; minimal.def : Declares the module parameters for the minimal application.
;

NAME         TEST
DESCRIPTION  'wxHelp test client'

EXETYPE      WINDOWS
STUB         'WINSTUB.EXE'

CODE         PRELOAD MOVEABLE DISCARDABLE
DATA         PRELOAD MOVEABLE MULTIPLE

HEAPSIZE     1024
STACKSIZE    8192

