; module-definition file for generic -- used by LINK.EXE

NAME        STRESS        ; application's module name

DESCRIPTION  'DAX Stress Utility'

EXETYPE      WINDOWS	   ; required for all Windows applications

STUB	     'WINSTUB.EXE'  ; Generates error message if application
               			   ; is run without Windows

;CODE can be moved in memory and discarded/reloaded
CODE  PRELOAD FIXED DISCARDABLE

;DATA must be MULTIPLE if program can be invoked more than once
DATA  PRELOAD FIXED MULTIPLE


HEAPSIZE     1024
STACKSIZE    5120	   ; recommended minimum for Windows applications


