
            ┌────────────────────────┐
            │     PERCENTAGE BOX     │
            └────────────────────────┘

 Here is another useful little routine for Toolbox 
 users. It pops up a window on the screen in which
 is  displayed a percentage bar, illustrating  how   
 much of the current process has been completed.   

 Use it, during lengthy operations, to reassure an
 operator that the program is not 'hanging', or to
 indicate how much longer there is to go.