Copyright: Copyright ® DASYTEC 1993


Hardwarehilfe DEMO-Treiber
Hardware Help

DEMO Driver

If you have acquired DASYLab together with one of our hardware drivers for your data acquisition board or similar device, you will find a description of that hardware here.

These Hardware Help pages contain information on jumper and DIP switch settings and on the pin assignment and ranges of the signal input and output connectors. They also comment on the settings that have to be made in DASYLab.

This DEMO driver, however, does not require any data acquisition hardware. It only serves to demonstrate the wide range of options provided by DASYLab for the solution of measuring problems.

•	The Analog Input module generates sine, triangular, and square signals of various frequencies.

•	The Digital Input module generates TTL signals of various frequencies, but of constant duty cycle.

•	You can change the sampling rate in the Experiment Setup dialog box from the Experiment menu to change the frequencies of the generated digital signal.

•	Experiment with the Generator module to provide additional signals, and see the effects of changes to the Block Size settings in the Experiment Setup dialog box.

We hope you will soon find DASYLab an easy-to-use and helpful tool.