C-Worthy (R) Help Librarian Data File Version 1.0
COPYRIGHT (C) 1985 - 1989.  All Rights Reserved.
Custom Design Systems, Inc.  Orem, Utah  USA.
#·<≥;⌠WCy
t±π∩#k1;3▒5%9ê:█;πJÜNAPÖXog#r▄r═wsyù~#âêîû¢φ£	ƒpáñ¥Ñºα¿▒⌐[½U»o░╘╕i╝╤╜_┐Γ└╧╫<┘üπΦKΘ█Ωûδ∞¿φ░°¬R	>
<1                 Select Server To Configure

From this list you can select to configure one of the communication servers currently running on the network. 

<Enter>   Press this key if you want to attach to the                 highlighted server.  

<Esc>     Press this key if you want to exit this list.AECε                         Available Topics

Change Current Server

    Select this option if you want to change the server you are        configuring with CSCON.

Configure Communication Services

    Select this option if you want to configure communication          service profiles.
    
Configure Network Management

    Select this option if you want to configure Network Management     features for communication services.

                                                      Page 1 of 2;EC¢
Configure Server Description

    Select this option if you want to display or modify details        about the server or communication services.  For the               server, you can modify the server's serial number and model        number.  For communication services, you can set the               the supported protocol stacks.

    Select this option if you want to display information
    about the server, such as the date when the server was             installed. You can also enter information about the
    server installation location, the server itself,
    and the host connection.



                                                      Page 2 of 2

CAK                       Logout From Server
            
No       Select this option if you want to remain logged on to            the current server.

Yes      Select this option if you want to log out from the               current server. 

<Esc>    Press this key if you want to remain logged on to the            current server.?
DB╨                   Select Service Profile - SAA

From this list you can configure, create, or rename an SAA service profile.  You can also delete one or more service profiles from the list.

<Enter>   Press this key if you want to configure, display,
          or print the highlighted SAA service profile.
     
<Insert>  Press this key if you want to create a new SAA 
          service profile.


                                                     Page 1 of 2WDB∞
<Delete>  Press this key if you want to delete the highlighted              SAA service profile(s).  

<Esc>     Press this key if you want to exit this list.

<F3>      Press this key if you want to rename the highlighted              SAA service profile.

<F5>      Press this key if you want to select (highlight) more             than one SAA service profile to delete by pressing                <Delete> later.          

                                                     Page 2 or 2D
B                 Configure Communication Services

From this list you can select a type of communication service to configure.  

<Enter>   Press this key if you want to configure the                       highlighted services.  

<Esc>     Press this key if you want to exit this list.FDw                     SNA Token Ring Configuration

Token Ring Destination Node Address 

    Enter the Destination Node (Controller) address as specified        on the Host System Configuration Worksheet. 

Token Ring Destination Service Access Point

    Enter the two-digit hexadecimal Destination Service Access          Point as specified on the Host System Configuration Worksheet.

Token Ring Source Service Access Point

    Enter the two-digit hexadecimal Source Service Access Point         (SAP) as specified on the Host System Configuration Worksheet.
 
                                                       Page 1 of 4fy
FDF
Token Ring Adapter Type

    Press <Enter> on this field to get a list of adapter types:         Primary and Alternate.  Select the type of adapter you are          using for the host connection by pressing <Enter> again.   

Block ID

    Enter the three-digit hexadecimal block ID as specified on
    the Host System Configuration Worksheet.

PUID for Token Ring Connection 

    Enter the five-digit hexadecimal Physical Unit ID (PUID)            number as specified on the Host System Configuration Worksheet. 
                                                       Page 2 of 4éFD
Maximum Frame Size to Transmit Inbound 

    Press <Enter> on this field to get a list of frame sizes:
    265, 521, 1033, 2042, and 4105.  Select your option by 
    pressing <Enter> again.  This is the number of bytes to be          included in frames being sent to the host.  

Allocate Active LUs Only

    Enter Yes if sessions for this service profile are to be 
    allocated for use only if they have been activated by
    the host.



   
                                                       Page 3 of 4 fFD┌
Logical Adapter Name

    Enter the Logical Adapter name.  The name can include any           alphabet, numeric, and special characters. 












                                                       Page 4 of 4 
CAe                    Delete Service Profile

No       Select this option if you want to keep the
         highlighted service profile(s).  

Yes      Select this option if you want to remove the                     highlighted service profile(s). 

<Esc>    Press this key if you want to keep the highlighted               service profile(s).            
   	
B@┌                            Exit CSCON
 
No       Select this option if you want to remain on CSCON.   

Yes      Select this option if you want to exit CSCON. 

<Esc>    Press this key if you want to remain on CSCON. MK
                      Configure SAA Service Profile   

Configure Host Connection

    Select this option if you want to specify SNA network information and      parameters for the Token Ring, Ethernet, SDLC, QLLC, or custom             defined connection.

Configure Sessions

    Select this option if you want to configure SAA sessions (LUs).

Display Profile Configuration

    Select this option if you want to view the profile configuration.

                                                              Page 1 of 2πMK╥              
Print Profile Configuration

     Select this option if you want to copy the profile configuration
     to a file.

Service Profile Description

     Select this option if you want to display information about the
     service profile, such as profile creation date.  You may also
     enter information about the installation location and the service 
     profile itself.




                                                              Page 2 of 2âEC|                    Host Connection Configuration

SNA Network ID

    Enter the name for the entire SNA network.  You can obtain         this information from the host system administrator. 

Peripheral Node Control Point Name

    Enter the name of the peripheral node control point (PNCP).        You can obtain this information from the host system               administrator.  In SNA terms, the server is a peripheral node.     A peripheral node contains a software entity called a Control      Point that controls the resources of the SNA peripheral node.     


                                                      Page 1 of 3 !∩ECs
Number Dependent Sessions Supported 

    Enter the number of dependent LUs for this host connection. 
    You can obtain this information from the host system               administrator. 

Number Independent Sessions Supported 

    Enter the maximum number of independent LU 6.2 sessions
    that are to be supported by this profile.  This parameter
    limits the combined total of all independent sessions.
    The total consists of sessions whose targets can include
    a host, AS/400s, or other 2.1 nodes, and sessions between          workstations.


                                                      Page 2 of 3
âEC∙
Offline Test Mode Desired 

    Enter Yes if you want to set the offline test mode. The            offline test checks the LAN connection by simulating 
    activity between the server and workstations.  

Host Attachment

    Press <Enter> on this field to get the list of host 
    connection options: Token Ring, Ethernet, SDLC, QLLC, and
    custom defined adapter.  Select your option by pressing            <Enter> again.       




                                                      Page 3 of 3&ECΦ                      SNA SDLC Configuration

SDLC Control Unit Address

    Enter the two-digit hexadecimal address as specified on the        Host System Configuration Worksheet.  This address is              sometimes known as the PU address. C1 is the standard              address for 3x74 configurations.  (This number corresponds
    to the ADDR= field in the NCP customization of the host.)
     
SDLC Adapter Type

    Press <Enter> on this field to get a list of SDLC Adapter          types: Primary and Alternate.  Press <Enter> again to select       the setting that corresponds to the adapter type setting you       chose when installing the adapter and driver.
   
                                                      Page 1 of 6─(#ECì
SDLC Encoding Option for Interface Board

    Press <Enter> on this field to get a list of options:
    NRZ and NRZI.  Select the SDLC encoding option as 
    specified on the Host System Configuration Worksheet
    by pressing <Enter> again.

Connection Type

    Press <Enter> on this field to get a list of connection            types: Non-Switched and Switched.  Select the appropriate
    line type by pressing <Enter> again.  A switched line is           usually a standard telephone line going through a phone            switch.  A non-switched line is a dedicated leased line.


                                                      Page 2 of 6─*&ECΦ
Hold Request to Send (RTS) Continuously

    Enter Yes if you want the SDLC driver to hold the RTS 
    signal high all the time to provide faster communication           between the server and the remote host.  (SDLC uses the
    RTS signal to determine who is allowed to send data next.)

Block ID

    Enter the three-digit hexadecimal SDLC block ID as 
    specified on the Host System Configuration Worksheet.  





                                                      Page 3 of 6-─(EC>
PUID for SDLC Connection 

    Enter the five-digit hexadecimal Physical Unit ID (PUID) 
    number as specified on the Host System Configuration               Worksheet.  This number is required for switched lines.

Maximum Frame Size to Transmit Inbound (for Node Type PU 2.0)

    Press <Enter> on this field to get a list of frame sizes:
    265, 521, and 1033.  Select your option by pressing <Enter>        again.  This is the number of bytes to be included in
    frames being sent to the host.  




                                                      Page 4 of 6╠/─*ECÜ
PU 2.1 Link Station Role (for Node Type PU 2.1)

    Press <Enter> on this field to get a list of options:
    Negotiable and Secondary.  Select your option by pressing          <Enter> again.  This field specifies the SDLC link station         role relative to the host link.

Activate Host on Active WS Only (for Node Type PU 2.0)

    Enter Yes if the host is to be activated only when a
    workstation is requesting a connection.
    
    Note that this option and the Alllocate Active LUs Only are
    mutually exclusive.  Selecting Yes for either automatically        forces the other to No.

                                                      Page 5 of 6-ECç
Allocate Active LUs Only (for Node Type PU 2.0)

    Enter Yes if sessions for this service profile are to be
    allocated for use only if they have been activated by
    the host.

Logical Adapter Name

    Enter the Logical Adapter name.  The name can include any          alphabet, numeric, and special characters.






                                                      Page 6 of 6CA╕                      Create Service Profile

No       Select this option if you want to exit the New Service           Profile screen without creating a new service profile. 

Yes      Select this option if you want to create the new                 service profile as specified and exit the New                    Service Profile screen.

<Esc>    Press this key if you want to remain on the New                  Service Profile screen.  DB^                    Select Authorized Users

From this list you can select one or more user or group that must have access to the service profile you are configuring.

<Enter>   Press this key if you want to give the highlighted                user(s) or group(s) access to the current service                 profile.

<Esc>     Press this key if you do not want to select any user              or group before exiting this list.

<F5>      Press this key if you want to select (highlight) more             than one user or group from the list.  Press <Enter>
          after the selection.
             
⌐7C
Aα                         LU Pool Names

From this list you can configure, create, or rename an LU pool. You can also delete one or more LU pools from the list. 

<Enter>   Press this key if you want to configure the                      highlighted LU pool.
     
<Insert>  Press this key if you want to create a new LU pool.

<Delete>  Press this key if you want to delete the highlighted             LU pool(s).   
                                                    Page 1 of 2▒5C
Ad
<Esc>     Press this key if you want to exit this list.

<F3>      Press this key if you want to rename the highlighted             LU pool.

<F5>      Press this key if you want to select (highlight) more            than one LU pools to delete by pressing <Delete>                 later.



                                                    Page 2 of 2D	BK                         New LU Pool Name
     
  Enter a name if you want to create a new LU pool.  The name 
  can be from 1 to 8 characters long and can contain only           characters from A-Z and 0-9.  The first character of the
  name must be a character from A-Z.

  Press <Esc> if you do not want to create a new LU pool.
CA;                        Delete LU Pool

No       Select this option if you want to keep the
         highlighted LU pool(s).  

Yes      Select this option if you want to remove the                     highlighted LU pool(s). 

<Esc>    Press this key if you want to keep the highlighted               LU pool(s).

┤>MK┴                          LU Pool Configuration

Pool Name
 
    This field displays the name of LU pool you are configuring.

LU Address

    Press <Enter> if you want to display the Start/End (ranges of
    session) list.  On this list you can modify, add, or delete the
    range (or ranges) of the sessions in this LU pool. 
      
Start/End    
 
    <Enter>   Press this key if you want to modify the highlighted range.
    <Insert>  Press this key if you want to add a new range. 
    <Delete>  Press this key if you want to delete the highlighted 
              range(s).                                                        <Esc>     Press this key if you want to exit this list.   Page 1 of 5 B█;MKBStart/End (continued)     

    <F5>      Press this key if you want to select (highlight) 
              more than one range to delete by <Delete> later.    
         
VTAM LU Name

    Press <Enter> if you want to display the LU Address/VTAM LU Name list.     On this list you can modify any VTAM LU name in this LU pool.  For LU      6.2, the VTAM LU name is required in order to establish a session          with another LU.  For LU 1, 2, or 3, the name is for informational         purposes only.  The name can contain only characters from A-Z and 0-9.     The first character of the name must be a character from A-Z.        

LU Address/VTAM LU Name    
 
    <Enter>   Press this key if you want to modify the highlighted VTAM                  LU name.
    <Esc>     Press this key if you want to exit this list.   Page 2 of 5E┤>MK≤
Authorized Users
   
    You can add users to this list so that they have access to the LU.         You can also delete one or more users from the list. 

    If this entire field is highlighted, press <Enter> before you can 
    work on the following options: 

    <Insert>  Press this key if you want to add user(s) to the list.           <Delete>  Press this key if you want to delete user(s)                               from the list.
    <Esc>     Press this key to highlight the entire field, 
              if you want to exit the field.
    <F5>      Press this key if you want to select (highlight)
              more than one user to delete by <Delete> later.     

 
                                                              Page 3 of 5[HBMK*
Session Attributes
                
    Select Traceable if you want the LU session to be traceable.
    Select Locked if you want to lock the session to ensure that
    no one will use it if the LU has a problem.

    If this entire field is highlighted, press <Enter> first to                make the list selectable.  Press <Enter> to select an option (a            checkmark appears) or to remove the option selected earlier (the           checkmark disppears).  Press <Esc> to exit the selection list.

Logical Unit Type 
   
    Press <Enter> on this field to get a list of LU types: Printer (LU         Type 1 or 3), Display (LU Type 2), and APPC (LU Type 6.2).  Select         a type from the list by pressing <Enter> again.
  
                                                              Page 4 of 5EMKp
Model Number    
    
    Press <Enter> on this field to get a list of display models:
    Model 2 (24x80), Model 3 (32x80), Model 4 (43x80), and Model 5             (27x132).  Select a display model from the list by pressing
    <Enter> again.

Preserve Host Session after An Abort 

    Enter Yes if you want a host session preserved for a user when an          emulation session ends unexpectedly.  When this option is set to
    Yes, any user who obtains the LU corresponding to the preserved
    host session will see the preserved screen.


 

                                                              Page 5 of 5╗LGE└                     Configure SAA Service Profile   

Configure Host Connection

    Select this option if you want to specify SNA network                information and parameters for the Token Ring, Ethernet, SDLC,       QLLC, or custom defined connection.

Display Profile Configuration

    Select this option if you want to look at the profile                configuration.

                                                        Page 1 of 2πJGE╟
Print Profile Configuration

    Select this option if you want to copy the profile       
    configuration to a file.

Service Profile Description

    Select this option if you want to display information about the      service profile, such as profile creation date.  You can             also enter information about the installation location and the       service profile itself.

                                                        Page 2 of 2 B@Å                            LU Range

Starting LU Address

    Enter the starting LU address you want to include in the
    LU pool you are configuring.  This address cannot be 
    greater than the Ending LU Address.
    
Ending LU Address

    Enter the ending LU address you want to include in the
    LU pool you are configuring.  This address cannot be 
    less than the Starting LU Address.

&SA?═                       New Service Profile 

New Profile Name

    Enter the name.  The name can be from 1 to 8 characters        long and can contain only printable characters.  The name      cannot include spaces or the following special characters:     slash (/), backslash (\), colon (:), semicolon (;), comma      (,), asterisk (*), question mark (?), double quotes ("),       less than (<), greater than (>), brackets ([ or ]),
    period (.), equal (=), and plus (+).  The first character      of the name cannot be a period (.).
    
                                                                                                                 
                                                  Page 1 of 3VAPA?╔
Node Type

    Press <Enter> on this field to get a list of support           types: PU 2.0 and PU 2.1.  Select a type by pressing           <Enter> again.  A PU 2.0 node (dependent LU) can set
    up a session only with the help of a Host System Services      Control Point (SSCP) and does not support multiple             simultaneous sessions with the same remote node.  An 
    example of a PU 2.0 node is an SNA cluster controller. 
    A PU 2.1 node (independent LU) can establish sessions
    with other PU 2.1 nodes without the mediation of an SSCP,      and can support multiple simultaneous sessions as well as      parallel sessions.     

                                                  Page 2 of 3&SA?z        
Copy from Existing Profile

    Enter No if you want to create a new service profile with      the default information.  Enter Yes if you want to create      a new service profile based on an existing one, that has       the same node type.  If the field is set to Yes, CSCON         dispalys a list of existing profiles for you to select
    to copy.  

Copy from Profile
 
    This field appears if you set Copy from Existing Profile       option to Yes.  The field displays the profile name, from      which you want to copy to the new profile.                                                                   Page 3 of 3╕[EC                    Range of Public LUs Configuration

LU Address

    Press <Enter> if you want to display the Start/End (ranges of      session) list.  On this list you can modify, add, or delete        the range (or ranges) of the public LU sessions. 
      
Start/End    
 
    <Enter>   Press this key if you want to modify the 
              highlighted range.
    <Insert>  Press this key if you want to add a new range. 
    <Delete>  Press this key if you want to delete the highlighted
              range(s). 
    <Esc>     Press this key if you want to exit this list.
    <F5>      Press this key if you want to select (highlight) 
              more than one range to delete by <Delete> later. 
                                                      Page 1 of 5 ╙^ÖXEC      
VTAM LU Name

    Press <Enter> if you want to display the LU Address/VTAM           LU Name list.  On this list you can modify any VTAM LU             name in the specified LU address range.

    For LU 6.2, the VTAM LU name is required in order to 
    establish a session with another LU.  For LU 1, 2, or 3, 
    the name is for informational purposes only.  The name             can contain only characters from A-Z and 0-9.  The first           character of the name must be a character from A-Z.   
      
LU Address/VTAM LU Name    
 
    <Enter>   Press this key if you want to modify the 
              highlighted VTAM LU name.
    <Esc>     Press this key if you want to exit this list.
                                                      Page 2 of 5╪a╕[ECφ
Authorized Users
   
    You can add users to this list so that they have access to         the LU.  You can also delete one or more users from the list. 

    If this entire field is highlighted, press <Enter> before you      can work on the following options: 

    <Insert>  Press this key if you want to add user(s) to the                   list.
    <Delete>  Press this key if you want to delete user(s)                       from the list.
    <Esc>     Press this key to highlight the entire field 
              if you want to exit the field.
    <F5>      Press this key if you want to select (highlight)
              more than one user to delete by <Delete> later.     

                                                      Page 3 of 5°d╙^EC
Session Attributes
                
    Select Traceable if you want the LU session to be traceable.
    Select Locked if you want to lock the session to ensure that
    no one will use it if the LU has a problem.

    If this entire field is highlighted, press <Enter> first to        make the list selectable.  Press <Enter> to select an option       (a checkmark appears) or to remove the option selected earlier     (the checkmark disppears).  Press <Esc> to exit the selection      list.

Logical Unit Type 
   
    Press <Enter> on this field to get a list of LU types: Printer     (LU Type 1 or 3), Display (LU Type 2), and APPC (LU Type 6.2).     Select a type from the list by pressing <Enter> again.
                                                      Page 4 of 5╪aEC_
Model Number    
    
    Press <Enter> on this field to get a list of display
    models: Model 2 (24x80), Model 3 (32x80), Model 4 (43x80),
    and Model 5 (27x132).  Select a display model from the 
    list by pressing <Enter> again.

Preserve Host Session after An Abort 

    Enter Yes if you want a host session preserved for a user when     an emulation session ends unexpectedly.  When this option is       set to Yes, any user who obtains the LU corresponding to the       preserved host session will see the preserved screen.




                                                      Page 5 of 5└iEC9                     Dedicated LU Configuration

Dedicated LU Name

    This field displays the name of the Dedicated LU you are           configuring. 

LU Address
    
    This field displays the LU address you are configuring. 

VTAM LU Name

    Enter a name.  VTAM LU name is for informational purposes
    only.  The name can contain only characters from A-Z and           0-9.  The first character of the name must be a character
    from A-Z.                                                                                                            Page 1 of 4┴logECΘ
Authorized Users
     
    You can add users to this list so that they have access to         the LU.  You can also delete one or more users from the list. 

    If this entire field is highlighted, press <Enter> before you      can work on the following options: 

    <Insert>  Press this key if you want to add user(s) to the                   list.
    <Delete>  Press this key if you want to delete user(s) from                  the list.
    <Esc>     Press this key to highlight the entire field if
              you want to exit the field. 
    <F5>      Press this key if you want to select (highlight)
              more than one user to delete by <Delete> later.     
                                                      Page 2 of 4ªo└iEC═
Session Attributes
                
    Select Traceable if you want the LU session to be traceable.
    Select Locked if you want to lock the session to ensure that
    no one will use it if the LU has a problem.

    If this entire field is highlighted, press <Enter> first to        make the list selectable.  Press <Enter> to select an option       (a checkmark appears) or to remove the option selected earlier     (the checkmark disppears).  Press <Esc> to exit the selection      list.

Logical Unit Type 
   
    Press <Enter> on this field to get a list of LU types: Printer     (LU Type 1 or 3) and Display (LU Type 2).  Select a type from      the list by pressing <Enter> again.               Page 3 of 4┴lECe   
Model Number    
    
    Press <Enter> on this field to get a list of display
    models: Model 2 (24x80), Model 3 (32x80), Model 4 (43x80),
    and Model 5 (27x132).  Select a display model from the 
    list by pressing <Enter> again.

Preserve Host Session after An Abort 

    Enter Yes if you want a host session preserved for a user when     an emulation session ends unexpectedly.  When this option is       set to Yes, any user who obtains the LU corresponding to the       preserved host session will see the preserved screen.    



                                                      Page 4 of 4
A?í                         LU Address

  Enter a decimal number in the valid range of LU sessions. 
  
  Press <Esc> if you do not want to configure an LU session.¡tEC╣                    Service Profile Description

Profile Name

    This field displays the name of the service profile you 
    are configuring.

Profile Type

    This field displays the type of the services you are               configuring. 

Profile ID

    This field displays the current service profile ID, which the
    server uses to send messages between processes.
                                                      Page 1 of 3hv▄rECú
Profile Creation Date
    
    This field displays the date the current service profile was       created. 

Profile Creation Time

    This field displays the time the current service profile was       created. 

Installation Location

    This field is optional.  You may display or describe where         the current service profile is being used. 

                                                      Page 2 of 3¡tECM
Profile Description

    This field is optional.  You may display or enter a                description of the service profile. 

Version/SubVersion/Revision

    These fields display the version/revision information about
    the services you are configuring.






                                                      Page 3 of 3CAÄ                    Delete LU Specification

No       Select this option if you want to keep the 
         highlighted range(s) in the LU pool.

Yes      Select this option if you want to remove the                     highlighted LU range(s) from the LU pool you are                 configuring. 

<Esc>    Press this key if you want to keep the highlighted               range(s) in the LU pool.
|ECy                    Host Connection Configuration

SNA Network ID

    Enter the name for the entire SNA network.  You can obtain         this information from the host system administrator. 

Peripheral Node Control Point Name

    Enter the name of the peripheral node control point (PNCP).        You can obtain this information from the host system               administrator.  In SNA terms, the server is a peripheral node.     A peripheral node contains a software entity called a Control      Point that controls the resources of the SNA peripheral node.   
                                                      Page 1 of 2 
syEC{
Number Independent Sessions Supported 

    Enter the maximum number of independent LU 6.2 sessions
    that are to be supported by this profile.  This parameter
    limits the combined total of all independent sessions.
    The total consists of sessions whose targets can include
    a host, AS/400s, or other 2.1 nodes, and sessions between          workstations.    

Host Attachment

    Press <Enter> on this field to get the list of host
    connection options: Token Ring, Ethernet, SDLC, QLLC
    and, custom defined adapter. Select your option by pressing        <Enter> again.                                    Page 2 of 2▓ÇEC                     SNA Token Ring Configuration

Token Ring Source Service Access Point

    Enter the two-digit hexadecimal Source Service Access Point        (SAP) as specified on the Host System Configuration Worksheet.

Token Ring Adapter Type

    Press <Enter> on this field to get a list of adapter types:        Primary and Alternate.  Select the type of adapter you are         using for the host connection by pressing <Enter> again.   

                                                      Page 1 of 38éù~ECn
Block ID

    Enter the three-digit hexadecimal block ID as specified on
    the Host System Configuration Worksheet.

PUID for Token Ring Connection 

    Enter the five-digit hexadecimal Physical Unit ID (PUID)
    number as specified on the Host System Configuration               Worksheet.  


                                                      Page 2 of 3 ▓ÇEC╙
Logical Adapter Name

    Enter the Logical Adapter name.  The name can include any          alphabet, numeric, and special characters.








                                                      Page 3 of 3 ╕äEC}                          Server Description  

Server Name

    This field displays the name of the server you are
    configuring.

Installation Date
    
    This field displays the date the current server was installed.

Installation Time

    This field displays the time the current server was installed.

 
                                                      Page 1 of 4  ╦ç#âEC√
Model Number of Server Machine

    This field is optional.  Enter the server's model number if        you are configuring the server to support NetView and want the     server to be identified when reporting events to NetView. If       the server is NOT an IBM machine, you need to enter a              compatible model number of an IBM machine.

Serial Number of Server Machine

    This field is optional.  Enter the server's serial number if       you are configuring the server to support NetView and want the     server to be identified when reporting events to NetView. If       the server is NOT an IBM machine, you need to enter a              compatible serial number of an IBM machine.
                                                      Page 2 of 4/è╕äECL
Protocol Stacks Supported

    Select the option from the protocol stack list.  If this           entire field is highlighted, press <Enter> first to make the       list selectable.  Press <Enter> to select an option (a             checkmark appears) or to remove the option selected before         (the checkmark disppears).  Press <Esc> to exit the selection      list.

Installation Location

    This field is optional.  You may display or enter the location     where the server you are configuring was installed. 


                                                      Page 3 of 4╦çECA
Server Description

    This field is optional.  You may display or enter a                description of the server that you are configuring.  

Miscellaneous Information

    This field is optional.  You may display or enter any              helpful information about the server, such as available            printing services, a person to contact, or titles of               applicable manuals and worksheets.    

Version/SubVersion/Revision

    These fields display the version/revision information about
    the server that you are configuring.              Page 4 of 4tÅFD╘                         Network Management

Audit Trail  

    Enter Yes if you want the server to save an audit trail of
    user actions; otherwise enter No.  When this option is set
    to Yes, the audit trail information is saved in a database
    file on the server.  Users of the Communication Services            Manager and the CSStatus program can view the information.          Specifically, the audit trail records when a user logs in           and logs out, and when a user starts and stops sessions.

Trace

    Enter Yes if you want to use the CSSTART TRACE and CSSTOP           TRACE commands at the communication services console.         

                                                       Page 1 of 6▌ÆêîFDQ            
Security     

    Enter Yes if you want to set the NetWare Communication Services     security.  If this option is set to Yes, users must be valid        NetWare users with permission to use the session they have          requested -- that is, their names must appear on the list of        authorized user associated with the session they have selected.     If this option is set No, any user can use any session.

Local Event Logging

    Enter Yes if you want the server to save network event alerts       (such as a token ring "beaconing" message) in a log.  The
    information is stored in a database file on the server.  Users
    of the Communication Services Manager and the CSStatus program      can view this log information.                                                                                         Page 2 of 6(òtÅFD3
NetView Management

    Enter Yes if you want to have NetView support; otherwise
    enter No.  When this option is set to Yes, you can configure
    the additional NetView parameters: Generate Alerts, Process         Commands, NetView Security, and Upstream Management Node.
    
Generate Alerts     

    Enter Yes if you want to have NetView alert support; otherwise
    enter No.  When this option is set to Yes, the communication
    server sends alerts to the IBM NetView facility.    




                                                       Page 3 of 6gù▌ÆFD'
Process Commands

    Enter Yes if you want to have NetView command support;              otherwise enter No.  When this option is set to Yes, the            communication server accepts commands from the IBM NetView          facility.   


NetView Security

    Enter Yes if you want to enable NetView command security;
    otherwise enter No.  If this option is set to Yes, a valid          NetWare user must be specified with the OP= keyword in the          NetView command.
    

                                                       Page 4 of 6ôÜ(òFD
Upstream Management Node

    Press <Enter> on this field to get a list of Upstream               Management Node types: NetView Host and NetView Collection          Point.  Select a type from the list by pressing <Enter> again.
    NetView Host should be selected if the communication server 
    has a connection to an IBM NetView Host.  NetView Collection
    Point should be selected if the communication server uses
    a NetView Collection Point to communicate with the IBM NetView
    Host.

SAA Service Name

    If you set Upstream Management Node to NetView Host, enter          either the SAA Service name or *.  Enter * to select the first      SAA Service Profile loaded.  This service name is used to           forward alerts to the IBM NetView facility.        Page 5 of 6gùFDδ
Collection Point Server Name

    If you set Upstream Management Node to NetView Collection           Point, enter the Collection Point Server name  
 
    










                                                       Page 6 of 6 B@?                       File Already Exists

Append to Existing File

    Select this option if you want to append the service            profile information to the old file.

Overwrite of Existing File

    Select this option if you want to delete the old file and       replace it with the service profile information.B@                     LU Address/VTAM LU Name

LU Address

    This field displays the LU address.
    
VTAM LU Name
    
    Enter a VTAM LU name.  For LU 6.2, the name is required in
    order to establish a session with another LU.  For LU 1,
    2, or 3, the name is for informational purposes only.  The
    name can contain only characters from A-Z and 0-9.  The         first character of the name must be a character from A-Z.           
    Use <Delete> to blank out the name if the name is not
    required.
CAO                        Delete Dedicated LU

No       Select this option if you want to keep the
         highlighted Dedicated LU(s).  

Yes      Select this option if you want to remove the                     highlighted Dedicated LU(s). 
 
<Esc>    Press this key if you want to keep the highlighted               Dedicated LU(s).
ÅóCA                        Dedicated LU Names

From this list you can configure, create, or rename a Dedicated LU. You can also delete one or more Dedicated LUs from the list. 

<Enter>   Press this key if you want to configure the                      highlighted Dedicated LU.
     
<Insert>  Press this key if you want to create a new 
          Dedicated LU.

<Delete>  Press this key if you want to delete the highlighted             Dedicated LU(s).   
                                                    Page 1 of 2páCAk
<Esc>     Press this key if you want to exit this list.

<F3>      Press this key if you want to rename the highlighted             Dedicated LU.

<F5>      Press this key if you want to select (highlight) more            than one Dedicated LU to delete by pressing <Delete>             later.





                                                    Page 2 of 2C
As                         New Dedicated LU

Dedicated LU Name
     
    Enter a name if you want to create a new Dedicated LU. 
    The name can be from 1 to 8 characters long and can              contain only characters from A-Z and 0-9.  The first             character of the name must be a character from A-Z.

LU Address

    Enter the address of a Dedicated LU.     E	Ch                    Rename Dedicated LU Name To

  Enter a name if you want to rename the highlighted Dedicated       LU.  The name can be from 1 to 8 characters long and can           contain only characters from A-Z and 0-9.  The first character     of the name must be a character from A-Z.

  Press <Esc> if you want to keep the existing Dedicated LU Name.FD½                        Create Dedicated LU

No       Select this option if you want to exit the New Dedicated            LU screen without creating a new Dedicated LU. 

Yes      Select this option if you want to create the new                    Dedicated LU as specified and exit the New Dedicated                LU screen.

<Esc>    Press this key if you want to remain on the New                     Dedicated LU screen.  		DB╣                        Output File Name

  Enter the name of the file where you want the output copied, 
  and then press <Enter>.

  Press <Esc> if you want to abort the Print option.
CAÆ                      Delete User From List

No       Select this option if you want to keep the
         highlighted user(s) on the Authorized Users list.  

Yes      Select this option if you want to remove the                     highlighted user(s) from the Authorized Users list. 

<Esc>    Press this key if you want to keep the highlighted               user(s) on the Authorized Users list.  

KIΓThis list displays the selected service profile configuration.

LU                    -  LU id
Type                  -  LU type
Mod                   -  Model number
Category              -  LU category: POOLED, DEDICATED, PUBLIC, or
                         DOWNSTREAM PU
Pool/Ded.LU/DPU Name  -  Name of LU pool, Dedicated LU or Downstream PU
VTAM LU Name          -  VTAM LU name
Security              -  'Y' if Authorized Users are specified
Term                  -  'Y' if Host session is preserved after Abort

<Enter>               Press this key if you want to see the list of
                      authorized users for the selected LU.
<Page Up/Down>        Press these keys if you want to scroll through
                      the list of LUs configured for this profile.  
<up/down arrow>       Press these keys if you want to scroll through
                      the list of LUs configured for this profile.  
<Esc>                 Press this key if you want to exit this list.      D	B                         Authorized Users

This list displays all the Authorized Users for this LU.
  
<Up/Dn Arrow>   Press these keys if you want to scroll through                    the list.

<Esc>           Press this key if you want to exit the list.

√▓ECt                          QLLC Configuration

Call Support Layer Target Name (for Node Type PU 2.0)

    Enter the Call Support Layer Target Name.  The name can
    include any alphabet, numeric and special characters.

Block ID

    Enter the three-digit hexadecimal block ID as specified
    on the Host System Configuration Worksheet.

PUID for QLLC Connection 

    Enter the five-digit hexadecimal Physical Unit ID (PUID) 
    number as specified on the Host System Configuration               Worksheet.  This number is required for switched lines.                                                              Page 1 of 4 Ä╡o░EC{
Maximum Frame Size to Transmit Inbound (for Node Type PU 2.0)

    Press <Enter> on this field to get a list of frame sizes:
    265, 521 and 1033.  Select your option by pressing <Enter>         again.  This is the number of bytes to be included in
    frames being sent to the host.  

PU 2.1 Link Station Role (for Node Type PU 2.1)

    Press <Enter> on this field to get a list of options:
    Negotiable and Secondary.  Select your option by pressing          <Enter> again.  This field specifies the QLLC link station         role relative to the host link.



                                                      Page 2 of 4
µ╖√▓EC@
Activate Host on Active WS Only (for Node Type PU 2.0)

    Enter Yes if the host is to be activated only when a
    workstation is requesting a connection.
    
    Note that this option and the Alllocate Active LUs Only are
    mutually exclusive.  Selecting Yes for either automatically        forces the other to No.
   
Allocate Active LUs Only (for Node Type PU 2.0)

    Enter Yes if sessions for this service profile are to be
    allocated for use only if they have been activated by
    the host.


                                                      Page 3 of 4
Ä╡EC╓
Logical Adapter Name

    Enter the Logical Adapter name.  The name can include any          alphabet, numeric, and special characters.












                                                      Page 4 of 4φ║G
E                       Downstream PU Names

From this list you can configure, create, or rename a downstream PU. You can also delete one or more downstream PUs from the list. 

<Enter>   Press this key if you want to configure the highlighted              downstream PU.
     
<Insert>  Press this key if you want to create a new downstream PU.

<Delete>  Press this key if you want to delete the highlighted                 downstream PU(s).   
                                                        Page 1 of 2╘╕C
Ad
<Esc>     Press this key if you want to exit this list.

<F3>      Press this key if you want to rename the highlighted             LU pool.

<F5>      Press this key if you want to select (highlight) more            than one LU pools to delete by pressing <Delete>                 later.



                                                    Page 2 of 2
CAP                       Delete Downstream PU

No       Select this option if you want to keep the
         highlighted downstream PU(s).  

Yes      Select this option if you want to remove the                     highlighted downstream PU(s). 

<Esc>    Press this key if you want to keep the highlighted               downstream PU(s).G┐C	A^                     New Downstream PU Name
     
  Enter a name if you want to create a new downstream PU.  The     name can be from 1 to 8 characters long and can contain          only characters from A-Z and 0-9.  The first character of        the name must be a character from A-Z.

  Press <Esc> if you do not want to create a new downstream PU.╤╜C
AI	Gk                      Rename Downstream PU Name To

  Enter a name if you want to rename the highlighted downstream PU.      The name can be from 1 to 8 characters long and can contain only       characters from A-Z and 0-9.  The first character of the name must     be a character from A-Z.

  Press <Esc> if you want to keep the existing name of downstream PU. ╬├MK╘                      Downstream PU (DPU) Configuration

DPU Name
 
    This field displays the name of downstream PU you are configuring.

LU Address

    Press <Enter> if you want to display the Start/End (ranges of
    session) list.  On this list you can modify, add, or delete the
    range (or ranges) of the sessions in this downstream PU. 
      
Start/End    
 
    <Enter>   Press this key if you want to modify the highlighted range.
    <Insert>  Press this key if you want to add a new range. 
    <Delete>  Press this key if you want to delete the highlighted 
              range(s).                                                        <Esc>     Press this key if you want to exit this list.   Page 1 of 5 ╨╞Γ└MKΩ
Start/End (continued)     

    <F5>      Press this key if you want to select (highlight) 
              more than one range to delete by <Delete> later.    
         
VTAM LU Name

    Press <Enter> if you want to display the LU Address/VTAM LU Name list.     On this list you can modify any VTAM LU name in this downstream PU.        The name is optional and is for informational purposes only.  The 
    name can contain only characters from A-Z and 0-9.  The first              character of the name must be a character from A-Z.        

LU Address/VTAM LU Name    
 
    <Enter>   Press this key if you want to modify the highlighted VTAM                  LU name.
    <Esc>     Press this key if you want to exit this list.   Page 2 of 5█╔╬├MK≤
Authorized Users
   
    You can add users to this list so that they have access to the LU.         You can also delete one or more users from the list. 

    If this entire field is highlighted, press <Enter> before you can 
    work on the following options: 

    <Insert>  Press this key if you want to add user(s) to the list.           <Delete>  Press this key if you want to delete user(s)                               from the list.
    <Esc>     Press this key to highlight the entire field, 
              if you want to exit the field.
    <F5>      Press this key if you want to select (highlight)
              more than one user to delete by <Delete> later.     

 
                                                              Page 3 of 5f╠╨╞MKs
DPU Attachment

    Press <Enter> on this field to get the list of downstream PU's 
    connection options: Token Ring, Ethernet, and QLLC adapter.                Select your option by pressing <Enter> again.       

Destination Node Address of DPU

    If you set DPU Attachment to Token Ring or Ethernet, enter the             Destination Node (Controller) address in hex number.  

Destination Service Access Point

    If you set DPU Attachment to Token Ring or Ethernet, enter the
    two-digit hexadecimal Destination Service Access Point.     


                                                              Page 4 of 5█╔MK¢
Call Support Layer Target Name of DPU

    If you set DPU Attachment to QLLC, enter the Call Support Layer
    Target Name.  The name can include any alphabet, numeric and special       characters.

Maximum Frame Size to Transmit Inbound 

    Press <Enter> on this field to get a list of frame sizes.  For 
    Token Ring, the available sizes are 265, 521, 1033, 2057, and 4105.        The available sizes for QLLC are 265, 521, and 1033.  Select your          option by pressing <Enter> again.  This is the number of bytes to
    be included in frames being sent to the downstream PU.  




                                                              Page 5 of 5í╤FDp                      SNA Ethernet Configuration

Ethernet Destination Node Address 

    Enter the Destination Node (Controller) address as specified        on the Host System Configuration Worksheet. 

Ethernet Destination Service Access Point

    Enter the two-digit hexadecimal Destination Service Access          Point as specified on the Host System Configuration Worksheet.

Ehternet Source Service Access Point

    Enter the two-digit hexadecimal Source Service Access Point         (SAP) as specified on the Host System Configuration Worksheet.
 
                                                       Page 1 of 4√╙╧FDB
Ethernet Adapter Type

    Press <Enter> on this field to get a list of adapter types:         Primary and Alternate.  Select the type of adapter you are          using for the host connection by pressing <Enter> again.   

Block ID

    Enter the three-digit hexadecimal block ID as specified on
    the Host System Configuration Worksheet.

PUID for Ethernet Connection 

    Enter the five-digit hexadecimal Physical Unit ID (PUID)            number as specified on the Host System Configuration Worksheet. 
                                                       Page 2 of 4╓í╤FD
Maximum Frame Size to Transmit Inbound 

    Press <Enter> on this field to get a list of frame sizes:
    265, 521, 1033, and 1289.  Select your option by pressing
    <Enter> again.  This is the number of bytes to be                   included in frames being sent to the host.  

Allocate Active LUs Only

    Enter Yes if sessions for this service profile are to be 
    allocated for use only if they have been activated by
    the host.



   
                                                       Page 3 of 4 √╙FD┌
Logical Adapter Name

    Enter the Logical Adapter name.  The name can include any           alphabet, numeric, and special characters. 












                                                       Page 4 of 4 FD                          Server/User Name
 
From this list you can configure a communication server or attach to a new server.  You can also detach from the communication server to which you are currently attached.  

<Enter>   Press this key if you want to configure the                         highlighted server.
     
<Insert>  Press this key if you want to attach to a new server.

<Delete>  Press this key if you want to detach the highlighted                server.

<Esc>     Press this key if you want to exit the current menu.└█HFl                         Session Configuration

Configure Dedicated LUs

    Select this option if you want to configure Dedicated LUs.            Dedicated LUs are typically used to restrict access to a              particular application or to guarantee that a particular
    user will always be allocated a specific LU.

    The Dedicated LU specified using this option must not be              previously configured as a Dedicated LU or included as 
    part of an LU Pool.  Dedicated LUs are specified with the             Dedicated LU name. 




                                                         Page 1 of 3{▌<┘HFú
Configure Downstream PUs

    Select this option if you want to configure downstream PUs. A
    downstream PU contains a collection of downstream LUs.           

    The LUs specified as part of the downstream PU must not be            previously configured as Dedicated LUs or included as part of         another LU Pool or downstream PU. 








                                                         Page 1 of 3Θα└█HFV
Configure LU Pools

    Select this option if you want to configure LU Pools. An LU
    Pool is a collection of LUs that have been grouped together
    under a common name.  The LUs in an LU Pool must all be of
    the same type (1, 2, or 3) and can be non-contiguous.

    LU Pools are typically used to allocate a collection of LUs
    for use by a particular group -- for example, marketing.  LU
    Pools can be secured so that only the members of a specified
    group can access the LUs in a Pool. 

    The LUs specified as part of the LU Pool must not be previously       configured as Dedicated LUs or included as part of another LU         Pool.  The LU Pool is specified with the LU Pool name, and the 
    LUs in the Pool are allocated on a first-come-first-serve basis.                                                           Page 2 of 3 {▌HFÇ
Configure Range of Public LUs

    Select this option if you want to configure a range of Public         LUs.  Public LUs are typically unsecured LUs that can be 
    used by any user.  The LUs specified in the range must all
    be of the same type (1, 2, or 3) and can be non-contiguous.

Configure Single Public LU

    Select this option if you want to configure a single Public           LU.  Public LUs are typically unsecured LUs that can be 
    used by any user.


                                                                                                
                                                         Page 3 of 3ùσEC■                      SNA Ethernet Configuration

Ethernet Source Service Access Point

    Enter the two-digit hexadecimal Source Service Access Point        (SAP) as specified on the Host System Configuration Worksheet.

Ethernet Adapter Type

    Press <Enter> on this field to get a list of adapter types:        Primary and Alternate.  Select the type of adapter you are         using for the host connection by pressing <Enter> again.   

                                                      Page 1 of 3τüπECl
Block ID

    Enter the three-digit hexadecimal block ID as specified on
    the Host System Configuration Worksheet.

PUID for Ethernet Connection 

    Enter the five-digit hexadecimal Physical Unit ID (PUID)
    number as specified on the Host System Configuration               Worksheet.  


                                                      Page 2 of 3 ùσEC╙
Logical Adapter Name

    Enter the Logical Adapter name.  The name can include any          alphabet, numeric, and special characters.








                                                      Page 3 of 3 
CA-                         Other Servers

From this list you can select a communication server to
attach to. 

<Enter>   Press this key if you want to attach to the                      highlighted server.  

<Esc>     Press this key if you want to exit this list without
          selecting any server.
B@x                 Existing Service Profiles

From this list you can select a service profile to copy to the new service profile you want to create.

<Enter>   Press this key if you want to copy the highlighted              profile to the new service profile.  

<Esc>     Press this key if you want to exit this list without            selecting any profile to copy.
          

;9ú                        User Name

  Enter your valid NetWare user name.  To make changes     in CSCON, you must log in as SUPERVISOR or SUPERVISOR    equivalent.

+)j                 Password

  Enter the password that is valid for     the user name you have just entered.
CAx                          Save Changes

No       Select this option if you want to exit the screen you            were on without saving the changes you have just made. 

Yes      Select this option if you want to save the changes you           have just made and exit the screen you were on.

<Esc>    Press this key if you want to return to the screen you           were on.6≡FDv                      SNA Custom Configuration

Link Type Name 

    Enter the name.  The name will appear on the Host Attachment        option list in the Host Connection Configuration panel.

Data Link Custom Data (for Node Type PU 2.0)

    Enter any ASCII string for this field.  The field is used
    for any purpose required by the Data Link.

Adapter Type

    Press <Enter> on this field to get a list of adapter types:         Primary and Alternate.  Select the type of adapter you are          using for the host connection by pressing <Enter> again.   
                                                       Page 1 of 5┌±¿φFDî
Multiple Logical Link Support

    Enter Yes if Multiple Logical Link is suppported. Otherwise,
    enter No.

Balanced Type of Protocol
 
    Enter Yes for balanced type of protocol.  Otherwise, enter No.

Block ID

    Enter the three-digit hexadecimal block ID as specified on
    the Host System Configuration Worksheet.


 
                                                       Page 2 of 5T⌠6≡FDb
PUID for Custom Connection 

    Enter the five-digit hexadecimal Physical Unit ID (PUID)            number as specified on the Host System Configuration Worksheet.

Maximum Frame Size to Transmit Inbound (for Node Type PU 2.0)

    Press <Enter> on this field to get a list of frame sizes:
    265, 521, 777, 1033, 1289, 1545, 1801, 2057, 2313, 2569, 2825,      3061, 3337, 3593, 3849, and 4105.  Select your option by 
    pressing <Enter> again.  This is the number of bytes to be          included in frames being sent to the host.  




                                                       Page 3 of 5 ¡÷┌±FDA
Activate Host on Active WS Only (for Node Type PU 2.0)

    Enter Yes if the host is to be activated only when a
    workstation is requesting a connection.
    
    Note that this option and the Alllocate Active LUs Only are
    mutually exclusive.  Selecting Yes for either automatically         forces the other to No.
   
Allocate Active LUs Only (for Node Type PU 2.0)

    Enter Yes if sessions for this service profile are to be
    allocated for use only if they have been activated by
    the host.


                                                       Page 4 of 5T⌠FDδ
Logical Adapter Name

    Enter the Logical Adapter name.  The name can include any           alphabet, numeric, and special characters. 

Protocol Stack Name

    Enter the name.  This is the name that Protocol Stack Driver        registers its stream device name with streams.  The name can        include any alphabet, numeric, and special characters.  The         name is case sensitive.                          





                                                       Page 5 of 5 √EC;                   Single Public LU Configuration

LU Address
    
    This field displays the LU address you are configuring.

VTAM LU Name

    Enter a name.  For LU 6.2, the VTAM LU name is required in         order to establish a session with another LU.  For LU 1, 2,
    or 3, the name is for informational purposes only.  The name       can contain only characters from A-Z and 0-9.  The first           character of the name must be a character from A-Z.  

                                     


                                                      Page 1 of 5	■░°ECε 
Authorized Users
   
    You can add users to this list so that they have access to         the LU.  You can also delete one or more users from the list. 

    If this entire field is highlighted, press <Enter> before you      can work on the following options: 

    <Insert>  Press this key if you want to add user(s) to the                   list.
    <Delete>  Press this key if you want to delete user(s)                       from the list.
    <Esc>     Press this key to highlight the entire field 
              if you want to exit the field. 
    <F5>      Press this key if you want to select (highlight)
              more than one user to delete by <Delete> later.     
                                                      Page 2 of 5U√EC4
Session Attributes
                
    Select Traceable if you want the LU session to be traceable.
    Select Locked if you want to lock the session to ensure that
    no one will use it if the LU has a problem.

    If this entire field is highlighted, press <Enter> first to        make the list selectable.  Press <Enter> to select an option       (a checkmark appears) or to remove the option selected earlier     (the checkmark disppears).  Press <Esc> to exit the selection      list.





                                                      Page 3 of 5z	■EC

Logical Unit Type 
   
    Press <Enter> on this field to get a list of LU types: Printer     (LU Type 1 or 3), Display (LU Type 2), and APPC (LU Type 6.2).     Select a type from the list by pressing <Enter> again.

Model Number    
    
    Press <Enter> on this field to get a list of display
    models: Model 2 (24x80), Model 3 (32x80), Model 4 (43x80),
    and Model 5 (27x132).  Select a display model from the 
    list by pressing <Enter> again.




                                                      Page 4 of 5UEC
Preserve Host Session after An Abort 

    Enter Yes if you want a host session preserved for a user when     an emulation session ends unexpectedly.  When this option is       set to Yes, any user who obtains the LU corresponding to the       preserved host session will see the preserved screen.

<Ctrl PgDn>  

    Press this key if you want to configure the next public LU.
  
<Ctrl PgUp>  

    Press this key if you want to configure the previous
    public LU. 

                                                      Page 5 of 5A?É                    Rename Service Profile To

  Enter a name if you want to rename the highlighted service     profile.  The name can be from 1 to 8 characters long and      can contain only printable characters.  The name cannot        include spaces or the following special characters: slash      (/), backslash (\), colon (:), semicolon (;), comma (,),       asterisk (*), question mark (?), double quotes ("), less       than (<), greater than (>), brackets ([ or ]), period (.),     equal (=), and plus (+).  The first character of the name      cannot be a period (.).

  Press <Esc> if you want to keep the existing service           profile name.C	AW                      Rename LU Pool Name To

  Enter a name if you want to rename the highlighted LU pool.      The name can be from 1 to 8 characters long and can contain      only characters from A-Z and 0-9.  The first character of the    name must be a character from A-Z.

  Press <Esc> if you want to keep the existing name of LU pool. 