                             þ PRINT RECORDS þ
                          (Report or label format)

In this menu, you will print a report of records or labels, depending on
your configuration settings.  As well, your output will be in ASCII or not,
per those settings found in that menu.  Go to CONFIGURATION for more help
with print settings.

PRINT RECORDS (or PRINT LABELS):  Physically prints the report (or labels)
depending on the range specified at the top of the menu (as well as iterations
for labels).

CHANGE RANGE (or CHANGE RANGE AND TIMES):  Allows you to change the starting
and ending records for your printout (as well as the number of times each
label will be printed if you are printing labels).

BE SURE YOUR PRINTER IS þ ON þ AND þ READY BEFORE PRINTING!!!
