Help Index
About Alter Resolution Explanation

Items

Resolution

Scan

Big Screen

Shortcut

Colors

Font Size

Restart

Change

Test

Shortcut List


Changes display (Windows) resolution , number of colors, and mode. Any changes made will not be in effect until clicking (Windows) restart button.


Resolution

Selects a display resolution.

1600 x 1200 	(96Hz)   i

1280 x 1024 	(60Hz)   Ni

1280 x 1024 	(70Hz)   NiFF

1280 x 1024 	(87Hz)   i

1024 x 768  	(60Hz)   Ni

1024 x 768  	(70Hz)   NiFF

1024 x 768  	(75Hz)   NiFF

1024 x 768  	(87Hz)   i

800 x 600   	(56Hz)   Ni

800 x 600   	(60Hz)   Ni

800 x 600   	(75Hz)   NiFF

640 x 480   	(60Hz)   Ni

640 x 480   	(75Hz)   NiFF


Scan

Selects a refresh rate.


Big Screen

Selects a virtual desktop size.

 	4MB Card    	2MB Card

256 colors 	1600 x 1200 	1600 x 1023

64K colors 	1600 x 1023 	1024 x 960

16M colors 	1024 x 960  	800 x 600

Big Screen size should be greater than or equal to Resolution size.


Resolution
Shortcut

Selects a shortcut key.


Colors

Selects color depths of 256,64K and 16M colors.

Resolution  	4MB Card    	2MB Card

1600 x 1200 	256         	-

1280 x 1024 	256/64K     	256

1024 x 768  	256/64K/16M 	256/64K

800 x 600   	256/64K/16M 	256/64K/16M

640 x 480   	256/64K/16M 	256/64K/16M


Font Size

Selects font size of small and large.


Restart

Restarts Windows.


Change

Shows dynamic resolution changes.


Test

Automatically switches your monitor to display the selected mode without exiting this control panel, press ESC key or Cancel button to end test.


Shortcut List

Lists shortcut keys.