;******* DMCUST C Sample Program Module Definition File (.DEF) ********
;
;  The module definition file supplies extra information about the program
;  module to the LINKER.
;
;  Different HEAPSIZE used. ( 1024 bytes )


NAME    dmcust WINDOWAPI

DESCRIPTION 'OS/2 Presentation Manager Sample'

STUB    'OS2STUB.EXE'

DATA    MULTIPLE

STACKSIZE   16384
HEAPSIZE    4096

PROTMODE

