;*************** Contrast Program Module Definition File (.DEF) ***************
;
;  The module definition file supplies extra information about the program
;  module to the LINKER.
;


NAME   Contrast WINDOWAPI

DESCRIPTION 'Version of file comparision program for PM'


DATA    MULTIPLE

STACKSIZE   8192
HEAPSIZE    1024

PROTMODE
EXPORTS ClientWndProc
        OpenDlgProc
        AboutDlgProc
        SetColoursProc
        FontsDlgProc
        MyEntryFieldProc
