Copyright: Copyright © ChG_Tools, Germany
Citation: From: "ChG_Tools Software Agreement" [Copyright © ChG_Tools, Germany]


Index
Page I

This Help file is accompanying a ChG_Tools Shareware Application ("Software") and must not be removed.

You may evaluate this Software for a trial period of 30 days. If you continue to use this Software more than 30 Days, you are obligated to register it, or remove it from your computer.

Please feel free to copy this Shareware program (entire archive only), and pass it along to friends, colleagues, your favorite BBS, or wherever you like...

What you ought to know about...

Copyright/Copying/Shareware

Limited Warranty for Software

Should you have any questions concerning this Agreement, or you desire to contact ChG_Tools for any reason, please use the address information included in your product, or write:

ChG_Tools Software Development · Christian Germelmann

Promenade 58 · D-37431 Bad Lauterberg · Germany · Phone/Fax: +49 5524 999731

E-Mail: CompuServe 100520,2644 · Internet, T-Online, etc.: 100520.2644@compuserve.com


Copyright/Copying/Shareware
Page II

This Help file is accompanying a ChG_Tools Shareware Application ("Software") and must not be removed.

SOFTWARE AGREEMENT

You should carefully read the following terms and conditions before using this Software.
This Software Agreement supersedes any and all previous Software Agreements.

COPYRIGHT PROTECTION

This ChG_Tools Software is copyrighted material. You may not make any changes or modifications to the Software. You may not decompile, disassemble, or otherwise reverse-engineer the Software in any way.
You may make copies of the Software only under the terms of the following section.

COPYING THE SOFTWARE

You are granted a limited license to copy this Software only for the trial use of others subject to the terms of this Software Agreement described herein, and the conditions described below. This Software must be copied in an unmodified form and the self-extracting archive file must contain all the files listed in ARCHIVE.TXT.
No fee, charge or other compensation may be accepted or requested by anyone without the express written permission of ChG_Tools.

SHAREWARE EVALUATION AND REGISTRATION

This Software is distributed as Shareware. Shareware is a form of software distribution, not free software. You are hereby licensed to use this Software for evaluation purposes without charge for a period of 30 days. If you use this Software after the 30 day evaluation period a registration fee is required. (See: Help file accompanying this Software.)
Unregistered use of this Software after the 30-day evaluation period is in violation of copyright laws.

When payment and PIN code is received you will be sent a license code (LIC) to upgrade to the registered full version. There are significant advantages to registering your copy, not least the continued availability of good quality software at reasonable prices.

Registrations allows to improve this program, and create more. Keeping the Shareware concept alive benefits you with access to thousands of inexpensive try-before-you-buy programs.

Please note that "buying" this program from a Shareware distributor does not count towards registering it !
ChG_Tools does not receive any money from Shareware distributors. The only payment comes when you register directly with ChG_Tools or via SWREG on CompuServe.

You may use the Shareware version of this Software on a trial basis provided you do not violate the protection afforded the licensed Software by the copyright laws, and you agree to the terms of this agreement. If you use this Software on a regular basis you are obligated to purchase it.

* * * * * * * * * *


Limited Warranty
Page III

This Help file is accompanying a ChG_Tools Shareware Application ("Software") and must not be removed.

LIMITED WARRANTY

ChG_Tools warrants that the SOFTWARE will perform substantially in accordance with the accompanying description for a period of 90 days from the date of receipt. Any implied warranty on the SOFTWARE is limited to 90 days. Some states/jurisdictions do not allow limitations on duration of an implied warranty, so the above limitation may not apply to you.

CUSTOMER REMEDIES

ChG_Tools entire liability and your exclusive remedy shall be, at ChG_Tools option, either return the price paid or the registration fee for SHAREWARE, repectively or replacement of the SOFTWARE that does not meet ChG_Tools Limited Warranty and which is returned to ChG_Tools together with your license number (LIC). This Limited Warranty is void if failure of the SOFTWARE has resulted from accident, abuse, or misapplication. Any replacement SOFTWARE will be warranted for the remainder of the original warranty period or 30 days, whichever is longer.
All remedies are void for SHAREWARE without registration, FREEWARE or SOURCE CODE or parts of the same; you are using these at your own risk only.

NO LIABILITY FOR CONSEQUENTIAL DAMAGES

To the maximum extent permitted by applicable law, in no event shall ChG_Tools be liable for any other damages whatsoever (including, without limitation, damages for loss of business profits, business interruption, loss of business information, or other pecuniary loss) arising out of the use of or inability to use these ChG_Tools products, even if ChG_Tools has been advised of the possibility of such damages. In any case, ChG_Tools entire liability under any provision of this agreement shall be limited to the amount actually paid by you for the SOFTWARE or to the amount of the registration fee for the SHAREWARE, respectively. Because some states/jurisdictions do not allow the exclusion or limitation of liability for consequential, or incidental damages, the above limitation may not apply to you.

IMPORTANT

By running the executable file of this application you are agreeing to be bound by the terms of this agreement.

* * * * * * * * * *


C o p y r i g h t

Christian Germelmann
Promenade 58
D-37431 Bad Lauterberg
Germany
Tel.: +49 5524 999731
CompuServe 100520,2644
INTERNET,  etc.:
100520.2644@compuserve.com