   Codebuster help screen has been¢removed and put in the documentation¢section. This was because it was in¢40 columns and I'm sure people would¢prefer printing it out in 80¢columns, which it now is.¢¢Apologies if you haven't got a¢printer.¢¢John E. (TEBSF)¢