Welcome!
The C:\> Promt DOS shell utility

This program is Freeware

If you like this program please

send any coments to:

Rob Boulden

1007 South Lewis

Stillwater, OK 74074

Email: Ash@ionet.net

Options:

Batch file Configuration:

If this item is checked, the batchfile in the MEMO box will be exicuted upon starting of the DOS prompt.

NOTE:   The following two items will only be applicable if there is no EMM's loading in the CONFIG.SYS.  The most common EMM is EMM386.EXE.  The only memory manager loading in the CONFIG.SYS should be HIMEM.SYS.  If this is the case, the C:\> Prompt utility will control the memory management according to which  item is selected.

The default EMS and XMS memory amounts are 8megs each.  This number may be altered by editing the following files found in the Windows 95 directory.

Browse to the Windows 95 directory and select any of the folling files and right-click.  Select properties.  Select the memory tab.  Change the respective number to the desired number.

for EMS use

CPEMS.PIF (for using no batch file)

CPEMSA.PIF (for using batchfile);

for NOEMS use

CPXMS.PIF (for using no batch file)

CPXMSA.PIF (for using batchfile);

USES EMS:  The DOS prompt memory manager will use EMS.

USES NOEMS:  The DOS prompt memory manager will use XMS.

C:\> is an option when rightclicking on any file or directory.

                                   .