********* QUESTION ONE HELP *********

PIBTERM MUST KNOW THE TYPE OF CONNECTION TO ESTABLISH:

  Select MODEM      if you are using a Modem to
                    to connect via telephone link

         HARDWIRED  if connected to the campus cable

         DIU        if using a Digital Interface Unit

-2
-3
-4
-5
-6
-7
-8
-9
-10

-2
-3
-4
-5
-6
-7
-8
-9
-10
********** QUESTION TWO HELP **********
If your  system has MORE THAN ONE SERIAL COMMUNICATIONS PORT
   you must indicate which one is connected to the
   COMMUNICATIONS CABLE, MODEM, OR DIU.

     - If you are not certain, COM1 is a good choice.
     - If a printer is connencted, COM2 is quite possible.

If your selection is not correct, you will not be able to
"initialize communications"  and  PIBTERM MAY ABORT !
***********QUESTION TWO ADV HELP LEVEL 1 ********************
The Communications Port can be changed while running Pibterm:
                                 menu ALT-P, item C, entry A

If you get the message "Sorry, can't initialize communications",
and Pibterm then aborts, you've chosen the wrong COM PORT.
If this happens, you must reconfigure Pibterm according to the
installation type:


**********QUESTION TWO ADV HELP LEVEL 2 *************************

-Hard Drive Installation: enter CONFIG and reset the parameters
                             (choosing a different COM PORT)

-Double Floppy Installation: enter CONFIG (both diskettes must be
                             in place with PATH=B:\  )

-Single Floppy Installation: rerun the entire installation
                             routine (enter INSTALL <diskette A> )
********* QUESTION THREE HELP **********
Pibterm must know the speed at which your system
will be sending and receiving characters.

MODEMS communicating at speeds of 300, 1200, and 2400 BAUD
       are currenty supported at NU.

some MULTIPLEXORS provide 4800 BAUD

The CAMPUS CABLE operates at 9600 BAUD.

-2
-3
-4
-5
-6
-7
-8
-9
-10

-2
-3
-4
-5
-6
-7
-8
-9
-10
********** QUESTION FOUR HELP **********
Choose the computer you use most frequently:

CYBER  - function keys/backspace key automatically defined
         for CYBER operation upon execution of Pibterm.

VAX  -  function keys/backspace key automatically defined
        for VAX operation upon execution of Pibterm.

Switch keys while running Pibterm with: ALT-P and ALT-K menus.

-2
-3
-4
-5
-6
-7
-8
-9
-10

-2
-3
-4
-5
-6
-7
-8
-9
-10
********** QUESTION FIVE HELP *********

-2
-3
-4
-5
-6
-7
-8
-9
-10

-2
-3
-4
-5
-6
-7
-8
-9
-10

-2
-3
-4
-5
-6
-7
-8
-9
-10
