Copyright: The ESYS Corporation


Help Contents

Simeon Install Options


Simeon Install Options

Setup has detected that there are existing files in the Target installation directory.

You can now choose what setup should do:

Update current configuration files to Simeon 4.1: Setup will move all of the configuration files from this directory to a directory of your choice before proceeding with the installation.  Once the Simeon 4.1 files are installed the configuration files will be restored.

Backup existing configuration files to a backup directory: Setup will move all the files from this directory to a directory of your choice before proceeding with the installation.  Setup will then overwrite current configuration files.  This will give you the option of restoring the previous configuration files at your leisure.

Overwrite existing files with Simeon 4.1 files: Setup will first delete all the existing Simeon files in the Target directory, and then install the new Simeon 4.1 files.  Choosing this option will also delete any existing configuration that you may have; please ensure that these files are removable.

Select a different directory to install Simeon 4.1: Setup will ask you to select a different installation directory.