NAME               idoiface
DESCRIPTION        'ProtoGen Application'
EXETYPE            WINDOWS
STUB               'WINSTUB.EXE'
CODE               DISCARDABLE PRELOAD
DATA               PRELOAD
HEAPSIZE           4000
STACKSIZE          16000
EXPORTS
                   MAINWNDPROC
;lRegen_Def
;lRegen_Def
                   fnTopToolbarWndProc
                   fnStatusLineWndProc
                   fnAboutidoifaceWndProc
                   fnidodialogWndProc
                   fnaddentityWndProc
                   fndeleteentityWndProc
                   fnaddrelationWndProc
                   fnsettextWndProc
                   fncurrententityWndProc
                   fnBannerWndProc
                   fnalignerWndProc
                   fncolorsetWndProc
                   fndelrelWndProc

