Ulead Color Picker dialog box

Allows you to choose colors visually from a color palette.

First color tab Shows a color spectrum with a slider for adjusting hue. Click anywhere in the color field to define a custom color. The color slider at the right then displays the range of color levels available for the selected component. Drag the slider or enter a value in the Hue field at the bottom to adjust its hue.

Second color tab Shows a color matrix with a slider for adjusting brightness. Click anywhere in the matrix to select a custom color. The color slider at the right then displays the range of color levels available for the selected component. Drag the slider or enter a value in the Brightness field at the bottom to adjust its brightness.

Other color tabs Shows 88 color blocks, each containing related colors. Click on the color block you want and then fine tune it manually by changing the RGB values.

Red value Enter a new value for the red channel here.

Green value Enter a new value for the green channel here.

Blue value Enter a new value for the blue channel here.

Hue value Enter a new value for the hue model here.

Saturation value Enter a new value for the saturation model here.

Brightness value Enter a new value for the brightness model here.

Hex Displays the Hex value of the currently selected color. This is beneficial as you can use the Hex value in other applications.

New / Current block The right side shows the original color under the mouse pointer. The left side shows the color defined by the red, green, and blue value boxes.