InS_StArT
LCI2TXI.COM
1.0
^MELCO LCI2-TXI Fast Ethernet Adapter,LCI2TXI.COM,IE0
?This driver supports only PCI machine
*OIE0(FRAME)Media Frame Type(s)
?NOTE: Ethernet_802.2 is now the default frame type for ODI Drivers.
@Ethernet_802.2
Ethernet_802.3
Ethernet_II
Ethernet_SNAP
InS_EnD
