CONTENTS

Introduction

Getting Started


Introduction

Welcome to WinGDI.  This application is a small Window that displays the usage of the GDI Heap.  It shows the current values for the number of bitmaps, brushes, DCs, fonts, metaDCs, metafiles, palettes, pens, and regions in memory.  Also displayed are the Microsoft reserved, disabled DC and max.  It also allows you to mark the current settings and monitor the changes.  You can adjust the time interval between updates.


Getting Started

To get started you need to copy windgi.exe and wingdi.hlp to your Windows directory.  WinGDI will create wingdi.ini in your Windows directory.  To change the update time interval choose the menu item Display|Speed and choose the value you wish.  To mark the current values choose Display|Mark.