HelpOS2: 



	Orchid is currently developing Fahrenheit drivers for IBM
	OS/2 version 2.0. These drivers will be available on the
	Orchid BBS. See " Technical Support " for information on
	accessing the BBS.
EndOS2:

HelpSCO:
									     
	The Orchid Fahrenheit is currently supported on the SCO Unix
	platform in the following resolutions:

	 640 x 480  256 Colors             1024 x 768  256 Colors
	 640 x 480  32,768 Colors          1280 x 960   16 Colors
	 800 x 600  256 Colors             1280 x 1024  16 Colors

	The Fahrenheit is supported in the following SCO releases:

	Open Desktop 2.01
	Xsight       4.1
	Advanced Graphics Adapter EFS

	These drivers are available direct from SCO:

	SCO
	400 Encinal St.
	P.O Box 1900
	Santa Cruz, Calif 95061
	(408) 425-7222
EndSCO:

HelpIntractv:



	The Orchid Fahrenheit is currently supported in the Interactive
	Unix X-Windows Environment in standard VGA modes. Extended mode, PMI
	drivers are currently under development and will soon be available
	from Sunsoft for INTERACTIVE X11.
EndIntractv:

HelpTchsupt:


   New Fahrenheit drivers and additional drivers not included with this
   disk are available through the Orchid Technical Support Department or
   may be downloaded from the Orchid BBS. You may also send your driver
   questions and requests via fax to the number listed below.

	   Technical Support Department       (510) 683-0323
	   Technical Support Department Fax   (510) 683-0355
	   Orchid's BBS, 2400 baud, N, 8, 1   (510) 683-0327
	   Orchid's BBS, 9600 baud, N, 8, 1   (510) 683-0555

   Orchid currently provides a 16-line BBS system: 12-lines are dedicated
   to 2400 baud units and 4-lines are dedicated to the 9600 baud units.  We
   recommend that 1200 baud users call in on the 2400 baud lines.  Orchid's
   modem settings are: Parity=NONE (N), Data Bits=8, and Stop Bits=1.

EndTchsupt:

/*--------------------More Menu Help---------------------------------*/
HelpMore:



    More.... contains information on drivers that are not currently
    included with the Fahrenheit, but may be available from the
    Orchid BBS. Also included in this section are the phone numbers
    for the Orchid Technical Support Department and the phone numbers
    for the Orchid BBS.

EndMore:

/*-------------------- Utility Menu Help -----------------------------*/
HelpUtilMain:

  The Orchid Fahrenheit Video Adapter provides the following utilities:

  FMODE.EXE -- Is a program designed to help you select the Fahrenheit
	       video modes which are available for your configuration.
	       With FMODE, you can switch your Fahrenheit into one of the 
	       many extended high resolution graphics and text modes. In 
	       addition, your Fahrenheit supports the hardware emulation 
	       of the video standards: MDA, HGC and CGA.

  FDEMO.EXE -- FDEMO is a demo program that allows you to view the
	       enhanced VGA graphic modes of your Fahrenheit VA.

  Additional Notes:
  -----------------
  To activate any of these programs, it is necessary to run the
  programs from the directory in which they were installed. If
  you accepted the default directory, the following example will work:

		cd\fah_util             <Enter>

  Run the desired utility.  
  
  To avoid the need for a directory change, you may wish to add this 
  directory to your PATH statement located in your AUTOEXEC.BAT file.

EndUtilMain:

/*------------------------ Utility Finish Menu ---------------------------*/
HelpUtilFin:

  Utility installation is complete. 

EndUtilFin:

/*----------------------- Windows 3.x Help -------------------------------*/
HelpWin:

  Orchid Windows 3.x HyperDriver for the Fahrenheit
  -------------------------------------------------

  The table below lists the resolutions and colors available for  
  the Fahrenheit VA boards.
 
  Resolutions/Color         
   640 x 480  16 colors            
   640 x 480  256 colors          
   640 x 480  32,768 colors        
   640 x 480  65,536 colors        
   640 x 480  16,777,216 colors    
   800 x 600  16 colors           
   800 x 600  256 colors           
  1024 x 768  16 colors           
  1024 x 768  256 colors           
  1280 x 960  16 colors            

  Installation:
 
  This program will automatically install the Orchid Windows HyperDriver and
  
  the Orchid Windows utility "ORCHID SETUP".

HelpUseWin:   /* a label */

  Using the Orchid Windows HyperDriver:
  -------------------------------------

  To configure the HyperDriver to display in a different resolution,
  number of colors or menu font size use "ORCHID SETUP".

  For Windows 3.1, "ORCHID SETUP" is located inside the Control Panel.
		   
		   Select the Orchid Icon within the Windows Control Panel
		   to open the Orchid Setup Utility.  

  For Windows 3.0, "ORCHID SETUP" Icon is located on the  Windows desktop.
		      
  Note: Windows 3.0 only runs in Standard and Enhanced Mode.


  Configuring the Orchid Voice Notes Application and Sound Driver:
  ---------------------------------------------------------------_

  The drivers and application will automatically be loaded into your
  Windows 3.1 system files.  When you enter Windows drag the Voice Note 
  Icon from its Group to your Windows Start-up Group.  Restart Windows
  to activate Voice Notes (Fahrenheit VA & Fahrneheit VA/VLB).   
  
  If a problem occures follow the manual installation listed below:

  1. Select the Control Panel Icon under the Main Group. 
  
  2. Select the Drivers Icon under the Control Panel Group.
  
  3. Select the ADD Button for additional drivers.

  4. Select the "Orchid Fahrenheit VA" driver from the Menu. 
  
  5. Select "Current" drive already on system.

  6. The Sound Driver has now been installed.

  7. Drag the "Orchid Voice Notes" icon from the Orchid Voice Note 
     Group to your "Start-Up" Group.  
  
  You are now ready to restart Windows and the Orchid Voice Note 
  application will automatically start.

  Norton Desktop for Windows Users:
  ---------------------------------
  Due to the way Norton Desktop for Windows modifies the GRP 
  configuration, you will have to load the Windows applications 
  manually.  Use the File Manager and drag the following EXE into 
  your Start-up Group:

  C:\WINDOWS\SYSTEM\ORCHNOTE.EXE

  Please reference your Microsoft Manual for more information on how
  to add Windows applications to a Window Group.


  IMPORTANT!
  ----------
  If you select either 1280 x 960 or 1024 x 768 resolution in configuring
  the Orchid HyperDriver, please be sure your monitor can support these
  extended modes.  If your monitor does not support the above resolutions,
  you will receive a scrambled display. If this happens, delete the ORCHID.INI
  file from the Windows directory. Restart Windows and then rerun the Orchid
  Setup utility to select a compatible resolution. If you are not sure if
  your monitor can run these resolutions, we recommend the following actions:

  1. Check the Fahrenheit switch settings
  2. Check your monitor manual.
  3. Contact your Dealer
  
EndWin:

/*---------------------- Lotus 1-2-3 Help ---------------------------------*/
HelpLotus:

  Lotus 1-2-3 v 2.0 - 2.3 Display Drivers
   
  The following drivers are included:

  123D600.DRV  = 800 x 600  Dual Monitor Support
  123D768.DRV  = 1024 x 768 Dual Monitor Support
  123S600.DRV  = 800 x 600  Single Monitor Support
  123S768.DRV  = 1024 x 768 Single Monitor Support
  123TEXT.DRV  = 80 x25*
  123TXT25.DRV = 132 x 25*
  123TXT43.DRV = 132 x 43*

  *Color Text mode drivers

HelpLotusInst:
  Lotus 1-2-3 includes an installation utility which allows the user to
  update the available drivers. The following installation instructions
  are to be run from your Lotus 1-2-3 directory using the Lotus INSTALL.

		    Installing Lotus 1-2-3 (v2.0)
		 -----------------------------------
  1. From the \123 directory type INSTALL.

  2. Select "Advanced Options".

  3. Select "Add new drivers to Library"

  4. When prompted for the path name insert the Fahrenhei Driver disk
     and input the the floppy drive location. ( A: or B: )

  5. Select "Modify Current Driver Set".

  6. Choose one or both of the "Text Display" and "Graphics Display"
     options.  Once you have made your selections, press the <Esc> key
     to return to the "Advanced Options" menu.
  
  7. Select "Save Changes" and press <Enter> twice.

  8. Select "Exit Install Program" and select "yes".
  
  Lotus 1-2-3  v2.01 installation is complete.



		 Lotus 1-2-3 Install Program (v2.3):
		-----------------------------------
  1. From the \123 directory type INSTALL.

  2. Select "Change Selected Equipment" from the Main Menu.
  
  3. Select "Add New Drivers to the Library".  The Install program will
     prompt for the location of the drivers. Insert the Fahrenheit
     drivers diskette and enter the drive letter. ( A: or B: )
    
  4. Select "Modify the Current Driver Set".

  5. Choose one or both of the "Text Display" and "Graphics Display" options.
     Once you have made your resolution selections, press the <Esc> key to
     return to the "Change Selected Equipment" menu.

  6. Select "Save the Current Driver Set" and press <Enter> twice.

  7. Select "End Install" and select "yes".

  Lotus 1-2-3 v2.3 installation is complete.

EndLotus:

/*----------------------- CAD system Main Help ---------------------------*/
HelpCADMain:

  The Orchid Fahrenheit Video Adapter provides display drivers for
  the following CAD applications:

	AutoCAD Release 10 & 11 (Real Mode "RADI4.1")
	AutoCAD Release 10 & 11 (Protected Mode "FADI4.1")
	3D Studio version 1.0 & 2.0
	AutoShade version 1.5, 2.0 & 2.1
	CADKey version 3.51 to 4.06
	CADVance version 3.5+
	VersaCAD Designer version 5.4, 6.0 & 7.0 
	VersaCAD 386 version 6.0 & 7.0
	Generic CADD version 3.0 to 6.0
	MicroStation version 3.3 to 4.0 (Real Mode)
	MicroStation version 4.0 (Protected Mode)

EndCADMain:


/*--------------------- AutoCAD 10 Real Mode Help ------------------------*/
HelpACAD10r:

  Driver Installation for AutoCAD Release 10 & 11 (Real Mode ADI 4.1).

  1.  Before using AutoCAD, you must first execute the driver by typing
      at the DOS Prompt:

		FADI -[Option[Parameters]]
      
      Where [Option[Parameters]] is one or a combination of the following:

	0x[i]     Installs driver at interrupt "i", (0x10 to 0xFF).
		  Note: Default interrupt vector is "0x7A".

	D[n]      Selects Display Mode.  Note: Default is mode "0"

	R[n]      Selects Render Mode.  Note: Default is mode "0"


      Where [n] is one of the following:
								  Minimum
	n       Resolution      Color      Display      Render    Memory
      --------------------------------------------------------------------
	0       640x480         256           Y            Y      512K
	1       800x600         16            Y            N      512K
	2       800x600         256           Y            Y      1024K
	3       1024x768        16            Y            N      512K
	4       1024x768        256           Y            Y      1024K
	5       1280x960        16            Y            N      1024K
	7       1080x1024       16            Y            N      1024K
	9       640x480         32K/64K       N            Y      1024K

  2.  Run AutoCAD and set the display device to "ADI display v4.x"
      in the AutoCAD display device configuration menu.

  3.  Exit and save the configuration information.

  This driver is a TSR (Terminate and Stay Resident) program that must be
  invoked BEFORE AutoCAD (or other AutoDesk products) will run.  The driver
  will accept certain command line options that will change the behavior of
  the driver.  These options will allow you to select the resolution for 
  the display and rendering device, or to install the driver at a different
  interrupt vector.

EndACAD10r:

/*-------------------------- 3D Studio Help ------------------------------*/
Help3ds:

  AutoDesk's 3D Studio:
  ---------------------
  
  The 3D Studio version 1.0 & 2.0 386 Protected Mode driver is:
   
	     FADI41.EXP
   
  The Protect Mode FADI 4.1 Driver supports the following resolutions:   
    
	 640x480   256 colors       1024x768   16  colors 
	 640x480   32K colors       1024x768   256 colors
	 800x600   16  colors       1280x960   16  colors
	 800x600   256 colors       1280x1024  16  colors
  

  INSTALLATION:
  -------------

  1.  Delete the 3DADI.CFG file from the \3DS directory: 
  
		Del \3DS\3DADI.CFG.

  2.  In your AUTOEXEC.BAT file set the environment variable to point to the
      driver file.

      EXAMPLE:
  
		Set RCPADI=\3DS\FADI41.EXP
  
  Note:  This program automatically adds the SET options in AUTOEXEC.BAT
  for you.
    
  3.  Edit the 3DS.SET file using a DOS editor at the following locations:

	       DEFAULT-DISPLAY=
	       MAIN-DISPLAY=
	       MATERIAL-DISPLAY=

      (note: approximately 8 pages down):
   
      Change them to reflect the following:
   
	       DEFAULT-DISPLAY="RCPADI"
	       MAIN-DISPLAY=RCPADI
	       MATERIAL-DISPLAY=RCPADI
    
  Note: If a ";" is in front of either option, remove it.
	The maximum resolution for the Material Display
	is 800 x 600.  If you select a higher resolution, it will
	be very difficult to see.

  4.  Reboot machine.
  5.  Run "3DS" from "\3DS" subdirectory and answer the remaining
      configuration questions.
   
End3ds:

/*-------------------- AutoShade ver. 2.0 Help  --------------------------*/
Helpshade:
  
  AutoDesk's AutoShade 1.5, 2.0 & 2.1:
  ------------------------------------

  The AutoShade version 1.5, 2.0 & 2.1 386 Protected Mode driver is:
   
	     FADI41.EXP
   
  The Protect Mode FADI 4.1 Driver supports the following resolutions:   

	 640x480   256 colors       1024x768   16  colors 
	 640x480   32K colors       1024x768   256 colors
	 800x600   16  colors       1280x960   16  colors
	 800x600   256 colors       1280x1024  16  colors
  

  INSTALLATION:
  -------------

  1.  Delete the SHADE.CFG file from the \SHADE2 directory:
		
		Del \SHADE2\SHADE.CFG

  2.  Set environment variables to point to the driver files.
      (in your AUTOEXEC.BAT file type):

      EXAMPLE
		Set SHADE=\SHADE2\RMANSUPT
		Set DSPADI=\SHADE2\FADI41.EXP
		Set RDPADI=\SHADE2\FADI41.EXP
		Set RCPADI=\SHADE2\FADI41.EXP

   Note: This program automatically adds the SET options to your AUTOEXEC.BAT
   for you.
 
  3.  Reboot machine before entering AutoShade (to set varibles).
  
  4.  Run "shade" from the \SHADE2 subdirectory.
  
  5.  Select pointing device (i.e. Microsoft mouse).
  
  6.  Select "P386 Autodesk Device Interface display driver".
  
  7.  Select "P386 Autodesk Device Interface rendering driver".
  
  8.  Answer "YES" to the next three 3 questions.

	   YES: Display and AutoShade rendering devices share a single screen.
	   YES: Display and Renderman rendering devices share a single screen.
	   YES: Flip Screen does require a redraw.

  9.  Select a rendering hard copy device.
  
  10. Quit, and the configuration will be saved.


Endshade:

/*-------------------- AutoCAD 11 386 Mode Help --------------------------*/  
HelpACAD11p:
 
  The AutoCAD Release 10 & 11 386 Protected Mode driver is:
   
	     FADI41.EXP
   
  The Protected Mode FADI 4.1 Driver supports the following resolutions:   
    
	 640x480   256 colors       1024x768   16  colors 
	 640x480   32K colors       1024x768   256 colors
	 800x600   16  colors       1280x960   16  colors
	 800x600   256 colors       1280x1024  16  colors
  
  To use the driver, you must set up the environment variable "DSPADI=" 
  to point to the driver file. For example, in your AUTOEXEC.BAT file 
  include the following statements: 
   
	     SET DSPADI=C:\ACAD11\FADI41.EXP
	     SET DOSX=-CALLB 2
   
  Note: AutoCAD creates a startup batch file called "ACAD386.BAT". You 
  can also add the above SET options to the batch file.
   
  This program automatically adds the SET options to your AUTOEXEC.BAT
  for you.

  1. Reboot the system after the modifications have been made to your 
     AUTOEXEC.BAT file.

  2. Run AutoCAD and set the display device to "ADI P386 v4.0/4.1 display"
     in the AutoCAD display device configuration menu (option 5 and then
     option 3).

  3. Answer the driver questions.

  4. Exit the save the configuration information.

EndACAD11p:

/*---------------------------- CADKey Help -------------------------------*/
HelpCADKey:

  CADKey Display Driver
 
  The drivers for CADKey are:
 
	   CK_911.EXE
      and  GRDEV.DAT
 
  Using the CADKey Driver:
     
  1. Run the CADKey CONFIG program, and make the following selections:
  
  2. Select "Set Graphics Options".
  
  3. Select "Select Graphics Device" option.
  
  4. Select "Fahrenheit".
  
  5. Select the desired resolution (refer to the monitor specifications for
     supported resolutions ).

  6. Select the remaining graphics options.
  
  7. Exit.
   
  The driver is a TSR (Terminate and Stay Resident) that must be invoked 
  before CADKey is run. The driver will accept certain command line 
  options that will change the behavior of the driver. These options will 
  allow you to remove a previous copy of the driver from memory, or to 
  install the driver at a different interrupt.
     
  To remove a previous copy of the driver, use the '-r' option.
  EXAMPLE:
	  'CK_911 -r   will remove the last installation of the driver

  This driver will install itself on interrupt 60h by default. To install
  it at another interrupt, use the '-fnn' option. Where 'nn' is
  replaced by a number between 60 and 67.
     
  EXAMPLES:
	   'CK_911'      will install the driver at interrupt 60h
	   'CK_911 -f62' will install the driver at interrupt 62h


EndCADKey:

/*-------------------------- DataCAD Help --------------------------------*/
HelpDataCAD:

  DataCAD Display Driver
 
  The drivers for DataCAD are:
 
	     CK_911.EXE
	     DL_911.EXE
	     DRIVERS.GD2
	and  DRIVERS.GD4
 
  Using the DataCAD Driver:

  Run the DataCAD CONFIG program and follow the instructions to
  activate the Orchid Fahrenheit Driver.

  The driver is a TSR (Terminate and Stay Resident) that must be
  invoked before DataCAD is run. The driver will accept certain command 
  line options that will change the behavior of the driver. These options 
  will allow you to remove a previous copy of the driver from memory, or 
  to install the driver at a different interrupt.
   
  To remove a previous copy of the driver, use the '-r' option.
  EXAMPLE:
	  'CK_911 -r     will remove the last installation of the driver

  This driver will install itself on interrupt 60h by default. To install
  it at another interrupt, use the '-fnn' option. Where 'nn' is
  replaced by a number between 60 and 67.
     
  EXAMPLES:
   'CK_911'              will install the driver at interrupt 60h
   'CK_911 -f62'         will install the driver at interrupt 62h

EndDataCAD:

/*------------------- MicroStation Real Mode Help ------------------------*/
HelpMicroCADr:

  MicroStation Real Mode Display Driver
   
  The drivers are:
   
	     MGLS3.EXE
	     MGLS3.MGL
	     REMOVE.EXE
   
  Using the Display Driver:
     
  1. Run "USCONFIG", and select the "Fahrenheit Card" driver.   
  
  2. Exit and save.

  The driver is a TSR (Terminate and Stay Resident) that must
  be invoked before MicroStation PC will run. The driver will accept
  certain command line options that will change the behavior of the
  driver.
    
  If your Fahrenheit has 1 megabyte of VRAM, this driver will
  support either 2 pages ("swap screen" capability) or 256 colors. To 
  select the 256 color option, use the '/noswap' option when installing 
  the driver in memory. This may be done by modifying the 'USTATION.BAT'
  or 'MCE.BAT' files with a DOS Text editor.

  EXAMPLE:

  "MGLS3"          Will install the driver in 16 color mode. If enough
		   VRAM is installed, swap screen will be enabled.
    
  "MGLS3 /noswap"  Will install the driver, telling it to display
		   the maximum number of colors possible.

  
  To remove a previous copy of the driver, use the 'remove.exe'
  program.

  You may modify the resolution by editing your AUTOEXEC.BAT file and
  changing the following command.  Note: This SET command is 
  automatically added to your AUTOEXEC.BAT file. 
  
  "SET S31_911=<mode>"
   
   Where <mode> is:
	    0    640 x 480, 256 colors
	    1    800 x 600, 16 colors
	    2    800 x 600, 256 colors
	    3    1024 x 768, 16 colors
	    4    1024 x 768, 256 colors
	    5    1280 x 960, 16 colors
	    6    --> reserved <--
	    7    1280 x 1024, 16 colors
	    8    --> reserved <--
     
  For example, to set the 800x600x256 mode type:
   
  SET S31_911=2
   
  MicroStation will now come up in 800x600x256 colors.
  
  To activate changes, please reboot your system.

EndMicroCADr:

/*---------------- MicroStation Protected Mode Help ---------------------*/
HelpMicroCADp:

  MicroStation Protected Mode Display Driver 
  
  This driver will work with a Hercules-compatible MDA card as the
  second graphics device.  
  
  This can be configured as either the "Primary" (right screen) or
  "Secondary" (left side) graphics device.
   
  SWAP screen capabilities are supported if a 256 color mode is
  configured.
 
  The MicroStation (protected mode) drivers are
 
    "MGL911.EXP"
    "MGL911.MA"
    "MGL911.MGL"
 
  CONFIGURATION:
 
  The first time this driver is used, it will require the user to select which 
  video mode to use, and will present a menu of available resolution modes 
  from which to choose.  Once selected, a configuration file will be created 
  that the driver will access for subsequent MicroStation sessions.
 
  To permanently reconfigure the driver, DELETE the file
  "\USTATION\DRIVERS\MGL911.CFG" and run MicroStation again.
  
  To change the resolution mode used, you may set the
  environment variable "MGL911" to one of the following numbers:
	     Resolution/Colors
     0        640 x 480 x 256
     1        800 x 600 x 16
     2        800 x 600 x 256
     3       1024 x 768 x 16
     4       1024 x 768 x 256
     5       1280 x 960 x 16
     6       Reserved
     7       1280 x 1024 x 16
     8       Reserved
 
  For example,to set 1024x768x256 type the follow statement at a DOS prompt:
 
	   SET MGL911=4      <ENTER>
 
  MicroStation will now come up in 1024x768x256 colors.
 
  If the driver finds a legal value in the environment, it will use it
  to override any variable found in the configuration file.
 
  To activate the changes, please reboot the system.

    If the initialization code is unable to determine which mode to use, it
  will always default to the 640 x 480 x 256 color mode.
    

EndMicroCADp:

/*------------------------- VersaCAD Help Menu --------------------------*/
HelpVersaCAD:

VersaCAD Display Driver
    
There are two sets of VersaCAD drivers:
 
   Real mode (5.4, 6.0, 7.0)
       VC2_911.COM
       VCADREAL.CFG
 
   Protected Mode (6.0, 7.0) 
       VC3_911.COM
       VCAD386.CFG
       VCAD386.BAT
 
   and REMOVE.EXE for all versions.
 
LOADING THE DRIVER
    
Run the VersaCAD ENVIRO program, selecting the "Fahrenheit" screen driver.
You will be able to choose between "Single Screen" and "Dual Screen"
configuration,as well as various resolutions.

The VersaCAD driver file is a TSR (Terminate and Stay Resident) program that
must be invoked each time your machine is powered up. For this reason, it is
recommended that you include the VersaCAD.COM file name in your AUTOEXEC.BAT.

EMS MEMORY USAGE
   
As a default, this driver will reserve 512K of EMS memory when invoked. This
will be used to store the display lists needed for fast redraws. While this
should be enough memory to handle most drawings, additional EMS space may be
reserved once the driver has been loaded. This is done by setting the
environment variable 'VCAD_EMS=' to the number of EMS pages you wish to have
reserved. Each EMS page = 16K in size.
   
 EXAMPLE:
      'SET VCAD_EMS=64'     will cause the driver to reserve 1024K (64 pages
			    * 16K) of memory when the driver is loaded.
   
      'SET VCAD_EMS=0'      will tell the driver not to reserve any EMS. In
			    this case, display list processing will be disabled.
  
EndVersaCAD:


/*---------------------- Generic CADD Driver Help ------------------------*/
HelpGenCADD:

  Generic CADD Display Driver
  
  The driver for Generic CADD is:
 
	  F1280L.VGD
 
  Using the Generic CADD Driver:
 
  Run the Generic CADD's CONFIG program to activate the driver.

  When using Generic CADD 3.0 to 5.0:
  -----------------------------------
  
  Select "Other VGD Driver" and select the F1280L.VGD from the list.

  You may modify the resolution by editing your AUTOEXEC.BAT file and
  changing the following command. The SET command is automatically added
  to your AUTOEXEC.BAT file.
  
   "SET S31_911=<mode>"
   
   Where <mode> is:
	    0    640 x 480, 256 colors
	    1    800 x 600, 16 colors
	    2    800 x 600, 256 colors
	    3    1024 x 768, 16 colors
	    4    1024 x 768, 256 colors
	    5    1280 x 960, 16 colors
	    6    --> reserved <--
	    7    1280 x 1024, 16 colors
	    8    --> reserved <--
   
  For example, to set 800x600x256 type:
   
  SET S31_911=2
   
  Generic CADD will now come up in 800x600x256 colors.

  To activate changes, please reboot your system.


  When using Generic CADD 6.0:
  ----------------------------

  1. Select "Orchid Fahrenheit VGA Accelerator" from the menu.

  2. The menu wil prompt you with a list of resolutions and will add a
     "SET=CADD_INIT=<Mode>" to your AUTOEXEC.BAT file.  This SET command 
     can be modified manually by editing you AUTOEXEC.BAT file or by 
     running the Generic CADD "CONFIG" file again.

  To activate changes, please reboot your system.
 
EndGenCADD:

/*------------------------ CADVance Driver Help --------------------------*/
HelpCADVance:

  CADVance Display Driver
  
  The driver for CADVance is:

	 CDV911.DRV
 
  Using the CADVance Drivers:
     
  The driver is loaded into memory by CADVance, and therefore requires
  no intervention on the part of the user.
    
  This driver will work as a rendering device, if sufficient memory
  is available. The resolution will be the same as the resolution
  used in the 2D and 3D modes. Please note that rendering will only
  work if the driver is currently using a 256 color mode.
    
  You may modify the resolution by editing your AUTOEXEC.BAT file and
  changing the following command. The SET command is automatically added
  to your AUTOEXEC.BAT file.
   
    "SET S31_911=<mode>"
   
    Where <mode> is:
	    0    640 x 480,  256 colors
	    1    800 x 600,   16 colors
	    2    800 x 600,  256 colors
	    3    1024 x 768,  16 colors
	    4    1024 x 768, 256 colors
	    5    1280 x 960,  16 colors
	    6    --> reserved <--
	    7    1280 x 1024, 16 colors
	    8    --> reserved <--
    
  For example, to set 800x600x256 type:
   
  SET S31_911=2
   
  CADVance will now come up in 800x600x256 colors.
  
  To activate changes, please reboot your system.

EndCADVance:
  
/*------------------ Desktop Publishing Menu Help -------------------------*/
HelpDeskMain:

  The Orchid Fahrenheit Video Adapter provides display drivers for
  the following Desktop Publishers:

	Ventura Publisher version 3.0

	Resolution/Colors
	 640 x 480 x 256
	 800 x 600 x  16
	1024 x 768 x  16
	1024 x 768 x 256

	Gem Desktop version 3.0+

	Resolution/Color
	 640 x 480 x 256
	 800 x 600 x  16
	1024 x 768 x  16
	1024 x 768 x 256

EndDeskMain:

/*------------------------ Ventura Driver Help ----------------------------*/  
HelpVentura:

  Ventura Publisher Display Drivers for version 3.0.

  The drivers are:
   
		SDGEMVP.VGA
	   and  SYSFONT.BG

  Using the Ventura Publisher Driver:
   
  To use the Ventura drivers, the startup batch file for
  Ventura, VP.BAT or VPPROF.BAT, must be modified.
  This batch file is usually located in the root directory.
  Modify the entry for the screen driver as follows:
   
  The line that reads
   
     DRVRMRGR %1 /S=SDFVGAH5.VGA/M=01
   
  must be modified to read
   
     DRVRMRGR filename %1 /S=SDGEMVP.VGA/M=01
   
  Note: replace 'filename' with 'VP' or 'VPPROF' depending on the
  name of your 'BATCH' file.  The "M=" is in reference to the 
  mouse in your system.   Do not change that option (M=1, M=2, 
  M=32, etc.).
    
  You may modify the resolution by editing your AUTOEXEC.BAT file and
  changing the following command.  Note: This SET command is 
  automatically added to your AUTOEXEC.BAT file. 
   
      "SET S31_911=<MODE>"
   
      Where <MODE> is:
   
		  0   640x480,  256 colors  
		  1   800x600,  16  colors  
		  2   800x600,  256 colors  
		  3  1024x768,  16  colors  
		  4  1024x768,  256 colors  
   
  For example, to set 800x600x256 type:
   
  SET S31_911=2  
   
  Ventura will now come up in 800x600x256 colors.
   
  To activate the changes, please reboot the system.

EndVentura:

/*--------------------- Gem Desktop Driver Help --------------------------*/
HelpGem:

  GEM Desktop Display Drivers for version 3.X.

  The drivers for GEM Desktop are:
   
	      SDGEMVP.VGA
	and   SYSFONT.BG
   
  This program will rename all the files with the name
   
	     SD*.VGA
	to   SD*.BAK
   
  where * is the DOS wild card character.
   
  Using the GEM Desktop Drivers:
   
  You may modify the resolution by editing your AUTOEXEC.BAT file and
  changing the following command.  The SET command is automatically added
  to your AUTOEXEC.BAT file.

      "SET S31_911=<MODE>"
   
      Where <MODE> is:
   
		  0   640x480,  256 colors  
		  1   800x600,  16  colors  
		  2   800x600,  256 colors  
		  3  1024x768,  16  colors  
		  4  1024x768,  256 colors  
   
  For example, to set 800x600x256 type:
   
  SET S31_911=2 
   
  GEM will now come up in 800x600x256 colors.
  
  To ensure that the mouse device is configured correctly,
  run the GEM installation program to reset the mouse type.

  To activate the changes, please reboot the system.

EndGem:

/*---------------------- Word Processing Menu Help -----------------------*/
HelpWordPMain:
 The Orchid Fahrenheit Video Adapter provides display drivers for the
 following word processors:

      WordPerfect version 5.1              WordStar versions 5.5, 6.0, 7.0

     Graphics Mode    Text Modes           Graphics Mode
     -------------    -----------          --------------
       1024x768         132x43              800  x 600
       800x600          132x25              1024 x 768
       640x480                              1280 x 960
					      1280 x 1024


     Microsoft Word version 5.0

      Graphics Modes          Text Modes
     -----------------        ----------
     37 Lines   48 Lines       132 x 25
     38 Lines   54 Lines       132 x 43
     42 Lines   75 Lines
		  96 Lines

EndWordPMain:

/*------------------------- Word Perfect Help ----------------------------*/
HelpWP:

  WordPerfect Display Drivers

  The Fahrenheit drivers for WordPerfect 5.1 are
   
	WPGRAPH.VRS
	WPTEXT.VRS
   
  Driver Installation:   
  --------------------

  1. From the Document screen displayed after entering Word Perfect,
     Press the SHIFT-F1 key to get to the setup menu.

  2. Select the "Display" menu or option 2.

  3. You may select Graphic Mode or Text mode drivers, option 2 or 3
     respectively.

  4. From within the Graphic Screen Type, choose "Fahrenheit Graphics
     Drivers".  From within the Text Screen Type, choose "Fahrenheit 
     Text Drivers".  The following resolutions are available for the 
     graphics and text modes:
    
     Graphics Mode                      Text Modes
     -------------                      -----------
       1024x768                           132x43
       800x600                            132x25
       640x480

  5. Upon completing your driver selection you may exit from the menu
     screens and begin using Word Perfect.

EndWP:

/*---------------------- Microsoft Word Help -----------------------------*/
HelpMSWord:

  Microsoft Word Display Drivers

  The Fahrenheit VA driver for Microsoft Word v5.0 is
   
	SCREEN.VID
   
  1. Run WORD.

  2. Several modes are available for use, and the user may select from a 
     list by pressing the <ESC> key, the "O" key, then moving to the 
     DISPLAY TYPE enter with the arrow keys.  Finally, the F1 key brings 
     up a list. The graphics modes are: 37, 38, 42, 48, 54, 75, and 96 
     lines.  The text modes are: 132x25 and 132x43.

EndMSWord:

/*------------------------ Word Star Help -------------------------------*/
HelpWS:

  WordStar Display Driver
 
  The following versions of WordStar are compatible with the Advanced
  Page Preview:
 
  WordStar 5.5
  WordStar 6.0
  WordStar 7.0
  WordStar 2000 (v3.5 or greater)

  The required WordStar files are:
 
	   PREVIEW.MSG
	   PREVIEW.OVR
 
  The WordStar drivers are:
 
	   Drivers     = Resolution
	   ------------------------
	   F12806.WGD  = 800x600
	   F12807.WGD  = 1024x768
	   F12809.WGD  = 1280x960
	   F12801K.WGD = 1280x1024
 
  The ".WGD" files are high resolution drivers that allow
  the user to select resolutions in WordStar's Advanced Page Preview.
 
  To invoke any of the high resolution drivers for WordStar,
  you must specify the driver's name within the FONTID.CTL so
  that it can be found by the program.
 
  Using a DOS editor, edit the FONTID.CTL file and change the 
  "CRT_TYPE=" line to read "CRT_TYPE=F1280x.WGD".
  For example, type:
 
	CRT_TYPE=F1280x.WGD
 
  Note: Replace the "x" with a number from the above driver
  chart.

EndWS:

/*-------------- Help for the Player diskette build ----------------*/

HelpCopy:

   This option will create a diskette with a Playback only version of 
   VOICE NOTES, a Windows sound driver that doesn't require a sound card, 
   and an installer for both of these.  You may provide this diskette to 
   your friends and associates, so that they can play Voice Notes embeded 
   in documents you send them.  The sound driver will be installed only 
   if there is no hardware already installed that can play PCM format 
   sound.

   The diskette has an installer program called INSTALL.EXE.  Insert the 
   diskette in a floppy drive and type "INSTALL".  The program will copy 
   the drivers and applications into your Windows subdirectory.

   The Windows SYSTEM.INI file will be updated and the WAVE= statement 
   will be modified.  If the system already has a sound card installed, 
   answer YES when the question is asked.  Just enter Windows and use
   the "RUN" command under the FILE option to activate the application.

	1. Select "RUN"
	2. Type "\WINDOWS\SYSTEM\OVNPLAY.EXE" and hit the <ENTER> Key.

   If you have any questions, please contact our Technical Support at 
   (510) 683-0323.

EndCopy:

/*-----------------------Other Orchid Products ------------------------*/


HelpOtherp:
Orchid Products

Orchid Technology is a leading manufacturer of hardware and peripherals 
for personal computers. Since its incorporation in 1982, Orchid has been at 
the forefront of the personal computer industry with the introduction of 
exciting and new products. The following is a list of the products we 
currently manufacture:


Fahrenheit 1280

The Fahrenheit 1280 is the next generation Super VGA graphics adapter. Its 
Graphics Accelerator technology provides for faster Windows and CAD video 
performance. The Fahrenheit 1280 offers video resolutions to 1280 x 1024 
at 72Hz vertical refresh rate and up to 16.8 million colors.

Fahrenheit VA

The Fahrenheit VA is more than just a Windows Accelerator--it features the
fastest graphics possible, with a twist!  With Orchid's own Voice Notes
software, the Fahrenheit VA enables you to add custom voice annotation to
all Windows applications supporting Object Linking & Embedding (OLE).  A
single keystroke opens the Voice Notes window, allowing you to easily
record, play, pause, and automatically embed your recording within the 
document.  The Fahrenheit VA offers video resolutions to 1280 x 1024 
at 72Hz vertical refresh rate and up to 16.8 million colors.
  
ProDesigner IIs

The ProDesigner IIs, an industry standard, delivers outstanding cost vs. 
performance at resolutions to 1024 x 768 and colors to 32,768 with refresh 
rates at the ergonomically pleasing 72Hz. 

ProDesigner IIs/EISA

The ProDesigner IIs/EISA is a 1MB Super VGA graphics adapter for high 
performance EISA personal computers.  The ProDesigner IIs/EISA provides 
ease of installation and all the SVGA high resolutions and colors you've 
come to expect from Orchid. 

ProDesigner IIs/MC

The ProDesigner IIs/MC is a high performance SVGA adapter based upon the 
same proven design as the Pro IIs.  It offers owners of IBM PS/2 Micro 
Channel personal computers and 100% compatibles, the performance and 
high color support that owners of the Orchid ISA and EISA video adapters 
have come to appreciate. 

RamQuest 8/16

The RamQuest 8/16 is an ISA memory card that is expandable to 32MB.  The 
RamQuest 8/16 installs in less than 3 minutes on your IBM PC, XT, AT and 
compatibles.  Extended and expanded memory are supported for maximum 
compatibility.

RamQuest 16/32

The RamQuest 16/32 is a Micro Channel memory card that is expandable to 
8MB.  The IBM PS/2 Model 50, 55sx, 60, 70, 80 and 100% compatibles are 
supported.  The RamQuest 16/32 installs in less than 10 minutes and 
provides up to a 50% increase in performance.  Delivers true 32-bit 
memory with correct memory configuration.

Superboard 486 VLB

The Superboard 486 VLB (VESA Local Bus) is an ISA motherboard equipped 
with two VLB slots for a high-performance video card and/or fast IDE 
controller.  The local bus design provides direct 32-bit data transfer 
between the video card/IDE controller and the CPU at CPU speeds.  Pair 
the Superboard 486 VLB with an Orchid Fahrenheit VA/VLB graphics card, 
and you will experience the fastest graphics and motherboard combination 
possible.

Sound Producer Pro

The Sound Producer Pro delivers an unparalleled features set while
maintaining 100% SoundBlaster Pro compatibility.  With 20-voice FM
synthesizer and digital sounds, it delivers support for 4 sound
standards, and the ability to add Voice Notes to any Windows document
that supports Object Linking & Embedding (OLE).  The Sound Producer Pro
delivers the highest quality sound to your favorite games or business
presentations, with sampling rates up to 44.1 KHz.  It comes complete with
joystick port, MIDI In/Out support, and stereo microphone input.

EndOtherp:

