; Defintions file for PMAUX
; Written by William S. Hall
;
NAME

DESCRIPTION	'Presentation Manager Debugging Window'

STUB	'OS2STUB.EXE'

HEAPSIZE  4096
STACKSIZE 8192

CODE	MOVEABLE
DATA	MOVEABLE MULTIPLE

SEGMENTS
    _PMAUXRS PRELOAD MOVEABLE
    _PMAUXNT PRELOAD MOVEABLE DISCARDABLE

EXPORTS
    MainWndProc		@1
    AboutBoxProc	@2
