; CKOKER for the PM
; N.B. The stack does not need to be at least 8192 as suggested in the Petzold
; book since the window thread is started from within the program and the
; stack is allocated from the main memory (using malloc).

NAME        CKOKER      WINDOWAPI

DESCRIPTION 'C-Kermit for the OS/2 Presentation Manager'
HEAPSIZE    3000
STACKSIZE   4000
EXPORTS     VioWndProc
EXPORTS     GpiWndProc
EXPORTS     ComsDlgProc
EXPORTS     TermDlgProc
EXPORTS     FileOpnDlgProc
EXPORTS     FileClsDlgProc
EXPORTS     MiscDlgProc
