fax

+(56)(2) 252-5624


Frankreich

CompuServe Information Service SARL

Gebührenfreie Nummer

0801 63871

Direkt

+(33)(1) 47 14 21 60

Fax

+(33)(1) 47 14 21 51


Deutschland

CompuServe GmbH

0180 525 81 47

Direkt +49 180 525 81 47

Fax

+(49)(89) 6657 8008


Hongkong

CompuServe Hong Kong

Direkt

+(852)(2) 833-1500

Fax

+(852)(2) 506-3445


Ungarn

CompuServe Hungary

Direkt

+(36)(1) 175-6483

Fax

+(36)(1) 212-4612

+(36)(1) 212-0639


Israel

CompuServe Israel

Direkt

+(972)(3) 638-8230 oder 638-8222

Fax

+(972)(3) 638-8288


Japan

NIFTY Corporation

Gebührenfreie Nummer

012-022-1200

Direkt

+(81)(3) 54715806

Fax

+(81)(3) 5471-5890 oder 5891


Mexiko

CompuServe Mexico

Direkt

+(52)(5) 629-8191

Fax

+(52)(5) 629-8198


Niederlande

CompuServe Netherlands

Gebührenfreie Nummer

060-225-991

Fax

+31 20 487 4753


Südafrika

CompuServe Africa

Gebührenfreie Nummer

0800 11 22 52

Direkt

+(27)(12) 841-2530

Fax

+(27)(12)841-2518


Südkorea

ATEL Co., Overseas Info. Team

Gebührenfreie Nummer

080-090-1435

Direkt

+(82)(2) 318-1435

Fax

+(82)(2) 753-8666


Schweiz

Schweiz

0848-801112

Direkt

+41 848-801112

Fax

+(49)(89) 6657 8008


Taiwan

TTN-Serve

Gebührenfreie Nummer

080-251-177

Direkt

+(886)(2) 788-1588

Fax

+(886)(2) 782-2990


Großbritannien

CompuServe Information Service (UK) Ltd.

Gebührenfreie Nummer

0800 000 400

Direkt

+(44) (990) 412 412

Fax

+(44)(117) 925 2210


USA/Kanada

Customer Service

Gebührenfreie Nummer

1-800-848-8990

Direkt

+(1)(614) 718 2800

Fax

+(1)(614) 529-1611


Venezuela

CompuServe C.A. Venezuela

Direkt

+(58)(2) 793-2984

Fax

+(58)(2) 793-1952


Kolumbien

Kolumbien

Direkt

+(57)(1) 312-1703

Fax

+(57)(1) 312-1857


Singapur

Singapur

Gebührenfreie Nummer

800-6161-376

Direkt

+(61)(2) 410-4260

Fax

+(61)(2) 410-4223