Copyright: © The ESYS Corporation


Help Contents
Contents

Installation Options

Installation Type


Installation Type


Network Drive Installation,

A Network Drive Installation will only install the Simeon files to the Network directory selected, and not configure the client to actually run from this directory.


Local PC Installation

A Local PC Installation, will install Simeon to a program directory, and configure Simeon to run from a working directory on a Local PC.


Work Station Installation

A Work Station Installation, will Setup Simeon to run from the Network Directory without installing the program files locally to the PC.