 ┌───────────────────────────────────────────────────────────────────────────┐ 
 │  Quick Reference              Command Help             Main Menu Options  │ 
 └───────────────────────────────────────────────────────────────────────────┘ 

    [U]...........Userlog List - Display a list of callers to the BBS
    [V]..........Verify a User - Request information about another caller

 
 ╒═ [U]............Userlog List ═╕
 └───────────────────────────────┘
     You are presented with a complete list of users on the system,
     displayed in alphabetical order, along with the date they last called,
     their calling point of origin and PC type.  If you are currently in a
     Alias type conference, instead of displaying regular user names, only
     the Alias names will be shown.  The usual screen pauses are in effect
     while using this option.

 ╒═ [V]...........Verify a User ═╕
 └───────────────────────────────┘
     This option allows you to enter in a complete user name to check and
     see when was the last time they called the BBS.  If the name you
     entered was not found, you are prompted if you would like to continue
     the search using the information supplied.  If you continue, the system
     will start displaying user names with the search based upon the users
     last names.  Searches for user names are case insensitive.


┌────────────────────────── End of Help Information ──────────────────────────┐
╘═════════════════════════════════════════════════════════════════════════════╛
