NewWait4Port Documentation

Contents:

Introduction What is it all about ? Features What’s so special with NewWait4Port ? Installation How to make it work Usage How to use it Bugs No program is perfect History Have a look back Contact How you can get in contact with me

Introduction So what does it do ? NewWait4Port is a replacement of the WaitForPort command provided with Amiga-OS. It waits for a Message Port to appear and then end itself. This is useful for batch scripts. Here’s an example: run <>NIL: Miami:Miami ;start Miami TCP/IP-Stack as background task NewWait4Port MIAMI.1 ;wait for its Msg port to appear rx "ADDRESS MIAMI.1 ONLINE" ;send a rexx command to this port This script waits till Miami has been started and its ARexx Port is available. Then it tells Miami to go online. Without NewWait4Port you would try to send a rexx message before the Port is available as it needs some time for Miami to start. Of course you could use a simple wait 5 . But you never really know how long Miami will need to start.

Features The original WaitForPort command of Amiga-OS has two major disadvantages: •it ends itself if the port isn’t available within 10 seconds. •it uses an endless loop of FindPort() calls resulting in a massive loss of CPU performance. NewWait4Port waits for the Port to appear even if it has to wait for hours. It also allows you to define a delay time between FindPort() calls preventing a loss of CPU performance.

Installation Nothing’s as simple as that. Copy NewWait4Port to sys:rexxc/ Rename it to WaitForPort if you like. Copy the documentation to wherever you want.

Page 2 of 4

Page 2 of 4

Usage

PORT/A DELAYTICKS/N

PORT/A is the name of the message port to wait for. This argument must be provided. If the name includes spaces you need to enclose it with "". Consider that Amiga-OS port names are case sensitive !

DELAYTICKS/N is the delay time between the single FindPort() calls. The value given must be the number of 1/50 seconds (=1 tick). Defaults to 0 (behaviour of the original WaitForPort command). 25 is probably a good value here.

Example:

NewWait4Port MIAMI.1 10 ; waits for MIAMI.1 port to appear. It checks its availability every 10/50 second (=200 milli seconds).

If you start NewWait4Port without any arguments Amiga-DOS will show you the template and ask you for input. If you input a ? now you will get a more detailed explanation of the arguments.

You can cancel NewWait4Port by sending a CTRL_C break. This can be done by pressing Ctrl C or by the following commandline:

break ‘status COM=newwait4port‘ C

Note that it can take up to DELAYTICKS time for the program to quit as the program cannot quit within a Delay() call.

Bugs

No bugs known (so far...). Tell me if you find one.

History

1.00 First Version, first Aminet Release

Page 3 of 4

Page 3 of 4

Copyright Notice ©1999 by Jean Holzammer This Programm is Freeware . You may use it for free for private and commercial use. You may distribute it as long as you provide the full and unmodified archive. If you distribute it commercially you may not charge more than 1 EUR per disc or 5 E per CD-ROM. Otherwise you need my explicit permission. Permission is hereby granted to Aminet CD-ROMs and Aminet Set CD-ROMs.

Contact information Do you want to report bugs, make suggestions or show me you like this product you can contact me at jholzammer@bene.baynet.de snailmail: Jean Holzammer Ringstraße 20 92369 Sengenthal Germany fax: (0049 for Germany) 089/6661 713 498 http://Jean.Holzammer.home.pages.de You can also contact me if you are interested in the source of the programm. Thanks to: •Wouter van Oortmerssen for his implementation of the E language. •Dietmar Eilert for the best text editor available on any platform. •Urban Müller and his team for the Aminet that initiated a boom of freely available software.

•Richard Körber for GuideML. •everyone else supporting the idea of free software and open source technology.

Page 4 of 4

Page 4 of 4