LIBRARY	QUOTER1
;
; This is for the debugging version of this library (i.e. the one without the C
; run-time library compiled into it).
; 
DESCRIPTION	'The Quoteriser - miscellaneous routine library (C) 1997-1998 Nicholas Paul Sheppard'

DATA		MULTIPLE NONSHARED

EXPORTS
;
; general.h
;
	cgetc			@1
	dircat			@2
	dirfname		@3
	dirnoext		@4
	dirsimp			@5
	strabbrev		@6
	strboxf			@7
	strcmpci		@8
	strencl			@9
	stresctok		@10
	strfchr			@11
	strfromf		@12
	strtncpy		@13
	strpre			@14
	strreplace		@15
	strrmchr		@16
;
; pmutil.h
;
	ScrollMetafile		@17
	ScrollMsgHandler	@18
	ScrollSetGeometry	@19
	SpawnPM			@20
;
; Routines from the xtype library
;
	fgetxstr		@21
	xstrcat			@22
	xstrcatc		@23
	xstrcpy			@24
	xstrcvt			@25
	xstrdel			@26
	xstrfree		@27
	xstrncat		@28
	xstrnew			@29
	xstrtrunc		@30
