; Definitions file for the Windows small model template
;
; Written by Bill Hall, Olivetti ATC
;

; Program name
NAME	Smltpl

; Description string
DESCRIPTION 'Windows small memory model template'

; Program to run if run from MS-DOS
STUB 'Winstub.exe'

; Heap and stack sizes
HEAPSIZE	1024
STACKSIZE	4096

; Attributes of code and data segments
CODE	MOVEABLE
DATA	MOVEABLE MULTIPLE

; Attributs of particular segments
SEGMENTS
    _INIT PRELOAD MOVEABLE DISCARDABLE

; Functions called by Windows
EXPORTS
    MainWndProc	@1
