A-TO-D.HLP    words to measure 80c196 a-to-d channels



.RZ ( 16bit n -- ) display a number right justified in n columns
        Similar to .R but with leading zeros instead of blanks
        This is used by .volts

.volts ( adresult -- ) scale an a-to-d measurement and display it as volts



measure ( channel -- )  measure and display one A to D channel

measure-all ( -- )  Measure all channels repeatedly and make a kind of
                    bargraph presentation on the screen.
                   "Mike's 80c196 8-channel voltmeter"

