                               þ MAIN MENU þ

From the main program menu, you can progress to the following areas:

CONFIGURATION:  From here, you can select such settings as the print
type, ASCII printing, and the user name (also known as the registration
name).  The field names are also modified here.

EXIT:  Exits the program.
 *** MAKE SURE YOU WANT TO EXIT BEFORE DOING SO ***

ADD RECORDS:  From here you can add records to your database, as well as
perform other maintenance tasks to your database.

PRINT REPORT:  You may output your report here.  Select labels or records
in the CONFIGURATION menu.

