*ABO
About ...
%
*A
Installing TCutilities

Startup directory.....Directory where M.BAT, TCM.BAT, TCF.BAT and
                      ED.BAT will be placed.

Program directory.....Directory where all EXE, NLS and HLP files
                      will be placed.

Work directory........Directory for configuration files, menu files
                      and temporary files.
*KBD
Keyboard
%
*C
Program directory

The program directory must be located on a drive which has at least
400 KB of free disk space.
*CP
Select character
%
*B
Startup directory

The installation program searches your PATH for a file called
MODE.COM.  The location of this file is assumed to be your DOS
directory, which is presented as a suggestion for startup
directory.

You are not allowed to specify a directory which is not included
in the PATH statement in your AUTOEXEC.BAT file.
*HLP
Using help
%
*D
Work directory

The suggested directory names indicate that you should place the
work directory within the program directory.  This is a "tidy"
arrangement, although it may not be the most effective.  To increase
performance, you could place the work directory on a RAM disk.
If you do, please make the necessary changes to TCMEND.BAT to copy
all changed files from the RAM disk to a safe place on a hard disk
or diskette.
