<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">* change this to your library base
##base _DemoBase
##bias 30
* put your functions here
SquareMe(num)(D0)
##end
</pre></body></html>