NAME	Smltpl

DESCRIPTION 'Windows small memory model template'

STUB 'Winstub.exe'

HEAPSIZE	1024
STACKSIZE	4096

CODE	MOVEABLE
DATA	MOVEABLE MULTIPLE

SEGMENTS
    _TEXT PRELOAD MOVEABLE
    _INIT PRELOAD MOVEABLE DISCARDABLE

EXPORTS
    MainWndProc	@1
