LIBRARY gthread
DESCRIPTION "gthread.dll 1.2.8 for EMX/OS2"
CODE PRELOAD
DATA MULTIPLE NONSHARED
STACKSIZE 32768
EXPORTS
  "g_thread_init" @1
