* PRINT will use the printer at LPT1 (Printer Port 1).
* Print is designed to work with continuous feed (like
* dot matrix) printers or LASER printers. PICK record
* number allows you to enter the number of a record to
* print. Not much use, really, unless you've memorized
* some of the record numbers and need a shortcut. PRINT
* using mask uses the same first 4 options as PRINT but
* the MASK is used to NOT print certain fields.
