                            þ CONFIGURATION MENU þ

CHANGE THIS CONFIGURATION:  With this option, you may change:
       ù The name of the user (up to 15 characters)
       ù The name of the database (up to 20 characters)
       ù Whether you output will be in report (list) or label form
       ù If you would like upper-ASCII printing or not

       To use upper-ASCII printing, you must have a dot matrix or laser
printer capable of printing the line drawing characters (older ones cannot
do this).  If you are unsure about your printer, use the printer test.

MODIFY FIELD NAMES:  Allows you to change the headings for your fields
(that is, your categories).  There is a maximum of 6 fields

QUIT TO MAIN:  Returns you to the main menu.

EXIT PROGRAM:  Exits the program completely.
     *** BE SURE THAT YOU WANT TO DO THIS ***
