NAME          offsetrg
DESCRIPTION   'Sample application demonstrating the use of function offsetrgn'
STUB          'WINSTUB.EXE'
CODE          MOVEABLE
DATA          MOVEABLE MULTIPLE
HEAPSIZE      1024
STACKSIZE     4096
EXPORTS       WndProc
