;##############################################################################
; $Id: rmt_disk.def,v 1.7 1994/10/04 21:40:54 ak Exp $
;##############################################################################
; $Log: rmt_disk.def,v $
;Revision 1.7  1994/10/04  21:40:54  ak
;Added the remaining functions to disk support.
;
; Revision 1.6  1994/09/01 23:54:49  ak
; Don't export _DLL_InitTerm. Seems to be included anyway.
;
;Revision 1.5  1994/02/16 15:29:06  edvkai
;Dummy checkin for CVS 1.3 crlf.
;
;Revision 1.4  1993/12/05 13:48:16  ak
;*** empty log message ***
;
;Revision 1.3  1993/11/25  18:53:41  edvkai
;Removed DLL import by number.
;Changed return codes to avoid ambiguities.
;Changed lseek into seek, parameter changes.
;
;Revision 1.1.1.1  1993/02/08  21:32:03  AK
;TAR device interface DLLs.
;
;Revision 1.1  1993/02/08  21:32:01  AK
;Initial revision
;
;##############################################################################
LIBRARY 'RMT_DISK' INITINSTANCE
DESCRIPTION 'GTAK Disk Access Module'
CODE LOADONCALL
DATA LOADONCALL NONSHARED MULTIPLE
EXPORTS
	rmt_open
	rmt_read
	rmt_write
	rmt_seek
	rmt_close
	rmt_error
	rmt_status
