;******* HELLO C Sample Program Module Definition File (.DEF) ********
;
;  The module definition file supplies extra information about the program
;  module to the LINKER.
;  Copyright 1991 IBM Corporation
;
;  Different HEAPSIZE used. ( 1024 bytes )


NAME    hello WINDOWAPI

DESCRIPTION 'OS/2 Presentation Manager Sample'

DATA    MULTIPLE

; STACKSIZE   8192
HEAPSIZE    1024

PROTMODE

