  EOZSHOW HELP file -

  column 1 -

  blank=comments, v=view help, z=zoom help p=property panel, l=imagelist header

  m=message

 

  column 2 - Only display this line if:-

  0=always, 1=multiimage doc, 2=data entry (/d), 4=zoom (/z), 8= RFT or MODCA

 

  Main viewing help panel (maximum 19 lines starting 'v')

v0╔══════════════════════════════════════════════════════════════════════════════╗

v0║                                Image Display                                 ║

v0║                                                                              ║

v0║    Esc          to return to the book panel                                  ║

v0║    Arrow keys   to scroll/pan                                                ║

v0║    Spacebar     to stop scroll/pan                                           ║

v0║    Home/End     to position top/bottom                                       ║

v0║    i            to invert image (negative)                                   ║

v0║    Del          to refresh current picture                                   ║

v0║    +            to maximize image size                                       ║

v0║    -            to minimize image size                                       ║

v4║    Enter        to start zoom mode                                           ║

v0║                                                                              ║

v0║                                                           Esc=Cancel         ║

v0╚══════════════════════════════════════════════════════════════════════════════╝

 

  Help panel for zoom (maximum 13 lines starting 'z')

z0╔══════════════════════════════════════════════════════════════════════════════╗

z0║                           Image Display Zoom Mode                            ║

z0║                                                                              ║

z0║    Enter        to return to normal view mode                                ║

z0║    Arrow keys   to move zoom box                                             ║

z0║    Esc          to remove/restore background image                           ║

z0║    Home/End     to move zoom box to top/bottom of image                      ║

z0║    +            to increase zoom box size                                    ║

z0║    -            to decrease zoom box size                                    ║

z0║                                                                              ║

z0║                                                           Esc=Cancel         ║

z0╚══════════════════════════════════════════════════════════════════════════════╝

 

 

  Header for list of images panel (maximum 4 lines starting 'l')

l0                           List of Images                                       '

l0              Press =xx to see the corresponding picture.                       '

l8                  Press t to see text in document                               '

l0                                                                                '

 

  Messages

  1= during decode (max length 15)

m1Please Wait ...

  2= during create of zoom data (max length 15)

m2Please Wait ...

  3=display panel header (max length 48)

m3 F1=Help  Esc=Return to book panel                                                '

  4=zoom panel header (max length 48)

m4 F1=Help  Enter=End zoom  Esc=Clear background                                    '

  5=data file error while displaying

m5Document format error. Press Esc to quit, Enter to continue

  6=image data error while displaying

m6Error in Image data

 

#    Must have this as last record of data - can have other lines after this

