

CHANGING THE VIEWING SCREEN SIZE

You can change the size of the graphic viewport by clicking on one of the
three buttons at the base of the screen. These are:-

        (1) NORMAL SCREEN. This button will return the viewport to its
            default size with the index on view down the left side of the
            screen.

        (2) WIDE SCREEN. This button will give you a full width view of the
            currently selected graphic with the index box hidden.

        (3) FULL SCREEN. This button will allow you to view your currently
            selected graphic in full-screen mode.
            To return to Wide-Screen or Normal-Screen from Full-Screen mode
            select the Screen menu-item and the screen mode required from the
            drop down menu.

The three screen modes are also available from the menu item SCREEN.



