6,3
* Key Function Summary *
F1 - F5 = Start area 1-5
@ arrows move pointer
shifted arrows move fine
<Enter> accepts position
A - compute Area sq. feet
C - Close up an area
D - change Drawing scale
F - list of Files on disk
G - overlay scaling Grid
H - Help ---more keys---
I - Start Interior wall
J - Join to near corner
L - Load sketch from disk
M - Measurement calculate
N - add room Names
R - Redraw screen (fixup)
S - Save sketch to disk
T - Test for area closure
V - change Video color
<Alt F1-F5> Rename areas
<Alt F6> Rename Interior
<Alt A> - Angles On/Off
<Alt C> - Clear sketch
<Alt D> - Dashed line
<Alt H> - alt. Help key
<Alt I> - add Icon
<Alt K> - Kill a file
<Alt M> - Move sketch
<Alt P> - Ready to Print
<Alt Q> - Quit (exit)
<Alt S> - Printer Status
Del - Deletes last entry
Ins - restores deleted
Shft PrtSc - Print Sketch
Use E before to eject pg.
When using <Alt> keys,
hold down the Alt key
and tap the other key.

Microsoft Mouse or
Joystick users:
The bottom joystick 
button and left mouse
button act like the Enter
(accept position) key.
The top joystick button
and the right mouse
button act like the shift
(fine motion) key.

Note: on some keyboards
Shift PrtSc is labeled
Print Screen (No Shift)
MEASUREMENTS   :    TOTAL
23.3 X 22      =    512.6
28.1 X 26.1    =    733.4
1ST LEVEL>     =  1,246.0

28.1 X 28.1    =    789.6
2ND LEVEL>     =    789.6

TOTAL LIVABLE: =  2,036

Shift-PrtSc Print sketch
Study the above sample.
Enter just text or use
these special characters
for area calculation:
X's Separate dimensions
>'s Subtotal prev lines
:'s Grand total 
MEASUREMENTS   :    TOTAL
23.3 X 22      =    512.6
28.1 X 26.1    =    733.4
1ST LEVEL>     =  1,246.0

28.1 X 28.1    =    789.6
2ND LEVEL>     =    789.6

TOTAL LIVABLE: =  2,036

Dimensions may be entered
up to the ':' at top of
screen.   Separate your
dimensions with X's.

You may use optional 
function keys.
No totals over 999,999.
* Printing instructions *

Use Alt-P to get ready to
print your sketch.  This
removes the clutter from
the screen giving a clean
looking printout.

After pressing Alt-P you
can press P to clear the
totals from the control 
corner, or you can press
E to eject the page after
the next Shift PrtSc.

To print only the sketch
press M F7  Esc Alt-P P
then Shift PrtSc
















1234567890123456789012345----------------------
