Copyright: CorelFLOW Setup Help, V. 1.0, 1994 Corel Corp.


Welcome to Setup

Setup guides you through the installation of CorelFLOW to your hard drive. During the installation, you will be asked to select a destination directory for the program files and to custom select additional files (symbol libraries, fonts) that you may want installed on your hard drive. For more detailed installation instructions and troubleshooting information, refer to the Getting Started Section of the CorelFLOW User's Manual.

Should you wish to run CorelFLOW from the CD-ROM, exit this installation program and run SETUP2.exe located on the CorelFLOW CD. With the CD-ROM-based installation, only a minimum number of files are copied to your hard drive, conserving disk space.

Note: If you install using SETUP2, the CorelFLOW CD must be in your CD-ROM drive to run the application.

____________________

Dialog Box Options

About

Displays the version # of the software and copyright information.

Continue

Proceeds with the installation.

Exit

Quits the installation program.


Welcome to CD-ROM Setup

Setup shows you how to install CorelFLOW so that it runs exclusively from your CD-ROM. Only the essential files required to run the program will be copied to your hard drive, ensuring that the least amount of disk space is used.

During the installation, you will be asked to choose a destination directory for the program files and to custom select additional files (symbol libraries, fonts) that you may want installed on your hard drive. For more detailed installation instructions and troubleshooting information, refer to the Getting Started Section of the CorelFLOW User's Manual.

____________________

Dialog Box Options

About

Displays the version # of the software and copyright information.

Continue

Proceeds with the installation.

Exit

Quits the installation program.


Welcome to Network Administrator Setup
Welcome to the Network Administrator Setup

Setup guides you through the installation of the CorelFLOW software to a network server. During the installation, you will be asked to select a destination directory for the program files and to custom select the files that you want the workstation users to have access to.

After the main network installation has been completed, each individual workstation must be set up to run CorelFLOW. For more detailed installation instructions and troubleshooting information, refer to the Getting Started Section of the CorelFLOW User's Manual.

Note: Windows 3.1 or higher must be installed and working properly on the network server before installing CorelFLOW.

____________________

Dialog Box Options

About

Displays the version # of the software and copyright information.

Continue

Proceeds with the installation.

Exit

Quits the installation program.


Welcome to Network Workstation Setup
Welcome to the Network Workstation Setup

Setup shows you how to install CorelFLOW from the network server to your workstation. During the installation, you will be asked to select a destination directory for the program files and to custom select the files you want installed on your hard drive. For more detailed installation instructions and troubleshooting information, refer to the Getting Started Section of the CorelFLOW User's Manual.

Note: Certain files may not be available for selection, depending on the parameters set by the Network Administrator.

____________________

Dialog Box Options

About

Displays the version # of the software and copyright information.

Continue

Proceeds with the installation.

Exit

Quits the installation program.


Customizing Your Corel Applications
Customizing Your Copy of CorelFLOW

Type your name and the software's serial number in the provided list boxes to customize your copy of CorelFLOW. After the installation is complete, this information will appear in the About dialog box (Help menu). Then, should you have to contact Customer Support, and they ask for your software's serial number, you will be able to reference it quickly and easily from within the application.

If you want to bypass this option, choose Continue to move on to the next dialog box or Exit to quit the installation program.


Choosing a Directory for the Installation
Choosing a Destination Directory

The Directory list box displays the default drive and directory (C:\CFLOW20) where the program files will be installed on your hard drive. If you prefer to install the files to a different location, type the full path of the alternate directory in the provided list box.

____________________

Dialog Box Options

Continue

Proceeds with the installation.

Exit

Quits the installation program.


Total Disk Space Required

The total space required value is a measure of how many kilobytes of space the selected files will take up on your hard drive. Included in this calculation are extra files required to run the program.


Selecting Applications and Options to Install
Selecting Files to Install

Lists the files (fonts, symbol libraries etc.) you can choose to install on your hard drive. For each selected item, the amount of disk space required is listed in the right-hand column. The total disk space required for all currently selected files and the space available on your hard drive are listed at the bottom left of the dialog box.

____________________

Dialog Box Options

File Check Boxes

By default, all files are selected for installation, but you can deselect any file by clicking the check box associated with the file name to clear it.

Customize Buttons

Opens a dialog box where you can select or deselect individual files (fonts, symbol libraries). To conserve disk space, only select the files you require.

Continue

Finalizes the selections and proceeds with the installation.

Back

Returns to the previous dialog box.

Exit

Quits the installation program.


Selecting Symbol Libraries
Selecting Smart Symbol Libraries

Choose which symbol libraries you want installed by adding or deleting library names to and from the Install list box. Use the function buttons to move names from one list to the other. For more information, click on [image] next to the name.

  Add All button

  Add button

  Delete button

  Delete All button

Tip: Double-click on a name to move it to the opposite list box.

____________________

Dialog Box Options

Continue

Finalizes the selections and returns to the previous dialog box.

Cancel

Clears any selections and returns to the previous dialog box.

Exit

Quits the installation program.


Add button

•	To move a single name, click on it, then choose Add to move the name to the Install list box.

•	To move multiple names, click and drag the mouse across the selections until they are highlighted. Choose Add to move them to the Install list box.


Add All button

Moves all names to the Install list box.


Delete button

•	To move a single name, click on it, then choose Delete to move the name to the Do Not Install list box.

•	To move multiple names, click and drag the mouse across the selections until they are highlighted. Choose Delete to move them to the Do Not Install list box.


Delete All button

Moves all names to the Do Not Install list box.


Selecting True Type Fonts

Choose which fonts you want installed by adding or deleting font names to and from the Install list box. Consult the CorelFLOW User's Manual for samples of the supported fonts. Use the function buttons to move names from one list to the other. For more information, click on [image] next to the name.

  Add All button

  Add button

  Delete button

  Delete All button

Tip: Double-click on a name to move it to the opposite list box.

Note: Avoid installing more than 300 fonts. The more fonts installed, the slower the performance of Windows will be.

____________________

Dialog Box Options

Continue

Finalizes the selections and returns to the previous dialog box.

Cancel

Clears any selections you made and returns to the previous dialog box.

Exit

Quits the installation program.


Starting the Installation

This is the last step before the installation process begins. If you choose Install, all the files that you selected will be unarchived and loaded onto your hard drive.

Throughout the installation of the software, a dialog box displays the percentage of the installation that has been completed, as well as a running list of the files being copied. A new program group with icons representing the program and readme file will automatically be created in the Program Manager. If you have any problems or questions about the installation, consult the CorelFLOW User's Manual.

____________________

Dialog Box Options

Install

Begins the installation of the files to your hard drive.

Back

Returns to the previous dialog box

Exit

Quits the installation program.


Starting the Installation

This is the last step before the installation process begins. If you choose Install, all the files that you selected will be unarchived and loaded onto the network server.

Throughout the installation process, a dialog box displays the percentage of the installation that has been completed, as well as a running list of the files being copied. If you have any problems or questions about the installation, consult the CorelFLOW User's Manual.

Note: Users can run Setup from the Setup directory to install CorelFLOW on their workstations.

____________________

Dialog Box Options

Install

Begins the installation of the files to the server.

Back

Returns to the previous dialog box

Exit

Quits the installation program.